Oxidative Medicine and Cellular Longevity
Volume 2018 (2018), Article ID 3714725, 10 pages
https://doi.org/10.1155/2018/3714725

Clinical Study

Exposure to Ti4Al4V Titanium Alloy Leads to Redox Abnormalities, Oxidative Stress, and Oxidative Damage in Patients Treated for Mandible Fractures

Jan Borys,¹ Mateusz Maciejczyk,² Bożena Antonowicz,³ Adam Krętowski,⁴ Danuta Waszkiel,⁵ Piotr Bortnik,¹ Katarzyna Czarniecka-Bargłowska,¹ Magdalena Kocisz,⁵ Julita Szulimowska,⁶ Marek Czajkowski,⁷ Napoleon Waszkiewicz,⁸ and Anna Zalewska⁵

¹Department of Maxillofacial and Plastic Surgery, Medical University of Bialystok, Sklodowskiej M.C. 24, 15-274 Bialystok, Poland
²Department of Physiology, Medical University of Bialystok, Mickiewicza 2c Str., 15-233 Bialystok, Poland
³Department of Oral Surgery, Medical University of Bialystok, Sklodowskiej M.C. 24a Str., 15-276 Bialystok, Poland
⁴Clinical Research Centre, Medical University of Bialystok, Sklodowskiej M.C. 24a Str., 15-276 Bialystok, Poland
⁵Department of Conservative Dentistry, Medical University of Bialystok, Sklodowskiej M.C. 24a Str., 15-276 Bialystok, Poland
⁶Department of Pedodontics, Medical University of Bialystok, Sklodowskiej M.C. 24a Str., 15-276 Bialystok, Poland
⁷IPL Marek Czajkowski, Aleja Solidarności 6/77 Str., 15-751 Białystok, Poland
⁸Department of Psychiatry, Medical University of Bialystok, Brodowicza 1, 16-070 Choroszcz, Poland

Correspondence should be addressed to Mateusz Maciejczyk; mat.maciejczyk@gmail.com

Received 16 December 2017; Revised 8 May 2018; Accepted 17 May 2018; Published 14 June 2018

Academic Editor: Gustavo R. M. Barcelos

Copyright © 2018 Jan Borys et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Due to the high biotolerance, favourable mechanical properties, and osseointegration ability, titanium is the basic biomaterial used in maxillofacial surgery. The passive layer of titanium dioxide on the surface of the implant effectively provides anticorrosive properties, but it can be damaged, resulting in the release of titanium ions to the surrounding tissues. The aim of our work was to evaluate the influence of Ti6Al4V titanium alloy on redox balance and oxidative damage in the periosteum surrounding the titanium miniplates and screws as well as in plasma and erythrocytes of patients with mandibular fractures. The study included 31 previously implanted patients (aged 21–29) treated for mandibular fractures and 31 healthy controls. We have demonstrated increased activity/concentration of antioxidants both in the mandibular periosteum and plasma/erythrocytes of patients with titanium mandibular fixations. However, increased concentrations of the products of oxidative protein and lipid modifications were only observed in the periosteum of the study group patients. The correlation between the products of oxidative modification of the mandible and antioxidants in plasma/erythrocytes suggests a relationship between the increase of oxidative damage at the implantation site and central redox disorders in patients with titanium miniplates and screws.

1. Introduction

Jaw bone fractures are a frequent and significant problem in clinical practice. The most common types of injuries are mandibular fractures that lead to morphological and functional disorders of the stomatognathic system as well as aesthetic defects of the facial skeleton. The treatment of mandibular fractures is aimed at reconstructing the anatomical shape of the bones and occlusion from before the injury and restoring normal functions of the chewing organ and facial aesthetics [1]. The use of internal bone fixation systems with miniplates and screws allows not only to avoid long-term intermaxillary immobilization and dental splint insertion, which are troublesome for the patient, but also to cure fractures in case of contraindications for inoperative orthopaedic treatment [1]. Miniplates and screws made of titanium, due to the high biocompatibility of this metal and its alloys used in the production of such fixations, are commonly used in traumatology, maxillofacial oncology, and orthognathic surgery. Despite the undoubted advantages of titanium bone fixations, their negative impact on the human body, both at the implant site and at the systemic level, is still debated [1, 2]. During the removal of titanium bone fixations, the presence of discoloured gray tissues surrounding the miniplates and screws was often observed [3, 4]. Some patients have also suffered from inflammatory symptoms around the anastomosis sites reported postoperatively both after several months and even years after osteosynthesis of the fractured mandible. Therefore, it is important to explore the impact of titanium miniplates and screws on the surrounding tissues [2]. The results of recent studies indicate that the cause of chronic inflammation around titanium bone fixations may be the increased production of oxygen-free radicals and reactive nitrogen species (RNS) [3, 5–7]. It is believed that overproduction of reactive oxygen species (ROS) and RNS can lead to the damage of cellular components by oxidation, thereby impairing normal cell functioning as a result of increased synthesis of proinflammatory mediators and affecting growth, differentiation, and apoptosis processes in the cells [8].

Although oxidative stress is one of the mechanisms of titanium toxicity [9], the kind (and extent) of oxidative damage it can cause is still unknown. What is more, the literature on the subject so far has not offered any study evaluating the effect of titanium bone fixation systems in patients with mandibular fractures on the redox balance both at the implant site and at the systemic level. Therefore, the aim of our work was to evaluate enzymatic and nonenzymatic antioxidant systems and oxidative damage of proteins, lipids, and DNA in the periosteum surrounding the bone fixations as well as in plasma and erythrocytes of patients treated for mandible fractures, compared to the control group.

2. Materials and Methods

2.1. Patients

The protocol of the study was approved by the Bioethics Committee of the Medical University of Bialystok, Poland (permission number R-I-002/3/2-16).

62 patients operated at the Department of Maxillofacial and Plastic Surgery, Medical University in Bialystok, Poland, were enrolled in the study. The study group included 31 previously implanted patients (11 women and 20 men aged 21–29, mean age: 24 years and 7 months) treated for mandibular fractures. The causes of the fractures in patients were beating (61.2%), sports (19.4%), traffic accident (12.9%), and fall from the stairs (6.5%). All patients were treated for bilateral fracture of the mandibular body. The fractured bone fragments in the mandible were fixed with two 4- or 6-hole miniplates and 4–6 screws (on the right and left side): in total 4 miniplates and 16–24 screws (MEDGAL Sp. z o.o., Księżyno, Poland).

Two months after implantation (every 2 weeks), and then, every month until the fixations were removed, the patients went to the hospital for follow-up examinations performed by one qualified surgeon (J.B.). In all patients from the study group, there were no signs of acute and chronic inflammation such as edema, inflammatory infiltration, purulent fistula, and redness of the mucous membrane or skin around the titanium fixations. In the physical examination, no enlargement of regional lymph nodes was also observed, which did not require specialized diagnostics in these group of patients. In the study group, there were also no clinical allergy signs like edema, changes on the skin, and mucous membranes.

The control group, selected by sex and age to match the study group, consisted of 31 generally healthy patients (11 women and 20 men aged 21–29, mean age: 24 years and 2 months) operated due to dentofacial deformities, whose periosteum and blood samples were taken immediately prior to the insertion of titanium implants.

2.1.1. Inclusion Criteria: Study Group

(i)Maxillary bone fixations after treatment for fractures of the mandibular body.

2.1.2. Inclusion Criteria: Control Group

(i)Generally healthy patients with dentofacial deformities before surgical treatment.

2.1.3. Inclusion Criteria: Study and Control Group

(i)Written informed consent for participation in the study,(ii)Age 21–29,(iii)18.5 ≤ BMI ≥ 24.5,(iv)No former treatment for bone fracture or jaw osteotomies performed with titanium fixations,(v)A noninflammation-induced healing process from insertion of fixations until their removal,(vi)No craniocerebral traumas (hematomas),(vii)Normal results of complete blood count (WBC 4.5–8.5 ×10³/μL; RBC 3.6–5.4 ×10¹²/L; HGB 12.0–16.0 g/dL; PLT 100–450 ×10⁹/L; hematocrit 36–54%) and biochemical blood tests (CRP 0.1–5 mg/L; Na⁺ 135.0–145.0 mmol/L; K⁺ 3.8–5.0 mmol/L; international normalized ratio (INR), 0.9–1.3; activated partial thromboplastin time (APTT), 37.0–46.0 sec; prothrombin time (PT), 12.0–18.0 sec),(viii)No systemic (insulin resistance, diabetes, hypertension, and coronary heart disease) and autoimmune disorders (psoriasis, multiple sclerosis, and rheumatoid arthritis), hyperlipidemia, liver, kidney, thyroid, lung, gastrointestinal and infectious (HCV and HIV infection) diseases, or gingivitis, periodontitis, and active odontogenic infection foci,(ix)Nonsmokers,(x)Nonalcohol drinkers,(xi)No intake of antibiotics, nonsteroidal anti-inflammatory drugs (NSAIDs), glucocorticosteroids, dietary supplements, and vitamins.

2.1.4. Exclusion Criteria: Study and Control Group

(i)Another type of mandibular fracture (singular fracture, fracture of mandibular ramus or condyle),(ii)Wounds of soft tissues, injury of the skull, brain, chest, abdomen, and extremities,(iii)Inflammatory complications and jaw synostosis disorders after implantation,(iv)Operations due to bone fractures in the past and for other reasons during the last year.

The clinical parameters of patients and control group are presented in Table 1.

Table 1: Clinical characteristics of patients with titanium mandibular fixations and healthy controls.

Serum/plasma
Control group
Study group

Mean
SD
Geometric mean
Lower 95% CI of mean
Upper 95% CI of mean
Mean
SD
Geometric mean
Lower 95% CI of mean
Upper 95% CI of mean

WBC ×10³/μL
7.530
1.958
7.278
6.841
8.219
6.917
1.709
6.756
6.315
13.232

RBC ×10⁶/μL
5.207
0.411
5.193
5.062
5.352
5.070
0.264
5.064
4.977
10.047

HGB g/dL
15.270
1.027
15.240
14.908
15.632
15.320
0.720
15.300
15.067
30.387

HCT %
45.230
2.630
45.160
44.304
46.156
45.550
2.123
45.510
44.803
90.353

MCV fL
87.140
3.817
87.070
85.796
88.484
89.630
3.549
89.570
88.381
178.011

MCHC g/dL
33.760
0.918
33.750
33.437
34.083
33.650
1.524
33.620
33.114
66.764

PLT ×10³/μL
230.700
43.800
227.100
215.282
246.118
228.300
23.380
227.300
220.070
448.370

PT s
12.230
0.624
12.220
12.010
12.450
11.660
0.699
11.640
11.414
23.074

INR
0.935
0.077
0.933
0.908
0.962
0.908
0.072
0.906
0.883
1.791

APTT s
27.640
1.468
27.610
27.123
28.157
26.780
3.809
26.550
25.439
52.219

Na⁺ mmol/L
140.700
1.890
140.700
140.035
141.365
139.800
1.184
139.800
139.383
279.183

K⁺ mmol/L
4.363
0.317
4.353
4.251
4.475
4.390
0.215
4.386
4.314
8.704

CRP mg/L
1.050
0.370
1.002
0.920
1.180
1.000
0.548
0.880
0.807
1.807

∗Statistical significance , study group versus control.

2.2. Surgical Procedure

All patients were operated by the same qualified maxillofacial surgeon (J.B.). Two months before the surgery, patients in both groups were on a diet (2000 kcal, including 55% carbohydrates, 30% fat, and 15% protein) determined by a dietician. Miniplates and screws were removed under local anaesthesia of 2% lignocaine and epinephrine (Polfa, Warsaw, Poland) from 3 to 8 months (approx. 5 months) after the surgery. The research material was a gray-pigmented periosteum adhering to the titanium miniplates excised as a standard procedure during the removal of mandibular bone fixations. In the control group, healthy periosteum was taken separately from the mandible during bimaxillary osteotomy before implantation of the miniplates and screws. Gray-pigmented periosteum was aseptic (data not shown). The tissues were immediately frozen upon collection in liquid nitrogen and stored at −80°C until assayed.

2.3. Blood (Plasma and Erythrocytes)

Before the surgery and after an overnight fast, 9 mL of venous blood samples were collected in plastic EDTA tubes (S-Monovette® K3 EDTA blood collection system, Sarstedt). To separate plasma samples and erythrocytes, the samples were centrifuged at 1500 ×g (4°C, 10 min; MPW 351, MPW Med. Instruments, Warsaw, Poland). Erythrocytes were washed three times in cold solution of 0.9% NaCl (w : v) and haemolysed by the addition of cold 50 mM phosphate buffer (pH 7.4) 1 : 9 (v : v) [10]. In order to prevent sample oxidation, 0.5 M butylated hydroxytoluene (Sigma-Aldrich, Germany; 100 μL/10 mL sample) was added [11]. All samples were stored at –80°C until use.

2.4. Tissue Homogenates

Before the biochemical determinations, fragments of periosteum were rinsed in ice-cold PBS (20 mM, pH 7.0), weighed and milled into small pieces that were homogenized on ice (Omni TH, Omni International, Kennesaw, GA, USA) in ice-cold PBS (1 : 15, w : v). 0.5 M butylated hydroxytoluene (10 μL/1 mL PBS) and the protease inhibitor (Complete Mini Roche, France; 1 tablet/10 mL PBS) were added to all the samples [12]. The tissue suspensions were sonicated on ice with an ultrasonic cell disrupter (UP 400S, Hielscher, Teltow, Germany; 1800 J/sample, 20 s x 3) and centrifuged (3500 ×g, 4°C, 20 min), and the resulting supernatants were analyzed on the same day.

2.5. Antioxidant Assays

Antioxidant enzymes (glutathione peroxidase (GPx), catalase (CAT), and superoxide dismutase-1 (SOD)) and total protein were analyzed in erythrocytes and tissue homogenates, while nonenzymatic antioxidants (reduced glutathione (GSH) and uric acid (UA)) and total protein were estimated both in plasma and tissue homogenates. The absorbance in all assays was measured with Infinite M200 PRO Multimode Microplate Reader, Tecan. The assays were performed in duplicates, except for the CAT (triplicate samples). Reagents for all the assays were obtained from Sigma-Aldrich, Germany (unless noted otherwise).

The activity of GPx (EC 1.11.1.9) was assessed colorimetrically by measuring the decrease in absorbance at 340 nm wavelength as a result of NADPH (chemically reduced form of nicotinamide adenine dinucleotide phosphate) oxidation. One unit of GPx activity was defined as the amount of the enzyme needed to catalyze the oxidation of 1 mmol NADPH per minute [13]. The results were expressed in units per mg of total protein.

The activity of CAT (EC 1.11.1.6) was determined colorimetrically by measuring the rate of hydrogen peroxide (H₂O₂) degradation at 240 nm [14]. One unit of CAT activity was defined as the amount of the enzyme needed to catalyze the decomposition of 1 mmol H₂O₂ per minute. CAT determination was performed in triplicate samples and the results were expressed in nmol H₂O₂ per mg of total protein.

The activity of SOD (EC 1.15.1.1) was analyzed colorimetrically by measuring the inhibition of adrenaline oxidation at 480 nm. One unit of SOD activity was defined as the amount of the enzyme needed to inhibit adrenaline oxidation by 50% [15]. The results were expressed as mU per mg of total protein.

The concentration of GSH was estimated colorimetrically by reaction with DTNB [5,5-dithiobis-(2-nitrobenzoic acid)] to obtain a product with absorption maximum at 412 nm [16]. The results were expressed as μg per mg of total protein.

The concentration of UA was measured colorimetrically at 490 nm by reaction with 2,4,6-tripyridyl-s-triazine using the commercial kit QuantiChromTM Uric Acid Assay Kit DIUA-250 (BioAssay Systems, Hayward, CA, USA). The results were expressed as μg per mg of total protein.

The concentration of total protein was determined colorimetrically using the commercial kit Thermo Scientific PIERCE BCA Protein Assay (Rockford, IL, USA) with bovine serum album as a standard.

2.6. Total Antioxidant/Oxidant Status

Total antioxidant/oxidant status (total antioxidant capacity (TAC), ferric reducing ability of plasma (FRAP), and total oxidant status (TOS)) and total protein content were analyzed both in the plasma and tissue homogenates. The absorbance in all assays was measured with Infinite M200 PRO Multimode Microplate Reader, Tecan. All assays were performed in duplicate samples, excluding the TAC and TOS determination (triplicate samples).

The concentration of TAC was estimated at 660 nm by ABTS + [2,2-azino-bis-(3-ethylbenzo-thiazoline-6-sulfonate)]-based colorimetric micromethod [17]. TAC determination was performed in triplicate samples, and the results were expressed as μmol Trolox equivalent per mg of total protein.

The concentration of TOS was estimated bichromatically (560/800 nm) based on the ferrous ion oxidation to ferric ion in the presence of oxidants in the sample [18]. TOS determination was performed in triplicate samples, and the results were expressed in μmol H₂O₂ equivalent per mg of total protein.

Oxidative stress index (OSI) was expressed in % according to the formula: OSI = TOS/TAC × 100% [19].

The concentration of FRAP was analyzed colorimetrically at 593 nm, measuring the ferric reducing ability of the sample by reaction with 2,4,6-tripyridyl-s-triazine [20]. The results were expressed in μmol per mg of total protein.

2.7. Oxidative Damage Determination

Oxidative damage products (advanced glycation end products (AGEs), advanced oxidation protein products (AOPP), 4-hydroxynonenal (4-HNE) protein adducts, and 8-hydroxydeoxyguanosine (8-OHdG)) and total protein content were analyzed both in plasma and tissue homogenates. The absorbance/fluorescence in all assays was measured with Infinite M200 PRO Multimode Microplate Reader, Tecan. All the assays were performed in duplicate samples.

The levels of AOPP were assessed colorimetrically at 340 nm by measuring the total iodide ion oxidizing capacity of the sample [21]. The results were expressed in μmol per mg of total protein.

The content of AGE was determined fluorimetrically at 350/440 nm in 1 : 5 diluted plasma samples and tissue homogenates [21]. The results were expressed in fluorescence per mg of total protein.

The concentration of 4-HNE protein adducts as well as 8-OHdG was measured with the commercial ELISA kit according to the manufacturer’s instructions (OxiSelect™ HNE Adduct Competitive ELISA, Cell Biolabs Inc., San Diego, CA, USA; USCN Life Science, Wuhan, China, resp.). The results were expressed in μg/pg per mg of total protein.

2.8. Statistical Analysis

Statistical analysis was performed using the Statistica 10.0 system (StatSoft, Cracow, Poland) and GraphPad Prism (GraphPad Software, La Jolla, USA). The D’Agostino-Pearson test and Shapiro-Wilk test were used to examine normal distribution. Since most of the data were normally distributed, the results were presented as a mean, standard deviations, geometric mean, and 95th confidence intervals of mean. In the case of normal distribution of the results, a Student’s t-test was used. In the lack of normal distribution of the results, the Mann–Whitney U test was used. The associations between the measured parameters were analyzed by Pearson’s correlation. The results were assumed to be statistically significant when .

3. Results

3.1. Antioxidant Defence

CAT activity was significantly lower in mandibular periosteum and considerably higher in erythrocytes of the study group compared to the control group. SOD activity was significantly higher in patients with a mandibular fracture compared to the controls, while no statistically relevant changes were observed in erythrocytes. The concentration of UA was significantly higher both in mandibular periosteum and plasma of the study group patients than in the controls. The activity of GPx in mandibular periosteum and erythrocytes and GSH concentration in mandibular periosteum and plasma showed similar values in patients in the study and control groups (Tables 2 and 3).

Table 2: Enzymatic and nonenzymatic antioxidants, antioxidant/oxidant status, and oxidative damage in the mandible (Man) of patients with titanium mandibular fixations and healthy controls.

Man
Control group
Study group

Mean
SD
Geometric mean
Lower 95% CI of mean
Upper 95% CI of mean
Mean
SD
Geometric mean
Lower 95% CI of mean
Upper 95% CI of mean

CAT nmol H₂O₂/min/mg protein
1.435
0.349
0.973
1.312
2.747
0.605∗
0.139
0.272
0.556
1.160

SOD mU/mg protein
136.500
20.240
119.400
129.375
265.875
282.000∗
44.750
175.200
266.247
548.247

GPx IU/mg protein
0.024
0.003
0.022
0.022
0.046
0.027
0.006
0.025
0.025
0.052

UA μg/mg protein
0.155
0.024
0.125
0.146
0.301
0.285∗
0.040
0.234
0.271
0.556

GSH μg/mg protein
1.496
0.299
1.178
1.391
2.887
1.121
0.242
0.810
1.036
2.157

TAC μmol/mg protein
67.420
9.123
57.140
64.209
131.629
252.700∗
35.150
204.000
240.327
493.027

TOS μmol H₂O₂ Equiv./mg protein
1.088
0.186
0.895
1.023
2.111
1.953
0.632
1.202
1.730
3.683

OSI %
1.956
0.406
1.441
1.813
3.769
1.188
0.337
1.340
1.069
2.257

FRAP μg/mg protein
20.100
3.496
11.540
18.869
38.969
28.660∗
4.034
22.820
27.240
55.900

AGE fluorescence/mg protein
91.410
13.390
77.730
86.697
178.107
197.500∗
22.010
174.400
189.752
387.252

AOPP μmol/mg protein
1.911
0.242
1.743
1.826
3.737
2.607∗
0.246
2.318
2.521
5.128

4-HNE μg/mg protein
234.900
43.450
210.700
219.605
454.505
405.000∗
42.540
377.300
390.025
795.025

8-OHdG pg/mg protein
52.340
8.200
46.890
49.454
101.794
71.160
11.740
64.010
67.027
138.187

Total protein mg/mL
3094.000
288.400
2964.000
2992.480
6086.480
1948.000∗
210.000
1145.000
1874.078
3822.078

4-HNE: 4-hydroxynonenal protein adducts; 8-OHdG: 8-hydroxydeoxyguanosine; AGE: advanced glycation end products; AOPP: advanced oxidation protein products; CAT: catalase; FRAP: ferric reducing ability of plasma; GPx: glutathione peroxidase; GSH: reduced glutathione; Man: mandible; OSI: oxidative stress index; SOD: superoxide dismutase-1; TAC: total antioxidant status; TOS: total oxidant status; UA: uric acid; statistical significance , study group versus control.

Table 3: Enzymatic and nonenzymatic antioxidants, antioxidant/oxidant status, and oxidative damage in the erythrocytes/plasma of patients with titanium mandibular fixations and healthy controls.

Erythrocytes/plasma
Control group
Study group

Mean
SD
Geometric mean
Lower 95% CI of mean
Upper 95% CI of mean
Mean
SD
Geometric mean
Lower 95% CI of mean
Upper 95% CI of mean

CAT nmol H₂O₂/min/mg protein
6.900
1.047
5.127
6.531
13.431
48.830∗
5.823
39.510
46.780
95.610

SOD mU/mg protein
153.600
7.930
149.600
150.809
304.409
154.800
11.270
145.500
150.833
305.633

GPx IU/mg protein
0.020
0.002
0.019
0.019
0.039
0.020
0.001
0.019
0.019
0.039

UA μg/mg protein
0.658
0.011
0.656
0.654
1.312
0.733∗
0.012
0.730
0.729
1.462

GSH μg/mg protein
0.687
0.178
0.517
0.625
1.312
0.463
0.044
0.410
0.447
0.910

TAC μmol/mg protein
49.570
7.384
44.020
46.971
96.541
37.680
6.483
26.780
35.398
73.078

TOS μmol H₂O₂ Equiv./mg protein
0.629
0.186
0.508
0.564
1.193
0.382
0.055
0.316
0.363
0.745

OSI %
1.318
0.282
1.128
1.219
2.537
1.902
0.551
1.181
1.708
3.610

FRAP μg/mg protein
13.580
3.186
11.750
12.458
26.038
10.990
3.239
6.285
9.850
20.840

AGE fluorescence/mg protein
526.000
30.420
507.700
515.292
1041.292
603.500
180.100
365.200
540.103
1143.603

AOPP umol/mg protein
0.497
0.049
0.452
0.479
0.976
0.506
0.054
0.439
0.487
0.994

4-HNE μg/mg protein
80.890
12.860
70.980
76.363
157.253
108.500
17.570
93.980
102.315
210.815

8-OHdG pg/mg protein
27.350
4.247
21.110
25.855
53.205
32.750∗
5.534
27.510
30.802
63.552

Total protein mg/mL
4444.000
109.400
4416.000
4405.490
8849.490
3445.000∗
213.300
2712.000
3369.916
6814.916

4-HNE: 4-hydroxynonenal protein adducts; 8-OHdG: 8-hydroxydeoxyguanosine; AGE: advanced glycation end products; AOPP: advanced oxidation protein products; CAT: catalase; FRAP: ferric reducing ability of plasma; GPx: glutathione peroxidase; GSH: reduced glutathione; OSI: oxidative stress index; SOD: superoxide dismutase-1; TAC: total antioxidant status; TOS: total oxidant status; UA: uric acid; statistical significance , study group versus control.

3.2. Total Antioxidant/Oxidant Status

There was a statistically significant increase in TAC level in the mandibular periosteum of patients in the study group compared to healthy controls. There was also a considerable increase in TOS in the posttraumatic mandibular periosteum of study group patients compared to the controls. The decreased OSI value in patients with mandibular fracture compared to the control group was also observed. The FRAP level in the mandibular periosteum of the study group patients was significantly higher than in the control group. No statistically relevant changes in plasma TAC, TOS, OSI, and FRAP between the groups were demonstrated (Tables 2 and 3).

3.3. Oxidative Damage Products

There was a statistically significant increase in AGE fluorescence in the mandibular periosteum of the study group compared to AGE fluorescence in the control group. AOPP concentration in the mandibular periosteum of the study group was considerably higher than in the control group. There was a statistically relevant increase in the level of 4-HNE in the mandibular periosteum of patients with mandibular fracture compared to healthy controls. The content of AGE, AOPP, 4-HNE, and 8-OHdG in plasma of the study and control group was similar. The concentration of 8-OHdG in the mandibular periosteum of the traumatic patients yielded similar values to those obtained in mandibular periosteum in the control group (Tables 2 and 3).

3.4. Correlations

The results of all statistically significant correlations are presented in Table 4. Importantly, we have demonstrated a positive correlation between TAC concentration in the mandibular periosteum and UA level in plasma of patients in the study group. In this group, TOS concentration in the mandibular periosteum was positively correlated with CAT activity in erythrocytes as well as 8-OHdG level in the mandibular periosteum with GPx activity in erythrocytes.

Table 4: Correlations of redox biomarkers in control group and patients with titanium mandibular fixations.

Control group

TOS Man
OSI Man
0.551
0.033

TAC Man
UA plasma
0.425
0.043

GPx erythrocytes
FRAP plasma
0.737
0.037

TAC plasma
GSH plasma
0.608
0.003

8-OHdG plasma
AOPP plasma
0.559
0.047

Study group

UA Man
FRAP Man
0.519
0.019

TAC Man
AGE Man
0.450
0.031

4-HNE Man
OSI Man
0.592
0.043

8-OHdG Man
AGE Man
0.883
0.000

TOS Man
OSI Man
0.567
0.034

AGE Man
GPx erythrocytes
0.574
0.025

TOS Man
CAT erythrocytes
0.515
0.043

8-OHdG Man
GPx erythrocytes
0.781
0.002

TAC Man
UA plasma
0.425
0.043

4-HNE Man
GSH plasma
0.662
0.019

GSH Man
GSH plasma
0.417
0.048

SOD erythrocytes
AGE plasma
0.470
0.020

TAC plasma
AOPP plasma
0.695
0.000

TOS plasma
AOPP plasma
0.529
0.000

TOS plasma
GSH plasma
0.645
0.002

8-OHdG plasma
GSH plasma
0.589
0.044

4-HNE: 4-hydroxynonenal protein adducts; 8-OHdG: 8-hydroxydeoxyguanosine; AGE: advanced glycation end products; AOPP: advanced oxidation protein products; CAT: catalase; FRAP: ferric reducing ability of plasma; GPx: glutathione peroxidase; GSH: reduced glutathione; Man: mandible; OSI: oxidative stress index; SOD: superoxide dismutase-1; TAC: total antioxidant status; TOS: total oxidant status; UA: uric acid.

4. Discussion

Our findings point to an increased occurrence of redox homeostasis disorders and oxidative stress in patients with mandible fractures treated surgically with titanium miniplates and screws. Although exposure to Ti6Al4V titanium alloy does not alter the clinical picture, the periosteum that contacted the titanium fixations of the mandible showed significantly higher concentrations of oxidation protein products and more extensive lipid modification compared to the control group. We also observed significant changes in the activity/concentration of enzymatic and nonenzymatic antioxidants in the periosteum as well as in the plasma and erythrocytes of the study group.

Titanium is widely used in many fields of medicine and dentistry due to its good biotolerance (biocompatibility) and its osseointegration ability to foster the contact thickening of bones [22]. Titanium and its alloys are used in the production of joint implants and external stabilizers as well as other metal components such as plates, clamps, screws, clips, dental implants, artificial valves, and vascular stents [22]. Their unique advantage is that they do not require removal for at least 20 years. Titanium miniplates and screws are also basic biomaterials used in the surgical treatment of mandibular fractures. One of the most commonly used titanium fixations in maxillofacial surgery is the Ti6Al4V alloy containing, in addition to titanium, 6% aluminium (Al) and 4% vanadium (V) [23]. Ti6Al4V demonstrates high mechanical strength and corrosion resistance due to the presence of a tight protective passive layer of titanium dioxide (TiO₂) on the surface of the alloy [9, 24]. It is believed that the passive layer effectively protects the surface of the implant from the effects of corrosive agents present in the environment of body fluids [25]. However, there are reports stating that in the period from the implantation to the exploitation of the biomaterial, the TiO₂ layer may be damaged, resulting in the release of metal ions (such as titanium, aluminium, or vanadium) into the surrounding tissues and organs [9]. In physiological conditions, the body content of these trace elements is very low. Corrosion of the implant, however, raises their concentration and may thus interfere with the process of their natural degradation. The local interaction of metal ions or products of the corrosion of metallic materials with the body tissues is referred to as metallosis [26].

The mandible is the only moving bone of the facial part of the skull. In patients with titanium implants, mandibular movements triggered by strong muscles cause micromovements of the fixed bone fragments, which increases the friction between the miniplates and the screws. This phenomenon is responsible for the corrosion of titanium fixations and the release of titanium ions to the tissues/organs surrounding the implants [3]. In our investigation, the deposition of titanium particles in the study group was observed in the form of gray periosteal discolourations adjacent to the titanium miniplates and screws (data not shown). Importantly, none of the patients had any symptoms of chronic and acute inflammation or healing disorders at the site of the fracture. All patients had their metal implants removed exclusively for reasons not connected to a health risk. Indeed, the most common reason for the removal of miniplates and screws (14 patients) was the desire to get rid of nonfunctional implants in order to avoid future reactions to a foreign body and to eliminate the risk of artefacts causing problems in the interpretation of CT and MRI.

Titanium belongs to the group of biocompatible elements that usually do not cause negative bodily reactions. However, in some people, titanium triggers allergic symptoms (local eczema, rush, and pruritus) [27] and is responsible for the periapical reaction (in the implant-tissue interlayer), which may lead to the destabilization of implants [28]. However, the mechanisms of titanium toxicity in the body are still not well known. Titanium is believed to be responsible for an increased production of oxygen-free radicals and RNS [9, 29]. This element may thus contribute to the induction of oxidative stress as well as structural and functional damage of the cells by the oxidation reaction. Oxidative stress results from overproduction of ROS and/or inadequate activity of the body’s antioxidant systems [8, 30]. The products of the oxidative modification of proteins, lipids, and nucleic acids that emerge due to oxidative stress are directly responsible for the damage to the tissues and organs of the body [8]. A significant role in the prevention of oxidative stress is attributed to enzymatic (CAT, SOD, and GPx) and nonenzymatic antioxidants (e.g., UA, reduced glutathione, and vitamin C). These compounds inhibit the formation of free oxygen radicals and/or participate in their conversion into nonreactive derivatives [31]. The antioxidant enzymes are characterized by a greater selectivity of action, while the remaining antioxidants scavenge free radicals in a nonselective manner and/or interrupt the oxidation reaction in the cell [32]. Additionally, nonenzymatic antioxidants may affect the activity of antioxidant enzymes so that the action of one group of antioxidants depends on the other and vice versa [33]. SOD is responsible for the dismutation of the superoxide anion to hydrogen peroxide, which is then broken down by CAT and GPx enzymes. An important role in the defence against free radical overproduction is also carried out by UA, the main blood antioxidant, which constitutes 70–80% of the total antioxidant capacity [34].

The increased activity/concentration of antioxidants (↑SOD, ↑UA, ↑TAC, and ↑FRAP) in the mandibular periosteum of patients with titanium mandibular fixations, compared to the controls, suggests an adaptive reaction of the body in response to excessive ROS production (↑TOS) due to exposure to Ti6Al4V titanium alloy and its wear products. As Wang et al. [25] demonstrated, titanium ions released from implants may stimulate phagocytes (mainly macrophages) and osteoclasts to produce increased amounts of ROS and RNS. By participating in phagocytosis, they can also increase the activity of NADPH oxidase (NOX) [35] which is the main source of free radicals in the cell. High concentrations of ROS can initiate inflammation at the implantation site (by increasing the production of proinflammatory cytokines), which additionally (by positive feedback) increases the production of free oxygen radicals [5, 9, 29]. In our study, the induction of antioxidant defence mechanisms was observed not only in the periosteum but also in the plasma (↑UA) and erythrocytes (↑CAT) of the patients in the study group. These changes point not only to redox imbalances in the implantation site (mandibular periosteum) but also to systemic disorders (blood). A positive correlation found between TAC levels in the mandibular periosteum and the UA concentration in the plasma in the patients from the study group may indicate a relationship between the local and the central antioxidant response. These observations, however, require further research, especially on a larger number of patients with titanium mandibular fixations. The assessment of white cell populations and cytokines produced by oxidative stress may also be helpful for clarifying the systemic etiology of redox imbalance in these patients.

Interestingly, we have observed a significantly lower CAT activity in the periosteum of the patients in the study group versus healthy controls. The decrease in CAT activity may be explained by the exhaustion of the ability to neutralize hydrogen peroxide in the conditions of an overproduction of this tissue. In patients with titanium fixations of the mandible, a higher production of H₂O₂ may occur as the direct effect of titanium on the periosteal cells [5, 6, 33] or due to an increase in SOD activity that produces a large amount of hydrogen peroxide as a by-product of the dismutation reaction. This is confirmed by the results of our study (↑SOD in the mandible of the patients in the study group) and may be partially explained by the lack of changes in GPx specific activity.

Despite the increased defence capacity of the antioxidant systems (↑SOD, ↑UA, ↑TAC, and ↑FRAP), we can observe an increased oxidative damage of proteins (↑AGE and ↑AOPP) and lipids (↑4-HNE) in the mandibular periosteum contacting Ti6Al4V titanium alloy. These changes suggest that the body is not able to protect itself effectively against oxidative stress and free radical damage of cells at the site of implantation of miniplates and screws. Importantly, the observed increase in oxidative stress biomarkers did not depend on the time span between osteosynthesis and the removal of the mandibular fixations.

Redox balance disorders as well as products of oxidative damage to the cell components can have a negative impact on the bone remodelling process in patients with mandibular fractures [9, 36]. The proper healing of a fracture depends on the recruitment and differentiation of osteoprogenitor cells towards osteoblasts and osteoclasts. Therefore, this process depends on the production of components of the extracellular matrix of the bone, particularly collagen proteins [37]. It is well known that bone tissue, periosteum, bone marrow, and surrounding soft tissues are involved in the healing of bone fractures; however, a particular role is attributed to the periosteum [38, 39]. Microscopically, the periosteum consists of two layers: the external fibrous layer and the inner layer adhering to the bone (cambium) [40, 41]. In the outer fibrous layer, two sublayers can be distinguished: a superficial layer containing mainly collagen fibers with fibroblasts, which is rich in blood vessels and nerve fibers, and a deeper layer containing a lot of elastic fibers and collagen, a small number of cells and blood vessels. The outer fibrous layer provides elasticity and flexibility [40, 41]. The cambial layer (cambium) is composed of 3-4 cell layers of mainly osteoblasts and preosteoblastic cells and has osteogenic properties. This layer is responsible for the appearance of lamellar bone during growth and creation of woven bone after a fracture [40–42]. In our investigation, all the patients in the study group were treated surgically using an anatomical setting of bone fragments with miniplates and screws. In the case of surgical treatment of fractures, little or no periosteal response is observed [38, 39]. Therefore, it may be assumed that the observed periosteal changes are mainly caused by exposure to titanium implants after fractures.

Oxidative damage to proteins and lipids that occurs due to the overproduction of ROS is responsible for the structural and functional changes of these biomolecules, and this in turn disrupts normal cellular and tissue homeostasis [36, 43]. Titanium ions and cytokines released by macrophages under the influence of the products of titanium implants degradation cause the generation and activation of fibroblasts and osteoclasts, stimulating osteolysis processes [44, 45]. They may also induce genomic instability in human fibroblast cells, which is of particular importance in young people [26], and can inhibit type I collagen synthesis by osteoblasts [46]. In the case of fracture healing, this condition may lead to an inadequate formation of the organic matrix of the bone and thus impair its biomechanical properties. As shown by Sheikhi et al. [47], oxidized lipids lead to osteoblastogenesis and simultaneously stimulate osteoclast activity.

We did not detect oxidative damage to the cell components in the plasma and erythrocytes of the study group patients, which indicates that, excluding the implantation site, the body is capable of preventing free radical damage caused by oxidative stress. A positive correlation between TOS Man and CAT erythrocytes as well as 8-OHdG Man and GPx erythrocytes proves that there is a correlation between the increased oxidative damage in the mandibular periosteum and the central redox disorders in patients with titanium miniplates and screws.

In conclusion, we have demonstrated the occurrence of redox imbalance as well as oxidative damage in the periosteum surrounding the Ti6Al4V titanium alloy. Changes in antioxidant efficiency in the patients treated with titanium implants were also observed in the plasma/erythrocytes, which proves both local and systemic influence of titanium on the human body. The obtained results indicate the need to improve the miniplates and screws used for osteosynthesis by increasing the thickness of the passive TiO₂ layer or using new, biodegradable, and biocompatible materials (for instance based on magnesium and its alloys). Supplementation with antioxidants would also be helpful in patients treated with titanium fixations; however, further research is needed in this area.

Our work, apart from the undoubted advantages (careful selection of the group of young people (aged 21–29) with similar types of jaw fractures), also had some limitations. We evaluated only the most commonly used biomarkers of oxidative stress; therefore, the assessment of other parameters may lead to different observations and conclusions. It should also be borne in mind that changes in antioxidant defence as well as increased generation of the products of oxidative damage of proteins and lipids may indicate not only the body’s response to the introduction of titanium miniplates and screws but also an ongoing callus remodelling in the course of mandibular fracture healing and the related increased protein metabolism.

Conflicts of Interest

Authors declare no conflict of interest.

Acknowledgments

This work was supported by the Medical University of Bialystok, Poland (Grant nos. N/ST/ZB/17/001/1109, N/ST/ZB/17/002/1109, N/ST/ZB/17/003/1109, N/ST/ZB/17/004/1109, and N/ST/MN/16/002/1109).

References

M. A. Kuriakose, M. Fardy, M. Sirikumara, D. W. Patton, and A. W. Sugar, “A comparative review of 266 mandibular fractures with internal fixation using rigid (AO/ASIF) plates or mini-plates,” The British Journal of Oral & Maxillofacial Surgery, vol. 34, no. 4, pp. 315–321, 1996.

J. O’Connell, C. Murphy, O. Ikeagwuani, C. Adley, and G. Kearns, “The fate of titanium miniplates and screws used in maxillofacial surgery: a 10 year retrospective study,” International Journal of Oral and Maxillofacial Surgery, vol. 38, no. 7, pp. 731–735, 2009.

J. Borys, M. Maciejczyk, A. J. Krętowski et al., “The redox balance in erythrocytes, plasma, and periosteum of patients with titanium fixation of the jaw,” Frontiers in Physiology, vol. 8, 2017.

G. Voggenreiter, S. Leiting, H. Brauer et al., “Immuno-inflammatory tissue reaction to stainless-steel and titanium plates used for internal fixation of long bones,” Biomaterials, vol. 24, no. 2, pp. 247–254, 2003.

K. Peters, R. E. Unger, A. M. Gatti, E. Sabbioni, R. Tsaryk, and C. J. Kirkpatrick, “Metallic nanoparticles exhibit paradoxical effects on oxidative stress and pro-inflammatory response in endothelial cells in vitro,” International Journal of Immunopathology and Pharmacology, vol. 20, no. 4, pp. 685–695, 2007.

D. G. Olmedo, D. R. Tasat, P. Evelson, M. B. Guglielmotti, and R. L. Cabrini, “Biological response of tissues with macrophagic activity to titanium dioxide,” Journal of Biomedical Materials Research Part A, vol. 84A, no. 4, pp. 1087–1093, 2008.

M.-C. Lee, F. Yoshino, H. Shoji et al., “Characterization by electron spin resonance spectroscopy of reactive oxygen species generated by titanium dioxide and hydrogen peroxide,” Journal of Dental Research, vol. 84, no. 2, pp. 178–182, 2005.

M. Valko, D. Leibfritz, J. Moncol, M. T. D. Cronin, M. Mazur, and J. Telser, “Free radicals and antioxidants in normal physiological functions and human disease,” The International Journal of Biochemistry & Cell Biology, vol. 39, no. 1, pp. 44–84, 2007.

R. Tsaryk, M. Kalbacova, U. Hempel et al., “Response of human endothelial cells to oxidative stress on Ti6Al4V alloy,” Biomaterials, vol. 28, no. 5, pp. 806–813, 2007.

M. Choromańska, A. Klimiuk, P. Kostecka-Sochoń et al., “Antioxidant defence, oxidative stress and oxidative damage in saliva, plasma and erythrocytes of dementia patients. Can salivary AGE be a marker of dementia?” International Journal of Molecular Sciences, vol. 18, no. 10, p. 2205, 2017.

U. Kolodziej, M. Maciejczyk, A. Miasko et al., “Oxidative modification in the salivary glands of high fat-diet induced insulin resistant rats,” Frontiers in Physiology, vol. 8, 2017.

U. Kołodziej, M. Maciejczyk, W. Niklińska et al., “Chronic high-protein diet induces oxidative stress and alters the salivary gland function in rats,” Archives of Oral Biology, vol. 84, pp. 6–12, 2017.

D. E. Paglia and W. N. Valentine, “Studies on the quantitative and qualitative characterization of erythrocyte glutathione peroxidase,” The Journal of Laboratory and Clinical Medicine, vol. 70, no. 1, pp. 158–169, 1967.

H. Aebi, “[13] Catalase in vitro,” Methods in Enzymology, vol. 105, pp. 121–126, 1984.

H. P. Misra and I. Fridovich, “The role of superoxide anion in the autoxidation of epinephrine and a simple assay for superoxide dismutase,” The Journal of Biological Chemistry, vol. 247, no. 10, article 4623845, pp. 3170–3175, 1972.

M. S. Moron, J. W. Depierre, and B. Mannervik, “Levels of glutathione, glutathione reductase and glutathione S-transferase activities in rat lung and liver,” Biochimica et Biophysica Acta (BBA) - General Subjects, vol. 582, no. 1, pp. 67–78, 1979.

O. Erel, “A novel automated direct measurement method for total antioxidant capacity using a new generation, more stable ABTS radical cation,” Clinical Biochemistry, vol. 37, no. 4, pp. 277–285, 2004.

O. Erel, “A new automated colorimetric method for measuring total oxidant status,” Clinical Biochemistry, vol. 38, no. 12, pp. 1103–11111, 2005.

M. Knaś, M. Maciejczyk, K. Sawicka et al., “Impact of morbid obesity and bariatric surgery on antioxidant/oxidant balance of the unstimulated and stimulated human saliva,” Journal of Oral Pathology & Medicine, vol. 45, no. 6, pp. 455–464, 2016.

I. F. F. Benzie and J. J. Strain, “The ferric reducing ability of plasma (FRAP) as a measure of “antioxidant power”: the FRAP assay,” Analytical Biochemistry, vol. 239, no. 1, pp. 70–76, 1996.

M. Kalousová, J. Skrha, and T. Zima, “Advanced glycation end-products and advanced oxidation protein products in patients with diabetes mellitus,” Physiological Research, vol. 51, no. 6, pp. 597–604, 2002.

R. Branemark, P.-I. Branemark, B. Rydevik, and R. R. Myers, “Osseointegration in skeletal reconstruction and rehabilitation: a review,” Journal of Rehabilitation Research and Development, vol. 38, no. 2, pp. 175–181, 2001.

Z. Cai, T. Shafer, I. Watanabe, M. E. Nunn, and T. Okabe, “Electrochemical characterization of cast titanium alloys,” Biomaterials, vol. 24, no. 2, pp. 213–218, 2003.

P. Tengvall, H. Elwing, L. Sjöqvist, I. Lundström, and L. M. Bjursten, “Interaction between hydrogen peroxide and titanium: a possible role in the biocompatibility of titanium,” Biomaterials, vol. 10, no. 2, pp. 118–120, 1989.

J. Wang, G. Zhou, C. Chen et al., “Acute toxicity and biodistribution of different sized titanium dioxide particles in mice after oral administration,” Toxicology Letters, vol. 168, no. 2, pp. 176–185, 2007.

N. Coen, M. A. Kadhim, E. G. Wright, C. P. Case, and C. E. Mothersill, “Particulate debris from a titanium metal prosthesis induces genomic instability in primary human fibroblast cells,” British Journal of Cancer, vol. 88, no. 4, pp. 548–552, 2003.

M. Goutam, C. Giriyapura, S. K. Mishra, and S. Gupta, “Titanium allergy: a literature review,” Indian Journal of Dermatology, vol. 59, no. 6, p. 630, 2014.

A. Tawse-Smith, S. Ma, A. Siddiqi, W. J. Duncan, L. Girvan, and H. M. Hussaini, “Titanium particles in peri-implant tissues: surface analysis and histologic response,” Clinical Advances in Periodontics, vol. 2, no. 4, pp. 232–238, 2012.

M. Kalbacova, S. Roessler, U. Hempel et al., “The effect of electrochemically simulated titanium cathodic corrosion products on ROS production and metabolic activity of osteoblasts and monocytes/macrophages,” Biomaterials, vol. 28, no. 22, pp. 3263–3272, 2007.

M. Maciejczyk, B. Mikoluc, B. Pietrucha et al., “Oxidative stress, mitochondrial abnormalities and antioxidant defense in ataxia-telangiectasia, bloom syndrome and Nijmegen breakage syndrome,” Redox Biology, vol. 11, pp. 375–383, 2017.

A. M. Pisoschi and A. Pop, “The role of antioxidants in the chemistry of oxidative stress: a review,” European Journal of Medicinal Chemistry, vol. 97, pp. 55–74, 2015.

T. Konopka, A. Gmyrek-Marciniak, Z. Kozłowski, U. Kaczmarek, and J. Wnukiewicz, “Antioxidative potential of saliva with peridontitis and squamous cell carcinoma of lower oral cavity,” Dental and Medical Problems, vol. 43, pp. 354–362, 2006.

P. Żukowski, M. Maciejczyk, and D. Waszkiel, “Sources of free radicals and oxidative stress in the oral cavity,” Archives of Oral Biology, vol. 92, pp. 8–17, 2018.

M. Knaś, M. Maciejczyk, D. Waszkiel, and A. Zalewska, “Oxidative stress and salivary antioxidants,” Dental and Medical Problems, vol. 50, pp. 461–466, 2013.

A. Federico, F. Morgillo, C. Tuccillo, F. Ciardiello, and C. Loguercio, “Chronic inflammation and oxidative stress in human carcinogenesis,” International Journal of Cancer, vol. 121, no. 11, pp. 2381–2386, 2007.

F. Wauquier, L. Leotoing, V. Coxam, J. Guicheux, and Y. Wittrant, “Oxidative stress in bone remodelling and disease,” Trends in Molecular Medicine, vol. 15, no. 10, pp. 468–477, 2009.

J. Borys, S. Z. Grabowska, B. Antonowicz, D. Dryl, A. Citko, and F. Rogowski, “Collagen type I and III metabolism in assessment of mandible fractures healing,” Roczniki Akademii Medycznej w Bialymstoku, vol. 49, pp. 237–245, 2004.

R. Dimitriou, E. Tsiridis, and P. V. Giannoudis, “Current concepts of molecular aspects of bone healing,” Injury, vol. 36, no. 12, pp. 1392–1404, 2005.

T. A. Einhorn, “The cell and molecular biology of fracture healing,” Clinical Orthopaedics and Related Research, vol. 355S, article 9917622, pp. S7–S21, 1998.

J. R. Dwek, “The periosteum: what is it, where is it, and what mimics it in its absence?” Skeletal Radiology, vol. 39, no. 4, pp. 319–323, 2010.

G. Augustin, A. Antabak, and S. Davila, “The periosteum. Part 1: anatomy, histology and molecular biology,” Injury, vol. 38, no. 10, pp. 1115–1130, 2007.

Y. V. Kuzenko, A. M. Romaniuk, and D. Horobchenko, “Periodontitis and atherosclerosis – mechanisms of association through matrix metalloproteinase 1 expression,” Dental and Medical Problems, vol. 51, pp. 187–192, 2014.

B. Halliwell, M. V. Clement, and L. H. Long, “Hydrogen peroxide in the human body,” FEBS Letters, vol. 486, no. 1, pp. 10–13, 2000.

S. Y. Yang, B. Wu, L. Mayton et al., “Protective effects of IL-1Ra or vIL-10 gene transfer on a murine model of wear debris-induced osteolysis,” Gene Therapy, vol. 11, no. 5, pp. 483–491, 2004.

T. Koreny, M. Tunyogi-Csapó, I. Gál, C. Vermes, J. J. Jacobs, and T. T. Glant, “The role of fibroblasts and fibroblast-derived factors in periprosthetic osteolysis,” Arthritis and Rheumatism, vol. 54, no. 10, pp. 3221–3232, 2006.

C. Vermes, R. Chandrasekaran, J. J. Jacobs, J. O. Galante, K. A. Roebuck, and T. T. Glant, “The effects of particulate wear debris, cytokines, and growth factors on the functions of MG-63 osteoblasts,” The Journal of Bone and Joint Surgery, vol. 83, no. 2, pp. 201–211, 2001.

M. Sheikhi, R. K. L. Bouhafs, K.-J. Hammarstrom, and C. Jarstrand, “Lipid peroxidation caused by oxygen radicals from Fusobacterium-stimulated neutrophils as a possible model for the emergence of periodontitis,” Oral Diseases, vol. 7, no. 1, pp. 41–46, 2001.