Pulmonary Medicine

Volume 2012 (2012), Article ID 657180, 7 pages

doi:10.1155/2012/657180

Clinical Study

Do We Need Exercise Tests to Detect Gas Exchange Impairment in Fibrotic Idiopathic Interstitial Pneumonias?

Benoit Wallaert,¹ Lidwine Wemeau-Stervinou,¹ Julia Salleron,² Isabelle Tillie-Leblond,¹ and Thierry Perez1,3

¹Clinique des Maladies Respiratoires, Centre de Compétence des Maladies Pulmonaires Rares, Hopital Calmette, Lille 2 University Boulevard Leclercq, CHRU, 59037 Lille, France

²Unité de Biostatistiques, CHRU, 59037 Lille, France

³Service d’Explorations Fonctionnelles Respiratoires, Hopital Calmette, CHRU, 59037 Lille, France

Received 24 March 2012; Accepted 14 May 2012

Academic Editor: Marc A. Judson

Copyright © 2012 Benoit Wallaert et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

In patients with fibrotic idiopathic interstitial pneumonia (f-IIP), the diffusing capacity for carbon monoxide (DLCO) has been used to predict abnormal gas exchange in the lung. However, abnormal values for arterial blood gases during exercise are likely to be the most sensitive manifestations of lung disease. The aim of this study was to compare DLCO, resting PaO₂, P(A-a)O₂ at cardiopulmonary exercise testing peak, and oxygen desaturation during a 6-min walk test (6MWT). Results were obtained in 121 patients with idiopathic pulmonary fibrosis (IPF, ) and fibrotic nonspecific interstitial pneumonias (NSIP, ). All but 3 patients (97.5%) had low DLCO values (<LLN) whereas only 66.6% had low KCO; 42 patients (65%) exhibited resting hypoxemia (<75 mmHg); 112 patients (92.5%) exhibited a high P[(A-a)O₂], peak (>35 mmHg) and 100 (83%) demonstrated significant oxygen desaturation during 6MWT (>4%). Interestingly 27 patients had low DLCO and normal P(A-a)O₂, peak and/or no desaturation during the 6MWT. The 3 patients with normal DLCO also had normal PaO₂, normal P(A-a)O₂, peak, and normal oxygen saturation during 6MWT. Our results demonstrate that in fibrotic IIP, DLCO better defines impairment of pulmonary gas exchange than resting PaO₂, exercise P(A-a)O₂, peak, or 6MWT SpO₂.

1. Introduction

According to the ATS/ERS statement, fibrotic interstitial idiopathic pneumonia (f-IIP) includes idiopathic pulmonary fibrosis (IPF) and fibrotic nonspecific interstitial pneumonia (f-NSIP) [1–4]. Although pathological abnormalities are quite different between these two diseases [5], alteration of gas exchange is a major abnormality which is thought to reflect the severity of fibrotic process [6].

Given the simplicity of pulmonary function testing, many investigators have examined the potential for simple resting physiologic measurements to stratify disease severity. The classic physiologic findings in the fibrotic IIP include a reduction in lung volumes (vital capacity; total lung capacity), a reduction in carbon monoxide diffusing capacity (DLCO), and hypoxemia that worsens with exercise [2]. Evaluation of gas exchange impairment can be performed in clinical practice by simple tests like DLCO, resting PaO₂, and P(A-a)O₂, measurement of SpO₂ during a 6-min walk test (6MWT) or PaO₂ and alveolar-arterial oxygen pressure difference P(A-a)O₂ during cardiopulmonary exercise testing (CPET).

Whereas DLCO is a valuable tool in the assessment of the efficiency of pulmonary gas exchange, the P(A-a)O₂, especially during exercise, is thought to better reflect the normality of respiratory gas exchange [8, 9]. In addition exercise-induced gas exchange can also be readily identified by simple testing such as the 6MWT [10].

To the best of our knowledge, comparison of all the various methods to detect pulmonary gas exchange abnormalities has never been performed. Previous studies compared DLCO and P(A-a)O₂ in a small number of IPF patients but did not include 6MWT [9, 11] or analysed 6MWT oxygen desaturation but did not include analysis of exercise PaO₂ or P(A-a)O₂ [12, 13]. With this in mind we performed a retrospective analysis of resting and exercise tests in 138 consecutive patients with IPF or f-NSIP.

2. Patients and Methods

One hundred and thirty eight caucasian patients with a diagnosis of IPF or f-NSIP were consecutively referred for evaluation of dyspnea and CPET at the time of diagnosis or during followup, over a period of six years. Inclusion criteria consisted of diagnosis of IPF according to the American Thoracic Society/European Respiratory Society guidelines and/or histopathological evidence for usual interstitial pneumonia, or diagnosis of f-NSIP (radiographic or histopathological diagnosis) [1, 2]. Patients were not included if they had another pulmonary disease (including obstructive disease), left heart failure or a history of pulmonary embolism. Connective tissue diseases were ruled out. No acute exacerbation was observed in the three months preceding inclusion. Seventeen patients were excluded from the study because CPET was not performed (arthrosis). Therefore 121 patients (31 females, 90 males) were included. In 44 out of the 88 IPF patients and 20 out of the 33 patients with f-NSIP, diagnosis was confirmed by histopathological examination of lung biopsy. At the time of inclusion in the study, a majority of patients (76%) were not treated, 19 patients received corticosteroids, 12 patient received azathioprine, and 3 patients received mycophenolate mofetil. Clinical data and results of pulmonary function tests, 6MWT, and of CPET were collected. Only initial data were recorded when the patient was seen several times. Approval for the use of these data was provided by the Institutional Review Board of the French learned society for respiratory medicine (CEPRO 2011-039).

3. Pulmonary Function Tests

Forced vital capacity (FVC), forced expiratory volume in 1 second (FEV₁), and total lung capacity (TLC) were measured by spirometry and plethysmography with a Jaeger-Master lab cabin. Single-breath diffusing capacity of the lung for carbon monoxide (DLCO: mLCO·min⁻¹·mmHg⁻¹) and carbon monoxide transfer coefficient (KCO = DLCO/alveolar volume) were measured. DLCO was corrected for hemoglobin concentration in g·dL⁻¹, according to Cotes’ equation: corrected (Hb) DLCO = DLCO × (10.2 + Hb)/(1.7 × Hb). Values were expressed as percentages of the predicted normal values calculated according to gender, weight, and age. Reference equations for spirometry were taken from ERS for lung volumes and DLCO [14, 15]. Following ATS/ERS 2005 guidelines, the lower limits of normal (LLN) were set at the level of 5th percentile (or predicted minus 1.64 SD) of each reference population [16]. Results were conventionally expressed as percent predicted.

The 6MWT was performed in accordance with international recommendations [17] and was designed to ensure an accurate assessment of oxygen desaturation Patients were instructed as follows: “The object of this test is to walk as quickly as you can for 6 minutes to cover as much ground as possible. You may slow down if necessary. If you stop we wish you to continue the walk again as soon as possible. Your goal is to walk as fast and as far as you can in 6 minutes.” [18]. The pulse oximeter was lightweight, battery powered, and held in place by a “fanny pack” so that the patient does not have to hold or stabilize it. We evaluated the oxygen saturation at rest and the lowest saturation during the test. A desaturation ≥4% was considered as significant [2].

CPET was carried out using a standardized protocol as previously described [19] and consisted of a triangular test, carried out on an ergometric bicycle (Ergoline-Ergometrics 800). Briefly the expired gases were determined in each cycle with an Ergocard. During exercise, heart rate (HR) was monitored continually by 12-lead ECG and arterial oxygen saturation (SpO₂) was measured by pulse oximetry with a Nellcor N-395 apparatus. Arterial blood samples were obtained from a small catheter placed in the radial artery under local anesthesia. Measurements of PaO₂ and PaCO₂ were performed on room air at rest and at peak exercise. Normal values for PaO₂ were derived from Sorbini et al. [20]. The alveolar-arterial gradient in oxygen [P(A-a)O₂] was calculated from the alveolar gas equation. According to ATS statement, [P(A-a)O₂], peak >35 mmHg was considered as abnormal [21]. Exercise pulmonary gas exchange variables were either related or not related to the metabolic demand (VO₂), that is, peak exercise-rest (Δ) [19, 22]. The modified Bohr equation was used to calculate dead space to tidal volume ratio (VD/VT). Predicted values were calculated from reference equations [22, 23]. Poor motivation was not a factor interfering with our analysis as suggested by the fact that all of the patients had one or more of the following criteria: breathing reserve less than 15%, peak HR more than 90% of predicted, peak lactate more than 7 mEq/L, peak exercise PaO₂ less than 55 mmHg or peak VE/VO₂ more than 35or RER >1.15 [24, 25].

4. Statistical Analysis

After certification of normal distribution, data are reported as mean ± SD. Student’s t-test was used to determine differences between IPF and f-NSIP. Differences in proportions were assessed by χ2 tests. Correlations were analysed using Spearman’s rank correlation test. All statistical analysises were carried out with GraphPad Prism 4.0 software (San Diego, Calif, USA). Values of were considered significant.

5. Results

Characteristics of the population are summarized in Table 1. The overall population consisted of 90 men and 31 women with a mean age of years: 88 patients had a diagnostic of IPF and 33 of f-NSIP. Pulmonary function tests results are shown in Tables 1 and 2. As expected, we observed a reduction in TLC, VC, and FEV₁, a reduced DLCO and KCO. DLCO was reduced to a greater extent than the lung volumes: 45 out of 121 patients (37%) showed a normal FVC and 24% a normal TLC despite a low DLCO.

Table 1: Pulmonary function tests results.

All patients
IPF
f-NSIP

n = 121
n = 88
n = 33

Age
63.6  8.4
64.3  8.3
61.6  8.5

BMI
28.4  4.4
28.2  4.1
29.1  5.1

TLC (L)
4.35  1
4.39  1.01
4.23  1

TLC (%)
70  14.5
69.4  14.6
73  13.9

% with low TLC
76
82
62

FVC (L)
2.72  0.74
2.77  0.72
2.61  0.8

FVC (%)
76  16
75.5  16.9
77.2  13.6

% with low FVC
61
58
65

FEV₁ (L/sec)
2.24  0.58
2.26  0.57
2.12  0.6

FEV₁ (%)
78.5  16.4
78.4  17.2
78.8  14.1

% with low FEV₁
55
52
62

DLCO (mLCO·min⁻¹·mmHg⁻¹)
11.2  4
11.17  4.4
11.3  3.2

DLCO (%)
42.9  12.3
41.9  12.5
45.6  11.6

% with low DLCO
98
98
97

KCO (mLCO·min⁻¹·mmHg⁻¹/L)
2.99  0.76
2.92  0.77
3.2  0.7

KCO (%)
71.3  17
70.3  17.7
74.2  3.7

% with low KCO
66.6
70
56

PaO₂, rest (mmHg)
76.8  12.6
75.9  12.8
79.4  12

% with low PaO₂
42
46
31

P(A-a) O₂, rest (mmHg)
30.8  12.5
31.4  12.6
29.2  12.2

% with low P(A-a) O₂, rest
26
30
16

Table 2: Cardiopulmonary exercise testing and walking test results.

All patients
IPF
f-NSIP

n = 121
n = 88
n = 33

Workload, peak (Watts)
81.4  24
82.5  23.7
78.3  25.9

Workload, peak (%)
71.3  9.9
61.2  18.8
67.2  24.8

VO₂, peak (mL/Kg/min)
15.9  3.9
15.9  3.6
15.9  4.6

VO₂, peak (%)
66.5  15.7
66  15
67.8  17.7

% low VO2, peak (%)
84
87
80

PaO₂, peak (mmHg)
57.9  13
56.6  12.9
61.6  12.6

ΔPaO₂ (mmHg)
18.9  8.3
19.4  8.5
17.6  7.8

P(A-a)O₂, peak (mmHg)
58.1  13
58.9  13.2
61.7  12.7

% with high P(A-a)O₂, peak
92.5
95
84

ΔP(A-a)O₂/ΔVO₂ (mmHg/L)
34.2  16.9
34.4  17.1
33.6  16.7

% with high ΔP(A-a)O₂/ΔVO₂
83
82
84

VD/VT, peak
0.43  0.09
0.44  0.09
0.39  0.08*

Walk test, distance (m)
388  102
393  98
375  114

Walt test, nadir SaO₂ (%)
86  5.7
85.6  6
88.3  4.6

Walk test, ΔSaO₂ (%)
9.2  4.7
9.7  5
7.9  3.7

% with ΔSaO₂ ≥4%
83
83
84

*Significantly different from IPF group (P = 0.01).

All but 3 Patients (97.5%) had low DLCO values (<LLN, corresponding to a mean 73 ± 0.4% predicted) whereas only 66.6% had a low KCO; 42% patients exhibited resting hypoxemia (<75 mmHg) and 26% a high resting P(A-a)O₂; 112 patients (92.5%) exhibited an increased P[(A-a)O₂], peak, 83% a high ΔP(A-a)O₂/ΔVO₂ and 100 patients (83%) demonstrated significant O₂ desaturation during 6MWT. There was no significant difference between IPF and f-NSIP for all parameters except VD/VT peak which was higher in IPF ().

DLCO was severely reduced in the 79 patients with normal resting PaO₂. Interestingly 27 patients had low DLCO and normal P(A-a)O₂, peak and/or no desaturation during the 6MWT. Nine patients had normal P(A-a)O₂, peak: 6 out of 9 did not show significant desaturation during walk test. Conversely among the 21 patients with low DLCO and without significant desaturation at the 6MWT, all had abnormal P(A-a)O₂, peak. The 3 patients with normal DLCO also had normal PaO₂, normal P(A-a)O₂, peak, and normal oxygen saturation during 6MWT.

We found a very good correlation between DLCO and lung volumes and other measures of gas exchange (Table 3 and Figure 1). Interestingly we also found a good correlation between DLCO and VD/VT.

Table 3: Correlation between percent-predicted DLco and other measures.

Variable
coefficient
P value

FVC
0.56
<0.0001

TLC
0.437
<0.0001

FEV₁
0.508
<0.0001

Kco
0.56
<0.0001

Resting PaO₂
0.525
<0.0001

P(A-a)O₂, peak (mmHg)
−0.465
<0.0001

ΔP(A-a)O₂/ ΔVO₂ (mmHg/L)
−0.534
<0.0001

6MWT, nadir SpO₂ (%)
0.511
<0.0001

6MWT, ΔSpO₂ (%)
−0.47
<0.0001

VD/VT, peak
−0.404
<0.0001

(a)

(b)

(c)

(d)

Figure 1: Correlation between DLCO (percent predicted) and resting PaO₂, P(A-a)O₂, peak, oxygen desaturation during 6MWT and VD/VT, peak in fibrotic IIP.

Resting parameters and indexes of gas exchange were more severely altered according to disease severity as judged on alteration of DLCO (Table 4).

Table 4: Rest and exercise parameters as a function of disease severity defined by DLco%: mild: DLco ≥ 60%, moderate: DLco < 60% and ≥40% and severe (advanced disease): DLco < 40% [7].

Disease severity
Mild
Moderate
Severe

Parameter
Dlco ≥ 60%
40% ≤ DLco < 60%
DLco < 40%

n = 10
n = 65
n = 46

FVC
99  20
77  11*
69  16$**

FEV1
99  19
81  12*
70  16$£

TLC
89  13
70  11*
66  16$

PaO₂, rest (mmHg)
89  6.4
80  9*
69  13.7$**

PaO₂, peak (mmHg)
78.7  9
59  10*
51  11$**

P(A-a)O₂, rest (mmHg)
22  9
27  9.8
38  13$**

P(A-a)O₂, peak (mmHg)
40  7
57  12*
64  12$£

ΔP(A-a)O₂/ΔVO₂ (mmHg/L)
14.8  11
31  12.5*
44  18$**

Walt test, nadir SaO₂ (%)
92  3
87  4*
83  6$**

Walk test, ΔSaO₂ (%)
4.3  2.4
8.4  3.8*
11.5  5.2$**

Significantly different from group moderate £P < 0.001, **P < 0.01.

Significantly different from group mild $P < 0.001, *P < 0.01.

6. Discussion

There were three main findings in this study: first, abnormal gas exchange is present in patients with normal lung volumes; second, a low DLCO was found in 97.5% patients with f-IIP whereas resting PaO₂, 6MWT oxygen desaturation and P(A-a)O₂, peak were abnormal, respectively, in 42%, 83%, and 92.5%; and third, no patient had normal DLCO and abnormal PaO₂, 6MWT oxygen desaturation, or increased P(A-a)O₂, peak. As a consequence, DLCO is more sensitive for demonstrating gas exchange abnormality in fibrotic IIP than resting PaO₂, exercise P(A-a)O₂, peak, or 6MWT SpO₂.

Clearly, DLCO is reduced in a greater extent than lung volumes in f-IIP and therefore abnormal DLCO is a frequent finding in patients with normal lung volumes. This has been demonstrated in previous studies [26, 27], both in IPF and f-NSIP [28–39]. Along this line, Gaensler and coworkers noted a fair correlation between histologic severity and physiologic indices [38]. Crystal and colleagues reported a poor correlation with spirometry, lung volumes, DLCO, and resting gas exchange in IPF [39]. In 14 untreated patients with IPF, DLCO, and lung volumes correlated with the extent of fibrosis and cellular infiltration; both of these correlated more strongly than gas exchange with exercise [6].

In patients with f-IIP, the DLCO has been widely used to predict abnormal gas exchange in the lung. Resting PaO₂ correlates poorly with disease severity. In our studies, resting PaO₂ was in the normal range in 58% cases. In contrast, abnormal values for arterial blood gases during exercise are more sensitive than resting PaO₂. However our study in a large group of patients demonstrated that patients with abnormal gas exchange during exercise always exhibited abnormal DLCO and that, in contrast, abnormal DLCO was found in patients with normal gas exchange during exercise. A significant 6MWT oxygen desaturation and/or an increased P(A-a)O₂ was never observed in f-IIP patients with normal DLCO whereas this has been previously reported in sarcoidosis [40, 41].

Our 6MWT results are in agreement with the results of Lama and coworkers [18] who reported 6MWT oxygen desaturation results in IPF and NSIP: in this study, 80% IPF patients and 64% NSIP patients exhibited an oxygen desaturation ≥4% during 6MWT. The 6MWT is a noninvasive, cheap, and simple field test to carry out and interpret. However despite these advantages, some variabilities in the results obtained are observed [42] and an increased ventilatory response during 6MWT might be responsible for higher PAO₂ minimizing the decrease in SaO₂.

Factors that contribute to reduction in DLCO include abnormal thickness of the alveolar capillary membrane and reduced pulmonary capillary blood volume. Thus, DLCO is highly dependent on pulmonary vascular blood volume. We recently reported in patients with f-IIP that the Vc component of the DLCO was significantly decreased in addition to the already lowered Dm, CO component as a consequence of the thickened membranes [43]. The correlation between DLCO and VD/VT, peak is in agreement with the findings by Agusti and coworkers [8] and supports the concept that the abnormalities of the pulmonary vasculature are important to modulate gas exchange in IPF during exercise.

It was not the scope of our study to evaluate the prognostic value of each test. Several studies found that distance or desaturation during a 6MWT was a strong predictor of mortality [18]. Mortality rate is higher among patients with DLCO <30% to 45% predicted [33, 44–46], but it is clear that the prognostic value of any pulmonary functional parameter at one point is limited.

In conclusion, DLCO appears as the best physiologic index to evaluate gas exchange abnormalities in fibrotic IIP and could take the place of formal exercise testing with arterial blood gas to evaluate the severity of gas exchange in patients with fibrotic IIP.

Author’s Contribution

Benoit Wallaert and LidwineWemeau-Stervinou were responsible for Conception and design; Benoit Wallaert, LidwineWemeau-Stervinou, Julia Salleron, Isabelle Tillie-Leblond, and Thierry Perez were responsible for analysis and interpretation; BenoitWallaert, LidwineWemeau-Stervinou, Isabelle Tillie-Leblond, and Thierry Perez were responsible for drafting the paper for important intellectual content.

Conflict of Interests

For each author, no significant conflict of interest exist with any companies/organizations whose products or services may be discussed in this paper.

References

American Thoracic Society and European Respiratory Society, “American Thoracic Society/European Respiratory Society International Multidisciplinary Consensus Classification of the Idiopathic Interstitial Pneumonias. This joint statement of the American Thoracic Society (ATS), and the European Respiratory Society (ERS) was adopted by the ATS board of directors, June 2001 and by the ERS Executive Committee,” American Journal of Respiratory and Critical Care Medicine, vol. 165, no. 2, pp. 277–304, 2002.

American Thoracic Society, “Idiopathic pulmonary fibrosis: diagnosis and treatment. International consensus statement. American Thoracic Society (ATS), and the European Respiratory Society (ERS),” American Journal of Respiratory and Critical Care Medicine, vol. 161, no. 2, part 1, pp. 646–664, 2000.

B. Bradley, H. M. Branley, and J. J. Egan, “Interstitial lung disease guideline: the British Thoracic Society in collaboration with the Thoracic Society of Australia and New Zealand and the Irish Thoracic Society,” Thorax, vol. 63, no. 5, pp. v1–v58, 2008.

G. Raghu, H. R. Collard, J. J. Egan et al., “An Official ATS/ERS/JRS/ALAT Statement: idiopathic pulmonary fibrosis: evidence-based guidelines for diagnosis and management,” American Journal of Respiratory and Critical Care Medicine, vol. 183, no. 6, pp. 788–824, 2011.

A. L. Katzenstein, “Idiopathic interstitial pneumonia: classification and diagnosis,” Monographs in Pathology, pp. 1–31, 1993.

J. D. Fulmer, W. C. Roberts, E. R. von Gal, and R. G. Crystal, “Morphologic-physiologic correlates of the severity of fibrosis and degree of cellularity in idiopathic pulmonary fibrosis,” Journal of Clinical Investigation, vol. 63, no. 4, pp. 665–676, 1979.

J. J. Egan, F. J. Martinez, A. U. Wells, and T. Williams, “Lung function estimates in idiopathic pulmonary fibrosis: the potential for a simple classification,” Thorax, vol. 60, no. 4, pp. 270–273, 2005.

A. G. N. Agusti, J. Roca, J. Gea, P. D. Wagner, A. Xaubet, and R. Rodriguez-Roisin, “Mechanisms of gas-exchange impairment in idiopathic pulmonary fibrosis,” American Review of Respiratory Disease, vol. 143, no. 2, pp. 219–225, 1991.

C. Risk, G. R. Epler, and E. A. Gaensler, “Exercise alveolar-arterial oxygen pressure difference in interstitial lung disease,” Chest, vol. 85, no. 1, pp. 69–74, 1984.

T. S. Hallstrand, L. J. Boitano, W. C. Johnson, C. A. Spada, J. G. Hayes, and G. Raghu, “The timed walk test as a measure of severity and survival in idiopathic pulmonary fibrosis,” European Respiratory Journal, vol. 25, no. 1, pp. 96–103, 2005.

C. Agusti, A. Xaubet, A. G. N. Agusti, J. Roca, J. Ramirez, and R. Rodriguez-Roisin, “Clinical and functional assessment of patients with idiopathic pulmonary fibrosis: results of a 3 year follow-up,” European Respiratory Journal, vol. 7, no. 4, pp. 643–650, 1994.

R. M. Cherniack, T. V. Colby, A. Flint et al., “Correlation of structure and function in idiopathic pulmonary fibrosis,” American Journal of Respiratory and Critical Care Medicine, vol. 151, no. 4, pp. 1180–1188, 1995.

A. Xaubet, C. Agustí, P. Luburich et al., “Pulmonary function tests and CT scan in the management of idiopathic pulmonary fibrosis,” American Journal of Respiratory and Critical Care Medicine, vol. 158, no. 2, pp. 431–436, 1998.

J. Stocks and P. H. Quanjer, “Reference values for residual volume, functional residual capacity and total lung capacity: ATS Workshop on Lung Volume Measurements Official Statement of the European Respiratory Society,” European Respiratory Journal, vol. 8, no. 3, pp. 492–506, 1995.

“Standardized lung function testing. Official statement of the European Respiratory Society,” The European Respiratory Journal. Supplement, vol. 16, pp. 1–100, 1993.

R. Pellegrino, G. Viegi, V. Brusasco et al., “Interpretative strategies for lung function tests,” European Respiratory Journal, vol. 26, no. 5, pp. 948–968, 2005.

“ATS statement: guidelines for the six-minute walk test,” American Journal of Respiratory and Critical Care Medicine, vol. 1, no. 166, pp. 111–117, 2002.

V. N. Lama, K. R. Flaherty, G. B. Toews et al., “Prognostic value of desaturation during a 6 minute walk test in idiopathic interstitial pneumonia,” American Journal of Respiratory and Critical Care Medicine, vol. 168, no. 9, pp. 1084–1090, 2003.

B. Wallaert, C. Talleu, L. Wemeau-Stervinou, A. Duhamel, S. Robin, and B. Aguilaniu, “Reduction of maximal oxygen uptake in sarcoidosis: relationship with disease severity,” Respiration, vol. 82, pp. 501–508, 2011.

C. A. Sorbini, V. Grassi, E. Solinas, and G. Muiesan, “Arterial oxygen tension in relation to age in healthy subjects,” Respiration, vol. 25, no. 1, pp. 3–13, 1968.

“ATS/ACCP Statement on cardiopulmonary exercise testing,” American Journal of Respiratory and Critical Care Medicine, vol. 167, pp. 211–277, 2003.

C. Cooper and T. Storer, Exercise Testing and Interpretation. A Practical Approach, Cambridge, UK, 2001.

N. L. Jones, Clinical Exercise Testing, WB Saunders, Philadelphia, Pa, USA, 1997.

K. Wasserman, J. E. Hansen, D. Y. Sue, R. Casaburi, and B. J. Whipp, Principles of Exercise Testing and Interpretation, 3rd edition, 1999.

B. Aguilaniu, R. Richard, F. Costes, et al., “Cardiopulmonary exercise testing,” Revue des Maladies Respiratoires, vol. 24, no. 3, part 2, pp. 2S111–2S160, 2007.

T. L. Dunn, L. C. Watters, C. Hendrix, R. M. Cherniack, M. I. Schwarz, and T. E. King, “Gas exchange at a given degree of volume restriction is different in sarcoidosis and idiopathic pulmonary fibrosis,” American Journal of Medicine, vol. 85, no. 2, pp. 221–224, 1988.

B. A. Keogh, E. Lakatos, D. Price, and R. G. Crystal, “Importance of the lower respiratory tract in oxygen transfer. Exercise testing in patients with interstitial and destructive lung disease,” American Review of Respiratory Disease, vol. 129, no. 2, pp. S76–S80, 1984.

R. Erbes, T. Schaberg, and R. Loddenkemper, “Lung function tests in patients with idiopathic pulmonary fibrosis: are they helpful for predicting outcome?” Chest, vol. 111, no. 1, pp. 51–57, 1997.

S. Nagai, M. Kitaichi, H. Itoh, K. Nishimura, T. Izumi, and T. V. Colby, “Idiopathic nonspecific interstitial pneumonia/fibrosis: comparison with idiopathic pulmonary fibrosis and BOOP,” European Respiratory Journal, vol. 12, no. 3, pp. 1010–1019, 1998.

J. A. Bjoraker, J. H. Ryu, M. K. Edwin et al., “Prognostic significance of histopathologic subsets in idiopathic pulmonary fibrosis,” American Journal of Respiratory and Critical Care Medicine, vol. 157, no. 1, pp. 199–203, 1998.

Z. D. Daniil, F. C. Gilchrist, A. G. Nicholson et al., “A histologic pattern of nonspecific interstitial pneumonia is associated with a better prognosis than usual interstitial pneumonia in patients with cryptogenic fibrosing alveolitis,” American Journal of Respiratory and Critical Care Medicine, vol. 160, no. 3, pp. 899–905, 1999.

A. G. Nicholson, T. V. Colby, R. M. Dubois, D. M. Hansell, and A. U. Wells, “The prognostic significance of the histologic pattern of interstitial pneumonia in patients presenting with the clinical entity of cryptogenic fibrosing alveolitis,” American Journal of Respiratory and Critical Care Medicine, vol. 162, no. 6, pp. 2213–2217, 2000.

N. Mogulkoc, M. H. Brutsche, P. W. Bishop, S. M. Greaves, A. W. Horrocks, and J. J. Egan, “Pulmonary function in idiopathic pulmonary fibrosis and referral for lung transplantation,” American Journal of Respiratory and Critical Care Medicine, vol. 164, no. 1, pp. 103–108, 2001.

P. I. Latsi, R. M. Du Bois, A. G. Nicholson et al., “Fibrotic idiopathic interstitial pneumonia: the prognostic value of longitudinal functional trends,” American Journal of Respiratory and Critical Care Medicine, vol. 168, no. 5, pp. 531–537, 2003.

H. R. Collard, T. E. King, B. B. Bartelson, J. S. Vourlekis, M. I. Schwarz, and K. K. Brown, “Changes in clinical and physiologic variables predict survival in idiopathic pulmonary fibrosis,” American Journal of Respiratory and Critical Care Medicine, vol. 168, no. 5, pp. 538–542, 2003.

K. R. Flaherty, J. A. Mumford, S. Murray et al., “Prognostic implications of physiologic and radiographic changes in idiopathic interstitial pneumonia,” American Journal of Respiratory and Critical Care Medicine, vol. 168, no. 5, pp. 543–548, 2003.

Y. Jegal, S. K. Dong, S. S. Tae et al., “Physiology is a stronger predictor of survival than pathology in fibrotic interstitial pneumonia,” American Journal of Respiratory and Critical Care Medicine, vol. 171, no. 6, pp. 639–644, 2005.

E. A. Gaensler and C. B. Carrington, “Open biopsy for chronic diffuse infiltrative lung disease: clinical, roentgenographic, and physiological correlations in 502 patients,” The Annals of Thoracic Surgery, vol. 30, no. 5, pp. 411–426, 1980.

R. G. Crystal, J. D. Fulmer, W. C. Roberts, M. L. Moss, B. R. Line, and H. Y. Reynolds, “Idiopathic pulmonary fibrosis. Clinical, histologic, radiographic, physiologic, scintigraphic, cytologic, and biochemical aspects,” Annals of Internal Medicine, vol. 85, no. 6, pp. 769–788, 1976.

A. Miller, L. K. Brown, M. F. Sloane, A. Bhuptani, and A. S. Teirstein, “Cardiorespiratory responses to incremental exercise in sarcoidosis patients with normal spirometry,” Chest, vol. 107, no. 2, pp. 323–329, 1995.

M. Karetzky and M. McDonough, “Exercise and resting pulmonary function in sarcoidosis,” Sarcoidosis Vasculitis and Diffuse Lung Disease, vol. 13, no. 1, pp. 43–49, 1996.

E. H. Elpern, D. Stevens, and S. Kesten, “Variability in performance of timed walk tests in pulmonary rehabilitation programs,” Chest, vol. 118, no. 1, pp. 98–105, 2000.

L. Wémeau-Stervinou, T. Perez, C. Murphy, A.-S. Polge, and B. Wallaert, “Lung capillary blood volume and membrane diffusion in idiopathic interstitial pneumonia,” Respiratory Medicine, vol. 106, pp. 564–570, 2012.

T. E. King Jr., S. Safrin, K. M. Starko et al., “Analyses of efficacy end points in a controlled trial of interferon-γ1b for idiopathic pulmonary fibrosis,” Chest, vol. 127, no. 1, pp. 171–177, 2005.

D. A. Lynch, J. D. Godwin, S. Safrin et al., “High-resolution computed tomography in idiopathic pulmonary fibrosis: diagnosis and prognosis,” American Journal of Respiratory and Critical Care Medicine, vol. 172, no. 4, pp. 488–493, 2005.

G. Raghu, K. K. Brown, W. Z. Bradford et al., “A placebo-controlled trial of interferon Gamma-1b in patients with idiopathic pulmonary fibrosis,” The New England Journal of Medicine, vol. 350, no. 2, pp. 125–133, 2004.