Stem Cells International
Volume 2016 (2016), Article ID 7276150, 24 pages
http://dx.doi.org/10.1155/2016/7276150

Review Article

Decellularized and Engineered Tendons as Biological Substitutes: A Critical Review

Arianna B. Lovati, Marta Bottagisio, and Matteo Moretti

Cell and Tissue Engineering Laboratory, IRCCS Galeazzi Orthopaedic Institute, Via R. Galeazzi 4, 20161 Milan, Italy

Received 9 September 2015; Accepted 10 November 2015

Academic Editor: Lauren E. Flynn

Copyright © 2016 Arianna B. Lovati et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Tendon ruptures are a great burden in clinics. Finding a proper graft material as a substitute for tendon repair is one of the main challenges in orthopaedics, for which the requirement of a biological scaffold would be different for each clinical application. Among biological scaffolds, the use of decellularized tendon-derived matrix increasingly represents an interesting approach to treat tendon ruptures. We analyzed in vitro and in vivo studies focused on the development of efficient protocols for the decellularization and for the cell reseeding of the tendon matrix to obtain medical devices for tendon substitution. Our review considered also the proper tendon source and preclinical animal models with the aim of entering into clinical trials. The results highlight a wide panorama in terms of allogenic or xenogeneic tendon sources, specimen dimensions, physical or chemical decellularization techniques, and the cell type variety for reseeding from terminally differentiated to undifferentiated mesenchymal stem cells and their static or dynamic culture employed to generate implantable constructs tested in different animal models. We try to identify the most efficient approach to achieve an optimal biological scaffold for biomechanics and intrinsic properties, resembling the native tendon and being applicable in clinics in the near future, with particular attention to the Achilles tendon substitution.

1. Introduction

Tendon ruptures, frequently associated with tendinopathy, and both tendon retractions and extensive loss after trauma represent a great burden in surgical reconstruction. The most commonly affected tendons are the finger and hand flexors and extensors [1, 2], the rotator cuff [3], and the Achilles tendon [4]. In particular, acute Achilles tendon ruptures have an increasing incidence of 18 per 100,000 [5]. Overall, these injuries are directly combined with high health and socioeconomic costs and long-term postoperative rehabilitation and indirectly with the loss of productivity.

Tendon repair is a slow process in order to reestablish the tendon fiber continuity and the functional physiological mechanism. Their poor ability in healing is commonly due to the low cell density (5%), scarce oxygen and nutrient supply, and abnormal collagen deposition [6] that together lead to scar tissue formation and adhesion, thereby impairing the normal tissue function. Indeed, the functionality of tendon biomechanics is primarily related to their complex matrix architecture. According to these premises, finding a suitable graft material as a substitute for tendon reconstruction is one of the main challenges in orthopaedics. To reproduce the biomechanical and biochemical properties similar to the native tissue structure, a tendon substitute should have specific biological properties, including biocompatibility, absence of inflammatory or immune response, and a close interaction with tendon cells, as well as adequate mechanical properties [7]. Wide tendon damage needs to be repaired by large amounts of synthetic or biological tissue substitutes. In view of this, novel approaches for tendon substitution have been recently proposed and marketed for clinical use, including synthetic biomaterials or biological grafts [8]. Nevertheless, synthetic materials for tendon defects have provided poor results with regard to the healing and mechanical properties [7]. Thus, biological grafts, including auto-, allo-, and xenografts, have been widely investigated to satisfy the aforementioned required features for an adequate tendon repair, and, nowadays, they represent the gold standard for tendon repair [7]. Autografts are of limited availability of the dimension and sites of harvest, with high donor site morbidity and prolonged surgical time [9]. Allografts from cadavers are at higher risk of disease transmission and might induce a chronic immune response requiring immunosuppressive approaches [9]. During the last twenty years, decellularization protocols of allografts and xenografts have been investigated to remove the cell-related immunogenicity by preserving the integrity of collagen structure and the biological characteristics of the tendon matrix. In particular, the use of animal-derived xenografts offers great amounts of collectable tissue with the possibility to produce commercial scaffolds from different collagen structures [7, 8].

Several decellularization methods, including physical, chemical, and enzymatic ones and combinations of these techniques, have been described [10]. Most of the published studies describe the production of decellularized tissue scaffolds derived from nonhomologous anatomical sites (e.g., intestinal submucosa, dermal patch, and pericardium). However, decellularized matrix derived from site-specific homologous tissue may be more suitable than a non-site-specific source, in particular when referring to musculoskeletal tissues due to their structural and biomechanical properties [11]. In fact, homologous sources better provide a site-specific extracellular matrix (ECM) offering a valid scaffold to host cell ingrowth and to highly respond to tensile loading typical of the native tendon [9]. While the tendon is a complex three-dimensional structure consisting of well-organized collagen fibers, the tissue-specific decellularized matrix may provide a suitable and natural scaffold with the same native orientation of collagen fibers that has not been synthetically created in the laboratory yet [9]. The current challenge is to develop xenogeneic biological matrices that offer apparent advantages over both synthetic and human-derived scaffolds in view of minimal morbidity and suitable mechanical properties.

This review provides an overview of in vitro and in vivo studies on decellularization procedures of tendon tissue derived from animals or humans. In particular, we analyzed the efficacy of decellularization techniques followed or not by cell reseeding to identify the most suitable approach to obtain a functional natural tendon substitute that can be translated from preclinical models to clinics for tendon replacement.

2. Methods: Inclusion Criteria

The literature search was performed in PubMed database, by considering articles published in English from 2000 until April 2015, as depicted in Figure 1. The search strategy was conducted by searching “decellularization, decellularized, acellularization, acellularized” combined with the keyword “tendon” (Figure 2). Review articles were used to complete our study by including publications that were not present on the PubMed database according to our searching criteria. Our search was focalized both on decellularization protocols in order to obtain a pure matrix from tendon tissue eventually reseeded with a cell source and on the functionality of the biological scaffold after in vivo implantation. With this strategy, we found 77 studies. Twelve studies were excluded because of concerning the decellularization of tissue other than tendons. Of the remaining sixty-five studies, sixteen studies were excluded because of concerning decellularization of tendon-bone grafts, tendon decellularization until matrix powdering or hydrogeling, and commercial products of which the decellularization techniques are not described. Finally, five studies were not included because of describing allografts, in vitro cell culture unrelated to decellularized matrix, and bioactive sutures related to tendon repair but not with tendon substitution or augmentation. Finally, review articles were also excluded. In conclusion, a total of 40 studies, 28 in vitro and 12 in vivo, were included in this review of the literature. The review results are reported in Tables 1 and 2 for the in vitro and in vivo published studies, respectively. To give a global overview of the most employed reagents, cell sources, and construct analyses, we present pie charts in Section 3. The pie chart percentages were calculated by considering the number of papers employing the aforementioned parameters.

Table 1: In vitro studies of tendon tissue decellularization.

Tendon source/size
Decellularization protocol(s)
Assessment of decellularization
Cell reseeding
Reseeding assessment
Experimental groups
Results and comments
Reference

Rabbit flexor FDP 
3–5 cm length
Frozen −80°C (until use) 
0.05% Trypsin/EDTA 37°C (24 h) 
0.5% Triton X100 RT (24 h) 
0.25% Trypsin 37°C (15′) 
0.5% Collagenase 37°C (1 h)
Histology 
Cell count
Rabbit tenocytes 
2 × 10⁶ cells/mL 
Static culture for 4 days
Mechanical testing
Freeze-stored FDP tendon; acellularized FDP matrix; reseeded FDP matrix; fresh native FDP tendon (ctrl)
Acellularized matrix → absence of cells or morphological alteration; UTS/EM similar to ctrl 
Reseeding matrix → cells present only on the surface; EM similar to ctrl
[12]

Rabbit ST and FDP 
2 cm
length
Stored in 0.02% EDTA 4°C (until use) 
Protocol 1: 1% Triton X100 (24 h) 
Protocol 2: 0.5% SDS (24 h) 
Protocol 3: 1% TBP (24 h)  
Protocol 4: 1% Triton X100 + 0.5% SDS (24 h)  
Protocol 5: 1% TBP + 0.5% SDS (24 h)  
Protocol 6: 1% TBP + 1% Triton X100 (24 h) 
Followed by RNAse/DNAse 37°C (24 h) 
0.02% EDTA 4°C (24 h)
Histology 
Mechanical testing
—
—
Acellularized ST/FDP matrix; fresh native ST/FDP tendon (ctrl)
Protocol 4 → collagen ruptures 
Protocol 5 → no impact on tendon structure and collagen content 
Acellularized matrix → histology and biomechanics similar to ctrl
[13]

Rabbit
FDP 
5 cm
length
Frozen −80°C (until use) 
0.05% Trypsin/EDTA 37°C (24 h) 
0.5% Triton X100 RT (24 h)
Histology 
Cell count
Rabbit tenocytes 
2 × 10⁶ cells/mL 
Rotating reseeding (24 h) 
Static or dynamic culture (LigaGen L30-4C) for 5 days
Histology 
Mechanical testing
Freeze-stored acellularized FDP matrix (AC); acellularized FDP matrix + bioreactor loading (A+); acellularized FDP matrix w/o bioreactor loading (A−); reseeded FDP matrix + bioreactor loading (R+); reseeded FDP matrix w/o bioreactor loading (R−); fresh native FDP tendon (NC); freeze-stored FDP tendon (FC)
NC → highest UTS/EM 
R+ → higher UTS/EM compared to FC, AC, R−, and A−
[14]

Rabbit ST 
Undefined size
Frozen −80°C (until use) 
1% SDS (24 h)
—
Rabbit dermal fibroblasts 
2 × 10⁶ cells/mL 
Static culture by injection for 4, 7, and 14 days
Histology 
Mechanical testing 
Immunohistochemistry
Acellularized ST matrix; reseeded ST matrix; fresh native ST tendon (ctrl)
Acellularized matrix → histology and immunohistochemistry similar to ctrl 
Procollagen I → present in ctrl and reseeded matrix, absent in acellularized matrix
Collagens I-III-IV-VI, versican → similar among treatments 
UTS/stiffness/elongation → higher in reseeded matrix
[15]

Rabbit
FDP 
5 cm
length
Frozen −80°C (until use) 
0.05% Trypsin/EDTA 37°C (24 h) 
0.5% Triton X100 RT (24 h)
Histology 
Cell count
Rabbit ASCs and Fs 
2 × 10⁶ cells/mL 
Rotating reseeding (24 h) 
Static or dynamic culture (LigaGen L30-4C) for 5 days
Histology 
Mechanical testing
Reseeded FDP matrix + bioreactor loading (ASCs+); reseeded FDP matrix w/o bioreactor loading (ASCs−); reseeded FDP matrix + bioreactor loading (Fs+); reseeded FDP matrix w/o bioreactor loading (Fs−); fresh native FDP tendon (ctrl)
UTS/EM → higher in ASCs+, Fs+ versus ASCs−, Fs−, ctrl 
ASCs+, and Fs+ → cells oriented parallel to the direction of strain
[17]

Rabbit
FDP 
1.5 cm
length
Fresh samples 
Protocol 1: 0.5% SDS (30′) 
Protocol 2: 0.05% Trypsin/EDTA (24, 48, and 72 h)  
Protocol 3: 0.05% Trypsin/EDTA (24 h); 0.5% Triton X100 (24 h)  
Protocol 4: 3% Triton X100 (24, 48 h)  
Protocol 5: 3% Triton X100 (24 h); 0.5% SDS (24 h)  
Protocol 6: Frozen −70°C (until use); 0.05% Trypsin/EDTA (24 h); 0.5% Triton X100 (24 h)
—
Rabbit tenocytes (endotenon, epitenon) 
1 × 10⁶ cells/1.5 cm construct 
Static culture for 1, 3, and 6 weeks
Histology 
Cell fluorescent labeling
Reseeded FDP matrix with endotenon cells; with epitenon cells; and with mixed cells
Protocol 6 → best decellularization process 
Epitenon/endotenon cells → attached to the periphery of the acellularized matrix 
Endotenon cells → penetrated the matrix core by 3 weeks
[11]

Rabbit PT 
3 cm
length;
1.5 cm
width;
3 mm
thickness
Frozen −20°C (until use)  
Protocol 1: 1% TBP RT (48, 72 h)  
Protocol 2: 1% SDS RT (24, 48 h)
Histology 
GAG content 
Mechanical testing
Human HS68 
2 × 10⁵ cells/mL 
Static culture for 4 h, 1, 3, 6, and 14 days
Histology 
Cell count
Reseeded TBP-treated PT matrix; reseeded SDS-treated PT matrix; fresh native PT (ctrl)
SDS and TBP → 70–90% of cell removal 
Reseeded matrix biomechanics → similar to ctrl 
TBP-treated matrix → supported cell proliferation better than SDS-treated matrix and was histologically similar to ctrl
[19]

Rabbit PT 
1.5 cm length; 0.3 cm width;
1 mm
thickness
Frozen liquid nitrogen/thaw (5 cycles) 
Frozen −80°C (until use)
—
Rabbit tendon fibroblasts 
5 × 10⁶ cells/mL 
Static culture in collagen gel with or w/o anti-TGFβ1 antibody for 6 weeks
Mechanical testing 
Cell fluorescent labeling
Acellularized PT matrix; reseeded PT matrix; reseeded PT matrix + anti-TGFβ1 antibody
Anti-TGFβ1 antibody decreased UTS/EM in reseeded matrix
[20]

Canine FDP 
2 cm
length
Frozen −80°C (until use) 
0.05% Trypsin/EDTA 37°C (24 h) 
0.5% Triton X100 RT (24 h)
Mechanical testing
Canine BMSCs 
2 × 10⁷ cells/mL 
Static culture for 2 weeks
Histology 
Cell/DNA content 
LiveDead
Acellularized FDP matrix; acellularized FDP matrix, perforated with multiple slits (MS); acellularized FDP matrix, perforated with multiple slits + hyaluronic acid gelatin (MS-SM); reseeded FDP/MS matrix; fresh native FDP tendon (ctrl)
UTS → higher in acellularized FDP/MS matrix compared to ctrl 
DNA content → lower in MS than ctrl; higher than in acellularized matrix with or w/o BMSCs 
BMSCs were viable after 2 weeks
[34]

Canine FDP 
Undefined size
Frozen −80°C (until use) 
0.05% Trypsin/EDTA 37°C (24 h) 
0.5% Triton X100 RT (24 h)
Histology 
SEM 
Mechanical testing
—
—
Acellularized FDP matrix; acellularized FDP matrix + hyaluronic acid gelatin (GT); fresh native FDP tendon (ctrl)
UTS → higher in acellularized matrix than ctrl and GT 
EM → similar among treatments 
Matrix surfaces → smooth in ctrl and GT; rough in acellularized matrix
[33]

Canine AT 
4 cm
length;
0.3 mm
thickness
Frozen −80°C/thaw (5 cycles) 
RNAse/DNAse 37°C (4, 8, and 12 h)
Histology 
Cell/DNA content 
SEM 
Mechanical testing 
Biochemical analysis
Murine fibroblasts (3T3) 
1 × 10⁶ cells/mL 
Static culture for 4 days
Histology 
SEM
Acellularized AT matrix (only freeze/thaw); acellularized AT matrix (freeze/thaw + nuclease treatments); fresh native AT (ctrl)
Complete cell removal → in repetitive freeze/thaw + nuclease treatment for 12 h 
Acellularized matrix → ultrastructure, proteoglycans, and growth factors were preserved; UTS was retained in 85.62% of ctrl
[37]

Canine IT 
2.5 cm length;
1 cm
width;
0.05 mm
thickness
Frozen −80°C (until use) 
Frozen liquid nitrogen/thaw (5 cycles) RNAse/DNAse 37°C (12 h)
—
Canine BMSCs 
5 × 10⁶ cells/mL 
Static culture for 2, 7, and 14 days
Histology 
Cell fluorescent labeling 
Gene expression 
Mechanical testing
Acellularized IT matrix; reseeded IT matrix; fresh native IT (ctrl)
Reseeded matrix → viable cells aligned to the collagen fibers; higher tenomodulin, MMP13 and lower collagen I than in BMSCs before seeding Biomechanics → similar between acellularized and reseeded matrixes
[35]

Canine AT 
4 cm
length;
0.3 mm
thickness
Frozen liquid nitrogen/thaw (5 cycles) RNAse/DNAse 37°C (12 h)
SEM 
Mechanical testing
Rat BMSCs and TSPCs 
2 × 10⁵ cells/cm² 
Static culture for 6 h and 1, 3 days
LiveDead 
Cell proliferation 
SEM
Acellularized AT matrix; reseeded AT matrix; fresh native AT (ctrl)
Acellularized matrix → preserved ECM and EM similar to ctrl 
Reseeded matrix → homogenous cell distribution, alignment, and tenogenic differentiation of seeded cells
[57]

Canine AT 
4 cm
length;
0.3 mm
thickness
Frozen liquid nitrogen/thaw (5 cycles) RNAse/DNAse 37°C (12 h)
—
Canine BMSCs 
5 × 10⁵ cells/mL 
Dynamic culture for 1, 3, and 7 days
Histology 
Cell fluorescent labeling 
SEM 
Mechanical testing
Acellularized AT matrix; reseeded AT matrix; fresh native AT (ctrl)
Reseeded matrix → homogenous cell distribution at day 7; tenogenic differentiation of BMSCs; UTS similar to ctrl
[39]

Porcine
AT 
1 cm
length;
0.5 cm
width;
3 mm
thickness
Frozen −20°C (until use)  
Protocol 1: 3% Triton X100 37°C (24 h)  
Protocol 2: 1% SDS + 0.2% natrium acid + 5 mM EDTA RT (24 h) 
Protocol 3: 0.05% Trypsin/EDTA RT (24 h)
—
Human tenocytes 
4 × 10⁶ cells/cm² 
Centrifuging reseeding + static culture 
Rotating culture 
Reseeding by injection + rotating culture for 1, 3 weeks
Histology 
Cell fluorescent labeling 
DNA/GAGs content
Acellularized porcine AT matrix; reseeded porcine AT matrix; fresh native human/porcine AT (ctrl)
Porcine ctrl → higher cell/GAGs content; more compact and wavy pattern than human ctrl 
Acellularized matrix → lower GAGs/DNA content 
Reseeded porcine matrix → greater cell/GAGs content compared to ctrl; inhomogeneous, superficial, and not aligned tenocyte distribution 
Rotating culture → greater cell/GAGs content compared to centrifuging-based seeding, lower cell/GAGs content compared to ctrl 
Cell injection → poor cell distribution; no GAGs deposition
[40]

Porcine
ATT 
12 cm
length;
1 cm
width
Frozen −70°C (until use) 
0.25% Trypsin/collagenase type I 37°C (4 h) 
NaCl washing 4°C (3 cycles) (1 h) 
Ultrasonication (5′)
Histology 
DNA/GAG/collagen 
SEM 
Mechanical testing
Dynamic culture w/o cells in bioreactor (110% tension + 90° torsion) for 1, 3, and 7 days
—
Acellularized ATT matrix; acellularized ATT matrix cultured in bioreactor; fresh native ATT (ctrl)
Acellularized matrix → lower DNA content; lower UTS compared to ctrl 
Acellularized matrix treated in bioreactor → greater UTS than ctrl
[41]

Porcine DT 
Undefined size
Stored at 4°C (until use)  
Protocol 1: 0.1% PAA + 4% EtOH stirring RT (16 h)  
Protocol 2: 1% Triton X100 RT (24 h)  
Protocol 3: 1% Triton X100 + 1% TBP RT (24 h)  
Protocol 4: 2% TBP RT (24 h)  
Protocol 5: 1% TBP RT (24 h)  
Protocol 6: 1% SDS RT (24 h)  
Protocol 7: 0.5% SDS RT (24 h)
Histology 
Cell viability 
SEM 
Mechanical testing 
Hydroxyproline
—
—
Acellularized DT matrix; stored native DT (ctrl)
Protocol 5 → good cell removal; tissue structure and composition were preserved 
Acellularized matrix → UTS, EM, and hydroxyproline release were similar to ctrl
[42]

Porcine PT 
6 cm
length;
1.5 cm
width;
5 mm
thickness
Protocol 1: 0.1% EDTA + aprotinin RT (24 h); 0.1% SDS RT (24 h); RNAse/DNAse 37°C (3 h)  
Protocol 2: 0.1% EDTA + aprotinin RT (24 h); 0.1% SDS RT (24 h); RNAse/DNAse 37°C (3 h)
Histology 
Immunohistochemistry
Hydroxyproline 
Collagen/GAGs 
Mechanical testing
Human tenocytes 
1 × 10⁵ cells/mL 
Static culture for 3 weeks
Histology 
LiveDead
Acellularized PT matrix; acellularized + sonicated PT matrix; reseeded PT matrix; reseeded + sonicated PT matrix; fresh native PT (ctrl)
Ultrasonication treatment → optimal treatment; collagen and GAGs were similar to ctrl 
Reseeded + sonicated PT matrix → centrally colonized by unviable cells
[43]

Human FDP 
2 cm
length;
0.25 cm
width
0.1% EDTA + protease inhibitor 37°C (24 h) 
0.1% SDS 37°C (5 h) 
DNAse RT (1 h)
—
Human ASCs 
1 × 10⁶ cells/0.5 mL 
Static culture by injection for 7 days
Histology 
Cell/DNA content 
Immunohistochemistry
Acellularized FDP matrix; reseeded FDP matrix; reseeded FDP matrix + collagen solution; fresh native FDP tendon
Acellularized matrix → complete cell removal, absence of DNA content, and no changes in ECM structure 
Reseeded matrix → cell distribution on surface 
Reseeded matrix + collagen → deeper penetration of collagen, COMP positive, and viable cells aligned to collagen fibers
[26]

Human FDP 
1.5 cm length
Frozen −70°C (until use) 
Protocol 1: 0.1% EDTA RT (4 h); 0.1% SDS + 0.1% EDTA RT (24 h) 
Protocol 2: 0.1% EDTA RT (4 h); 0.1% SDS + 0.1% EDTA RT (24 h); 2, 5, and 10% PAA (4, 20 h)
Histology
Human dermal fibroblasts 
1 × 10⁶ cells/mL 
Rotating culture for 5 days
Cell/GAGs/collagen content 
LiveDead 
Mechanical testing
Acellularized FDP matrix with 5% PAA; reseeded FDP matrix
Protocol 2 → increased porosity, improved cell penetration, and migration 
Acellularized matrix → similar collagen/GAG content when treated with or w/o PAA; UTS/EM lower than in reseeded matrix
[27]

Human FDP 
1 cm
length
0.1% SDS + 0.1% EDTA RT (24 h) 
5% PAA (6 h) 
frozen −80°C (until use)
—
Human fibroblasts, tenocytes, and ASCs 
5 × 10⁵ cells/mL 
Rotating culture with or w/o growth factors for 5 days
Histology 
Cell count 
Immunohistochemistry
Acellularized FDP matrix; reseeded FDP matrix; fresh native FDP tendon (ctrl)
Enhanced cell proliferation using 5 ng/mL bFGF, 50 ng/mL IGF-1, and 50 ng/mL PDGF-BB 
Reseeded matrix + growth factors → improved reseeding compared to ctrl w/o growth factors
[29]

Human FDP 
1 cm
length
Frozen −70°C (until use)  
0.1% EDTA (4 h)  
Protocol 1: 1% Triton X100 (24 h)  
Protocol 2: 1% TBP (24 h)  
Protocol 3: 1% SDS (24 h)  
Protocol 4: 0.1% SDS (24 h)
Histology 
DNA/GAGs/collagen 
Mechanical testing
Human dermal fibroblasts 
0.5, 1, 2 × 10⁶ cells/mL 
Static culture for 6, 24 h
Histology 
Cell count 
LiveDead
Acellularized FDP matrix; reseeded FDP matrix; fresh native FDP tendon (ctrl)
Protocols3/4 → lower DNA content compared to ctrl 
Acellularized matrix → good collagen/GAG content 
UTS was similar to ctrl (especially Protocol 4) 
Reseeded matrix → cell distribution on surface
[31]

Equine SDFT and DDFT 
3 cm
length;
1 cm
width;
2 mm
thickness
Protocol 1: frozen liquid nitrogen/thaw (5 cycles); 1% Triton X100 RT (48 h)  
Protocol 2: frozen liquid nitrogen/thaw (5 cycles); 1% SDS RT (48 h) 
Protocol 3: 1% Triton X100 RT (48 h) 
Protocol 4: 1% SDS RT (48 h)
Histology 
Cell/DNA content 
TEM
Equine ASCs 
1.3 × 10⁵ cells/cm² 
Static culture for 7, 14 days
Histology 
MRI 
LiveDead
Acellularized SDFT/DDFT matrix; reseeded SDFT/DDFT matrix; fresh native SDFT/DDFT (ctrl)
Acellularized matrix → lower DNA content in Protocols 1/2 (1% residual nuclei; 20% residual DNA) compared to Protocols3/4 (20% residual nuclei; 40% residual DNA); absence of morphological ECM alterations 
Reseeded matrix → best cell distribution in Protocol 1
[45]

Equine SDFT 
4 cm
length;
1 cm
width;
0.4 mm
thickness
Frozen −80°C (until use) 
Protocol 1: 1% TBP 4°C (48 h) 
Protocol 2: 1% SDS + 0.5% Triton X100 4°C (48 h)  
Protocol 3: 1% SDS 4°C (48 h) 
Protocol 4: 2% SDS 4°C (48 h) 
Followed by 
0.05% Trypsin/EDTA (10′) 
DNAse (30′)
Histology 
DNA/GAGs/collagen 
LiveDead 
SEM 
Mechanical testing
Equine BMSCs 
2 × 10⁴ cells/cm² 
Static culture for 11 days
Histology 
Cell count 
LiveDead
Acellularized SDFT matrix; reseeded SDFT matrix; fresh native SDFT (ctrl)
Protocols2, 3, and 4 → lower DNA/GAGs content compared to ctrl (especially Protocol 4); preserved collagen content; UTS/EM were similar to ctrl 
Reseeded matrix → higher cell proliferation/integration in Protocol 4
[46]

Equine SDFT 
4.5 cm
length;
0.4 mm
thickness
Frozen/thaw (4 cycles)  
2% SDS 4°C (48 h) 
0.05% Trypsin/EDTA (10′) 
DNAse (30′)
Histology 
DNA/GAGs/collagen 
Mechanical testing
Equine BMSCs 
2 × 10⁴ cells/cm² 
Static and dynamic culture for 11 days
Histology 
DNA/GAGs/collagen 
Mechanical testing
Acellularized SDFT matrix; reseeded SDFT matrix; fresh native SDFT (ctrl)
Acellularized matrix → GAGs lost 
Reseeded matrix → best dynamic protocol for BMSCs integration and tenogenic differentiation was cyclic strain of 3% at 0.33 Hz; UTS/EM greater than acellularized matrix; GAGs similar to ctrl
[48]

Equine SDFT 
1 cm
length;
1 cm
width;
0.5 mm
thickness
Frozen −80°C/thaw (4 cycles)
—
Equine BMSCs and TSPCs 
1.25 × 10⁵ cells/cm² 
Static culture for 7 days
Histology 
Cell/GAGs/collagen 
Gene expression
Acellularized SDFT matrix; reseeded SDFT matrix (BMSCs); reseeded SDFT matrix (BMSCs + IGF1); reseeded SDFT matrix (TSPCs); reseeded SDFT matrix (TSPCs + IGF1)
Acellularized matrix → cell numbers 1.6- to 2.8-fold higher for TSPCs than for BMSCs and 0.8- to 1.7-fold higher for IGF-I-treated than for untreated cells 
TSPCs IGF1-treated cell → greatest collagen/GAGs content 
Collagens I, III, COMP → similar among groups
[47]

Bovine AT 
2 cm
length;
2 cm
width; 2 mm
thickness
Frozen (until use) 
1% SDS 4°C (48 h) 
0.1 mM EDTA (48 h)
SEM 
Mechanical testing
—
—
Acellularized matrix; acellularized matrix crosslinked with 0.1, 0.5, 1, and 2.5% of glutaraldehyde
Crosslinked acellularized matrix → UTS/EM greater than acellularized matrix
[49]

Rat tail tendon 
2-3 mm Ø
Frozen −20°C (until use)  
Protocol 1: 1% Triton X100 (24 h)  
Protocol 2: 1% Triton X100 + 1% TBP (24 h)  
Protocol 3: 1% TBP (12, 24, and 48 h)  
Protocol 4: 2% TBP (24 h)  
Protocol 5: 0.5% SDS (24 h) 
Protocol 6: 1% SDS (12, 24 h)
Histology 
Mechanical testing
—
—
Acellularized tail tendon matrix; fresh native rat tail tendon (ctrl)
Protocol 1 → collagen fiber disruption; no cell removal 
Protocol 3 (48 h) or Protocol 6 (24 h) → good acellularized matrix, normal structure and mechanical properties
[23]

FDP = flexor digitorum profundus; ST = semitendinosus tendon; PT = patellar tendon; AT = Achilles tendon; IT = infraspinatus tendon; ATT = anterior tibialis tendon; DT = diaphragm tendon; SDFT = superficial digital flexor tendon; DDFT = deep digital flexor tendon; TBP = Tributyl Phosphate; SDS = Sodium Dodecyl Sulphate; PAA = peracetic acid; ASCs = adipose-derived stromal cells; Fs = sheath fibroblast; HS68 = human neonatal dermal fibroblast; BMSCs = bone-marrow-derived stromal cells; TSPCs = tendon-derived stromal cells; UTS = ultimate tensile strength; EM = elastic modulus; SEM = scanning electron microscope; TEM = transmission electron microscope; GAGs = glycosaminoglycans; TGF-β1 = transforming growth factor-β1; IGF-1 = insulin-like growth factor-1; MMP = matrix metalloproteinase; ECM = extracellular matrix; COMP = cartilage oligomeric matrix protein; bFGF = basic fibroblast growth factor; PDGF-BB = platelet-derived growth factor-BB; RT = room temperature; EtOH = ethanol; ctrl = control; w/o = without.

Table 2: In vivo studies of tendon tissue decellularization and implantation.

Tendon source
and size
Decellularization protocol(s)
Assessment of decellularization
Cell reseeding
Animal model
Implant site, size, and time point(s)
Experimental groups
Assessment of tendon repair
Results and comments
Reference

Rabbit
ST
Undefined size
Frozen −80°C (until use)
1% SDS RT (24 h)
—
Rabbit dermal fibroblasts
2 × 10⁶ cells/mL
Static culture by injection for 4 days
Rabbit
ACL replacement
8 weeks
Autologous ST tendon; reseeded allogenic ST matrix; fresh rabbit ACL in knees (ctrl)
Histology
Mechanical testing
Before implantation
Stiffness → similar in autologous tendon and reseeded matrix
EM → higher in reseeded matrix than autologous tendon
After implantation
Reseeded matrix → weaker biomechanics than autologous tendons; necrosis and tissue remodeling higher than autologous tendon; inflammatory reaction; inhomogeneous cell repopulation
[16]

Rabbit
FDP
3 cm
length
Frozen −80°C (until use)
0.05% Trypsin-EDTA RT (24 h)
0.5% Triton X100 RT (24 h)
—
Rabbit tenocytes (male)
2 × 10⁶ cells/mL
Rotating culture for 24 h
Rabbit (female)
FDP replacement
3, 6, 12, and 30 weeks
Acellularized FDP matrix; reseeded FDP matrix; fresh native FDP tendon (ctrl)
Histology
Fluorescent in situ hybridization (donor male tenocytes ≠ female tenocytes)
Reseeded matrix → good cell repopulation; similar to ctrl 6 weeks after implantation
[22]

Rabbit
FDP
2 cm
length
Frozen −70°C (until use)
0.05% Trypsin/EDTA 37°C (24 h)
0.5% Triton X100 RT (24 h)
Histology
Rabbit tenocytes, Fs, BMSCs, and ASCs
2 × 10⁶ cells/mL
Static culture for 1, 4, and 8 weeks
Rabbit
FDP replacement
4, 6, and 8 weeks
Autologous FDP tendon (ctrl); allogeneic FDP tendon; acellularized FDP matrix; reseeded FDP matrix
Histology
Reseeded matrix → viable cell distribution on surface, but not into the centre at 1, 4, and 8 weeks, good collagen architecture
Autologous, allogenic, and acellularized implants → mild inflammatory response
[21]

Rabbit
FDP
2–2.5 cm
length
Frozen −70°C (until use)
0.05% Trypsin/EDTA 37°C (24 h)
0.5% Triton X100 RT (24 h)
—
Rabbit tenocytes, ASCs
2 × 10⁶ cells/mL
Static culture
Rabbit
FDP replacement
2, 4, 10, and 20 weeks
Autologous FDP tendon (ctrl); acellularized FDP matrix; reseeded FDP matrix
Histology
Mechanical testing
Reseeded matrix → UTS similar to ctrl up to 4 weeks; weaker compared to ctrl at 10 weeks; greater in tendon reseeded matrix from 2 to 20 weeks; similar to acellularized matrix at 2, 4, and 20 weeks; cell penetration to the core of the grafts
[18]

Canine AT
4 cm length; 0.4 cm
width; 0.3 mm thickness
Frozen −80°C/thaw (5 cycles)
RNAse/DNAse 37°C (12 h)
—
—
Rabbit
IT full-thickness defect
8 mm length
4, 8, and 12 weeks
Acellularized AT matrix; void defect
Histology
Mechanical testing
MRI
Acellularized matrix → host cell ingrowth and tissue integration; developing of a tendon-like structure at 12 weeks; UTS similar to void defect at 4, 12 weeks; stiffness greater at 12 weeks than at 4, 8 weeks and compared to void defect at 12 weeks
MRI signal → similar in acellularized matrix and contralateral native tendon at 12 weeks; hypertrophy and scar tissue in void defects
[38]

Canine IT
1 cm
length; 1 cm
width;
0.05 mm
thickness
Frozen −80°C (until use)
Frozen liquid nitrogen/thaw (5 cycles) RNAse 37°C (12 h)
—
Rabbit BMSCs
5 × 10⁶ cells/mL
Static culture for 24 h
Rabbit
Patellar tendon defect
10 mm length; 3 mm width
2 weeks
Reseeded IT matrix; void defect
Histology
Gene expression
Cell fluorescent labeling
Reseeded matrix → cells aligned to fibrils before implantation; scattered after implantation; higher tenomodulin, collagen III, MMP3-13, and lower collagen I expressions compared to acellularized matrix after implantation; viable cells expressing tendon phenotype in vivo
[36]

Rat
AT
Undefined
Frozen −80°C (until use)
0.05% Trypsin/EDTA 37°C (24 h)
0.5% Triton X100 RT (24 h)
Histology
Rat tenocytes
1 × 10⁶ cells/mL
Static culture for 48 h
Rat
Achilles tendon defect
Mid 1/3 portion
Autologous AT (ctrl); acellularized AT matrix; reseeded AT matrix
Histology
Mechanical testing
Reseeded matrix → preserved collagen at 12 weeks; best histological score and biomechanics at 24 weeks and better organized ECM compared to ctrl and acellularized matrix
Acellularized matrix → less inflammatory cells than ctrl and reseeded matrix
[24]

Human
FDP;
FDS;
FPL
8–10 cm
length
Frozen −70°C (until use)
0.1% EDTA RT (4 h) 0.1% SDS + 0.1% EDTA RT (24 h)
5% PAA (4 h)
Histology
Cell/DNA content
Immunohistochemistry
TEM
Mechanical testing
Human ASCs-luc2-eGFP
1 × 10⁶ cells/mL
Rotating seeding (6 h)
Static culture for 2 weeks
Athymic rat
Subcutaneous pocket
3 cm length
4 weeks
Surface scored matrix (S); rehydrated matrix (F); surface scored + rehydrated matrix (S + F); fresh human tendons (ctrl)
Cell fluorescent labeling
Reseeded S and S + F → greater viable cell attachment and penetration compared to reseeded F and ctrl; reduced apoptosis, persistent procollagen production, and similar ultrastructure to ctrl
Rehydration of F and S + F did not improve reseeding
UTS/EM → greater in reseeded matrix than acellularized matrix
[28]

Human
FDP
5 cm
length
Frozen −70°C (until use)
0.1% EDTA + 0.1% SDS RT (24 h)
5% PAA (6 h)
Immunohistochemistry
—
Rat
Subcutaneous pocket
2, 4 weeks
Acellularized FDP matrix; fresh native FDP tendon (ctrl)
Histology
Immunohistochemistry
Mechanical testing
Acellularized matrix → cell and MHC-1 complex removal; preserved collagen structure and increased porosity; UTS/EM greater compared to ctrl; lower inflammatory response and abnormal collagen architecture compared to ctrl
B-cell infiltration → detected in ctrl compared to acellularized matrix after implantation
Macrophage infiltration → absent after implantation
[30]

Human
FDP
4 cm
length
Frozen −70°C (until use)
0.1% EDTA (4 h)
0.1% SDS + 0.1 EDTA (24 h)
5% PAA (4 h)
Manually scored
Dehydrated
Histology
DNA content
Human ASCs-luc2
1-2 × 10⁶ cells/mL
Static culture for 30 h
Rat
Subcutaneous pocket
7, 14, 21, and 28 days
Acellularized FDP matrix; reseeded FDP matrix
Histology
Immunohistochemistry
Cell fluorescent labeling
Mechanical testing
Reseeded matrix → viable cells during implantation up to 4 weeks
Host cell invasion, proliferation, and vascularization were observed after implantation
UTS → similar between acellularized and reseeded matrixes
Collagen I > III → consistent in reseeded matrix after implantation
[32]

Porcine tendon
1 cm
length;
1 cm
width;
0.08 mm
thickness
Frozen liquid nitrogen/thaw (5 cycles) DNAse 4°C (14 h)
Histology
Cell/DNA/collagen
SEM
Gene expression
Human TSPCs
11.5 × 10⁵ cells/cm² 
Static culture for 1, 7 days
Athymic mouse
Rat
Subcutaneous pocket
4 weeks
AT defect (6 mm length)
2, 4 weeks
Acellularized matrix; reseeded matrix
Histology
Collagen content
TEM
Mechanical testing
Reseeded matrix → good cell adhesion and proliferation, promoting a tendon phenotype (scleraxis); mature structure, larger collagen fibrils, and stronger mechanical properties compared to acellularized matrix after implantation
No osteogenic behavior was observed in reseeded matrix after implantation
[44]

Chicken
FDP
6 cm
length;
0.3 cm
width;
1 mm
thickness
Stored 4°C (until use)
0.05% Trypsin/EDTA 37°C (1 h)
2% Triton X100 + 1.5% PAA 37°C (4 h)
Histology
SEM
DNA content
Mechanical testing
—
Mouse
Subcutaneous pocket
2 mm length; 2 mm width; 1 mm thickness
3, 7, 14, and 21 days
Acellularized FDP matrix; fresh native FDP tendon (ctrl)
Histology
Acellularized matrix → decreased or absent DNA content compared to ctrl; UTS/EM 76–78% of that observed in ctrl
No host-cell-mediated foreign-body immune response was observed after implantation
[25]

FDS = flexor digitorum superficialis; FPL = flexor pollicis longus; GFP = green fluorescent protein; luc2-GFP = luciferase 2-green fluorescent protein; ACL = anterior cruciate ligament; MRI = magnetic resonance imaging; MHC-1 = major histocompatibility complex-1.

Figure 1: Cumulative number of publications over years. Publication trend from January 2000 until April 2015 on studies performing both in vitro and in vivo tendon tissue decellularization.

Figure 2: Research strategy. Flow chart of selection process.

3. Results and Discussion

3.1. Tendon Sources and Specimen Dimensions

In this review, we considered studies that have used tendons derived from different mammalians as biological scaffolds. Most of the analyzed articles described decellularization protocols on flexor, patellar, or Achilles tendons harvested from rabbits [11–22], rats [23, 24], or evolutionary less developed species like chicken [25], before of human  [26–32], or other animal tissues such as from canine [33–39], porcine [40–44], equine [45–48], and bovine tendons [49]. Figure 3 displays the distribution of tendon sources from different species. In most cases, the dimensions of the native tendon tissue for the decellularization are reported as surface area ranging from 0.45 to 12 cm² (mean  cm²), tissue length ranging from 1 to 8 cm (mean  cm), or tissue thickness with values ranging from 0.08 to 5 mm (mean  mm). Some authors left undefined the scaffold sizes [15, 16, 24, 33, 42] or thickness [11, 12, 17, 18, 21–24, 26–32, 34, 41]. Many of these studies are not intended to produce a scaffold for human use. Despite this, the production of a scaffold of adequate dimensions for tendon replacement in humans is considered challenging and relevant for clinical application, particularly regarding the Achilles tendon reconstruction.

Figure 3: Tendon sources. The pie chart shows the relative distribution of species from which tendons have been harvested to be decellularized.

3.1.1. Observation on Tendon Sources and Dimensions

The clinical use of decellularized biological scaffolds imperatively requires any host adverse responses, safety, proper dimensions, and adequate availability. Importantly, the ultimate species—providing organs for xenotransplantation—should consider anatomical-physiological and ethical concerns, as well as accessibility related to breeding and slaughtering. Studies using tendons from humans [26–32] should be considered cautiously because of the aforementioned problems such as limited availability from cadavers and risks of disease transmission. Furthermore, the quality and structural organization of the tendon matrix could be influenced by donor age, anatomical site, and loading history [50]; thus the quality control of the source material might play an important role in the success of the graft. Tendons derived from inferior species, including chicken [25], rat [23, 24], and rabbit [11–22], have limited dimensions and amounts to be used as clinical substitutes, though these animals are useful to test the efficacy of decellularization protocols. Moreover, according to the common slaughter procedures for chicken and rabbits, the tendon harvesting is not possible due to the lack of slaughter waste products. Thus, dedicated subjects need to be scarified for this purpose with correlated ethical issues. Canine tendons have appropriate dimensions, yet the use of dog [33–39] native tissues on a large scale is not practical and could be also subjected to ethical issues. For these aforementioned reasons, the large availability in terms of quantity and dimensions of tendon sources from commonly slaughtered animals as pigs [40–44], equine [45–48], and bovine [49] could be a valid choice. Despite the apparent advantages in using pigs as donor species, it retains a great variety of transmittable pathogens to humans [51]. According to this, equine xenografts are becoming even more used for reconstructive surgery [7, 8], due to a significantly inferior presence and often geographically limited zoonotic diseases [52].

Among several types of tendon in humans that need to be repaired, the Achilles tendon is one of the largest collagen structures that undergoes severe injuries. Moreover, it is also the most studied tendon in terms of biomechanical and structural properties [53–56]. Thus, the aforementioned features make the Achilles tendon a challenging structure to be replaced, and it could be considered as a benchmark in generating a tendon substitute. Thus, obtaining a performing decellularized tendon matrix for its substitution requires big efforts to get close to the native dimensions, preserving the functional biomechanical and structural properties. Most of the studies included in this review focused on decellularization processes of small tendon portions because they were aimed at optimizing the decellularization protocols. Although these approaches led to interesting results in terms of cell component removal, they could not be necessarily adequate for greater-sized specimens. Only a few studies worked with suitable tendon dimensions [28, 41, 43] to be used in clinics. The increased resistance of decellularization detergent penetration or of cell colonization during recellularization represents two limitations in processing large tendon specimens. These problems were widely described by authors who performed static approaches for both the decellularization and the reseeding processes with particular reference to the thickness of the tissue [25, 43]. To overcome these hindrances, two studies carried out innovative strategies such as dynamic techniques [41], tissue surface scoring, or superficial cutting [28]. Specifically, Lee et al. [41] described tension and torsion stimuli to improve the detergent penetration, ameliorating also the biomechanical properties of the decellularized matrix. With the same purpose, Woon et al. [28] proposed surface scoring of the tendon to create a breach for both the cell penetration and the attachment, demonstrating the treatment effectiveness. However, all these techniques present some limitations in terms of weakening the decellularized tendon matrix.

3.2. The Panorama of Decellularization Protocols and Cell Reseeding Strategies for Tendon Tissue

Several physical or chemical treatments have been described for tendon decellularization to obtain an antigen-free ECM that could support biomechanical loading similar to the native healthy tendons. Physical treatments are the most commonly used to interrupt the binding of resident cells to the collagen matrix and to disrupt the cell membrane. These treatments include mechanical forces, like ultrasonication [43], and repeated freeze-thaw cycles at −20/80°C [10, 11, 13–21, 26, 27, 29–39, 44–46, 48]. These latest treatments are the most frequently used and can be associated with or followed by freeze-thaw cycles in liquid nitrogen [20, 35, 36, 39, 44, 45, 57]. Chemical treatments can directly start in fresh samples without any previous cycles of freezing and thawing [11, 13, 25, 26, 29, 42, 43, 45] and are commonly used to degrade cell components, remains, and antigens. In particular, chemicals act on cell cytoplasm, nuclear membrane, and lipid/protein interactions. Nonionic (Triton X100) [11–14, 17, 18, 21–24, 31, 33, 34, 40, 42, 45], ionic (Sodium Dodecyl Sulfate, SDS) [11, 13, 15, 16, 19, 23, 26, 31, 42, 43, 45, 46, 48, 49], and zwitterionic (Tributyl Phosphate, TBP) [13, 19, 23, 31, 42, 46] detergents are the most employed agents to obtain a complete tendon decellularization. These reagents can be used either alone or in combination to increase their effect [11, 13, 23, 42, 46]. Hypotonic and hypertonic solutions or EDTA buffers are frequently used with physical [13, 27, 28, 31, 32, 49] or chemical treatments in order to better lysate cells [27–30, 32, 40]. EDTA can also be coupled with specific inhibitors (aprotinin and leupeptin) to reduce the protease release that damages the ECM structure [26, 43]. Because tendons have a well-organized, compact structure, the collagen matrix permeability to detergents and reseeded cells needs to be improved by means of acid solutions (e.g., peracetic, acetic, hydrochloridric, and sulfuric acids) [25, 27–30, 32, 42] or by scoring or perforating the tendon surface with multiple slits [28, 34]. Moreover, in order to allow extrinsic cells to migrate into the acellular scaffold, some authors performed various intensities of ultrasonication with the aim of producing a microscopically more open porous matrix without damaging the overall architecture of the scaffold [43]. Frequently, enzymatic treatments were associated with physical and chemical protocols. Enzymatic substances like Trypsin were frequently combined with EDTA [11, 14, 17, 18, 21, 22, 24, 25, 33, 34, 40, 46, 48], with collagenase type I [12, 41], or with chemical treatments [11] to disrupt peptide bonds at 37°C. Importantly, in order to avoid a host immune response, endonucleases (RNAse and DNAse) are commonly used to complete the decellularization process cleaving the RNA and DNA remains [13, 25, 26, 35–39, 43, 44, 46, 48, 57]. Only 27.5% of the analyzed studies carried out a comparison among different decellularization protocols allowing a deeper insight into the efficacy of chemical treatments [11, 13, 19, 23, 27, 31, 40, 42, 43, 45, 46]. In Figure 4, the most frequently used reagents and detergents are displayed for a better comprehension.

Figure 4: Reagents and detergents. The pie chart shows the percentage of physical, chemical, enzymatic, or associated detergents employed for tendon decellularization.

About 80% of studies analyzed in this review performed cell reseeding of the decellularized tendon tissue using different kinds of cells belonging to the mesenchymal lineage (bone-marrow- [21, 34–36, 39, 46–48, 57], adipose- [17, 18, 21, 26, 28, 30, 32, 45], or tendon-derived stromal cells [44, 57]) or the fibroblastic lineage (tenocytes [11, 12, 14, 18, 20–22, 24, 30, 40, 43, 47] and dermal [15, 16, 19, 27, 30, 31, 37] and tendon sheath fibroblasts [11, 17, 21]), as depicted in Figure 5. The number of cells used for reseeding was differently reported as cells/cm² or cells/mL and varied from 2 × 10⁴ to 4 × 10⁶ (mean 8 × 10⁵ ± 1.3 × 10⁶) and from 1 × 10⁵ to 2 × 10⁷ (mean 2.6 × 10⁶ ± 4 × 10⁶), respectively. Cell reseeding was performed through the static (72%) or dynamic cultures (28%) using simple rotating [16, 21, 26, 27, 29, 30, 39] and cyclic strain cultures [39, 48] or specific commercial bioreactors [14, 17] for a culture time ranging from 24 hours to 8 days (mean days).

Figure 5: Cell sources. The pie chart shows the relative distribution of cell sources used to reseed the decellularized matrix.

3.2.1. Investigations to Assess the Decellularization and Recellularization of Tendon Matrix

Specific analytical investigations are normally performed to verify the efficacy of the decellularization protocols or the capability of the decellularized tissues to be efficiently colonized by cells. Among various analyses that were commonly performed either in vitro or after in vivo implantation, the most employed techniques to verify the intrinsic and biomechanical qualities of the construct were represented by histology (Haematoxylin and Eosin [11–14, 16–19, 21–29, 31–51], Masson’s Trichrome [26, 44, 46], Alcian Blue [26, 40], Prussian Blue [45], Nuclear Fast Red [40], SYTO Green [17, 27, 28, 30–32], and DAPI [24, 25, 37, 40, 41, 43, 45]) and mechanical testing (ultimate tensile strength and elastic modulus [12–14, 17, 18, 20, 23, 27, 28, 31–34, 38, 39, 42, 43, 46, 48, 49, 57], stiffness [16, 19, 25, 29, 35, 37, 41, 44], and elongation [16]), respectively. Furthermore, to detect the presence of residual cells in decellularized tissues or reseeded constructs, DNA content [12, 14, 17, 19, 25–28, 30–32, 34, 37, 40, 41, 44–48, 57] was performed as principal investigation together with other interesting analyses, such as electron microscopy (SEM [25, 33, 37, 39, 41, 42, 44, 46, 49, 57] and TEM [28, 44, 45]) and labeling-based imaging to discriminate viable cells [11, 20, 27, 28, 31, 32, 34–36, 39, 40, 42, 43, 45, 46, 57]. Proteoglycans and collagen fibers are the principal components of the tendon ECM and their conservation within a decellularized/recellularized scaffold is mandatory. For this reason, biochemical assays [19, 27, 31, 37, 40–44, 46–48] or gene expression analyses [35, 36, 44, 47] (collagen types I and III, tenomodulin, scleraxis, and cartilage oligomeric matrix protein), frequently associated with immunohistochemical investigations [20, 26, 28, 30, 32, 43], have been performed to analyze their content within the treated constructs. Animal models have been used to define the inflammatory and immune response upon scaffold implantation through specific immunohistochemical analyses [29], as well as through the detection of inflammatory matrix metalloproteinases (MMP2, MMP3, and MMP13) [35, 36]. Only one study analyzed directly in vivo the construct integration within native tissue after implantation by using the magnetic resonance [38]. In Figure 6, the distribution of typical analyses of decellularized/recellularized constructs is resumed.

Figure 6: Construct analyses. The pie chart shows the relative distribution of analyses performed to assess the quality of the decellularization and reseeding of the tendon matrix.

3.2.2. Observation on Decellularization and Reseeding Protocols

The ultimate goal of a decellularization process is to obtain a scaffold wholly free of cellular components, thus avoiding any host immune reaction. In addition, the removal of remaining reagents is mandatory to contain the inflammatory response after transplantation. Thus, one of the most useful and employed approaches to contain the inflammatory reaction to biological scaffolds is the use of endonucleases (DNAse and RNAse) able to remove potential cell remaining from the decellularized matrix. Anyway, with the aim of controlling these adverse host responses, aggressive decellularization protocols were frequently performed with a high risk to compromise the natural collagen structure and mechanical properties of the scaffold. None of the in vitro studies analyzed have investigated the inflammatory and immunogenic properties of the obtained scaffolds. According to this premise, an interesting approach might be the in vitro analyses of inflammatory cytokines (TNF-α and interleukins) and cytotoxicity or the immune response in peripheral blood mononuclear cell tests. Only few in vivo studies correctly evaluated the inflammatory response by means of histology [20, 21, 25, 30, 36] or immunohistochemistry (B-cells, macrophages) [30], confirming a mild to moderate reaction towards the implanted scaffold within orthotopic [16, 21, 36] but not heterotopic [25, 30] sites. Tischer et al. [16] attributed the partial necrosis and the abundant mononuclear cell infiltration within the fibroblast-reseeded matrix to the ionic detergent (SDS) employed to decellularize the tendon. Kryger et al. [21] demonstrated that acellularized tendons reseeded with various autologous cells behave immunologically like native tendon grafts without the inflammatory response that occurred in allogenic tendons. Omae and colleagues [35, 36] evaluated the gene expression of MMP3 and MMP13 after the in vitro reseeding and orthotopic implantation in vivo, demonstrating a higher expression in reseeded tendon with respect to the decellularized ones. Nevertheless, the histological analysis did not show any inflammatory cell infiltration in either seeded or unseeded constructs at day 14 after orthotopic implantation.

An important limitation in creating biological vital scaffolds is related to the time necessary to repopulate the decellularized matrix with proper cells, particularly concerning the primary cell lines. Indeed, the primary problem with reseeded matrix is the lag time required for graft preparation prior to implantation starting from the biological material collection through the cell isolation and expansion to the final, functional graft colonization. This temporal limitation is mostly perceived in traumatic acute tissue damage rather than chronic injuries. A cell-based approach for tendon restoration by means of reseeded grafts has been extensively demonstrated as an effective strategy [5]. In this context, an unresolved debate exists on the most effective but less time-consuming cell type for functional tendon graft development to be used in clinics. In fact, among several cell types used to reseed tendons, the most popular are the mesenchymal stem cells (MSCs) associated with long-term culture or cells derived from terminally differentiated tissues (tenocytes, fibroblasts, etc.) with a quicker proliferation rate. Despite the supposed advantages in using high proliferative cells, employing autologous tenocytes or fibroblasts requires invasive harvesting with high patient morbidity without taking advantage of immunomodulatory effects. In addition, the easier harvest of great amounts of mesenchymal stem cells from bone marrow or adipose tissue and approved standard procedures for their isolation better support the use of these cells. Moreover, the immunomodulatory properties of mesenchymal stem cells are well known and exploited in the treatment of therapy-resistant graft-versus-host disease [58]. This peculiar feature of MSCs may play a role in the maintenance of implanted scaffold tolerance and control both the autoimmunity and the inflammatory responses.

Another important issue after the graft reseeding is the viability of seeded cells and their capability in colonizing the scaffold after implantation. Most of the analyzed studies demonstrated a good cell repopulation mainly on the surface of the implanted scaffold after 2 to 8 weeks [21, 22, 28, 32, 36, 44]. Only one author declared a good cellular penetration into the core graft up to 20 weeks after implantation [11].

All vertebrate tendons are relatively similar in elastic modulus (EM), though reported EM varies widely from very low values (160 MPa) to exceeding values (2000 MPa) [59]. Thus, the data interpretation of the analyzed studies becomes difficult due to the different methodologies and measurements performed. The biomechanical properties of decellularized or reseeded tendon matrix need to be maintained similar to the native tissue. Taking into account the basal mechanical properties of human tendons could be a useful benchmark to evaluate the scaffold quality. In the literature, the biomechanical values of human tendons are widely described with a variable EM from  MPa to 1673 MPa for the Achilles [60] and flexor digitorum profundus tendons [61], respectively. Otherwise, the UTS ranges consistently from 40 to 100 MPa [62], or differently reported as  N [63]. Aiming at a suitable biological scaffold derived from tendon to tendon substitution in human medicine, xenografts represent promising materials. According to this, most of the studies focused the attention on the protocol optimization in tendons derived from various animals without considering the translatability of the final construct. In particular, decellularizing tendons derived from laboratory [12–24] or small animals [33–39, 57] clearly might not be useful for human use because tissues of these species are not available as commercial products, though they represent a valid approach in research and the results obtained from these studies are still highly relevant. Differently, tendons derived from large animals like pigs [40–44], horses [45–48], bovine [49], or humans [26–32] fit better for this purpose. This concept is particularly true whether considering the final dimensions and biomechanical features of the decellularized or reseeded scaffolds. The studies that processed porcine tendons showed poor biomechanical properties of the native tissue compared to the human basal values [41–44], despite being suitable in terms of dimension. Among the few studies performed on equine tendons, only Youngstrom and colleagues [46, 48] carried out biomechanical tests on native and decellularized tissue, demonstrating inferior properties in terms of EM and failure stress. The analysis of only two similar studies does not allow drawing a firm conclusion on the suitability of equine tendons. Studies performed on the human-derived flexor digital tendons demonstrated that this tissue could be suitable as xenograft in terms of both the EM and UTS falling within the parameters of normal values [27, 28, 30, 31], with the exception of the values reported in the study conducted by Schmitt and colleagues [32]. Some studies working on rabbit tendons [12–14, 17, 18] confirmed that this species has suitable UTS and EM basal values compared to humans. Hence, rabbit tendons are valid candidates to investigate innovative strategies to obtain tendon-derived matrix in the research field, even though they cannot be implantable xenografts.

The decellularization and/or reseeded protocols used to create tendon-derived matrix grafts vary widely throughout the literature, making the comparison of the efficacy of different approaches complex. Indeed, only some in vitro studies compared more than two protocols [11, 13, 19, 23, 27, 31, 40, 42, 43, 45, 46], but they differed a lot in terms of starting treatment (fresh or frozen), chemical or enzymatic agents, and concentrations for the decellularization protocols. In addition, the strategy to reseed the matrix is commonly performed by employing different cell sources, types, and days of culture. From these studies emerges the fact that TBP [23, 42] and SDS are the most efficacious reagents to obtain a performing decellularized tendon matrix. An interesting approach to ameliorating the action of chemical detergents in the compact collagen structure of tendons is the use of the peracetic acid (PAA) that acts on the permeability of the matrix permitting a greater penetration of the reagents [25, 27–30, 32]. Thanks to the PAA activity, the total amount and concentration of detergents could be drastically reduced. In fact, the use of harsh decellularization methods might determine damage of the collagen ultrastructure, impairing the biomechanical properties of the decellularized matrix. Conversely, applying a mild decellularization could not fully remove the cell component. Therefore, few studies combined the use of ion and zwitterionic detergents with protease inhibitors such as aprotinin and leupeptin [26, 43] to prevent the matrix disruption by proteases.

An appropriate terminal sterilization of the biological scaffold is mandatory to eliminate endotoxins and bacterial, viral, or prion presence [64], while preserving the structural, biochemical, and mechanical properties of the ECM. According to the literature, a valid sterilization approach is the use of hybrid methods both to sterilize the scaffold and to preserve the biomechanics [65]. Most of the sterilizing techniques use acids (e.g., PAA) or solvents for in vitro studies, although they are not sufficient for the clinical translatability as the sterilization required for medical devices needs to achieve sterility insurance levels of 10⁻⁶ (SAL6) [66]. Other sterilization methods are approved for clinical use, that is, ethylene oxide [39, 57], gamma, and electron beam irradiation, though some authors showed undesirable host immune responses to these processes [67–69]. In the last few years, an alternative and recently approved sterilization method of biological grafts for clinical use is the supercritical carbon dioxide [66, 70]. Due to the intrinsic differences in the ECM composition of various tissues, decellularization agents, time of exposure, and terminal sterilization techniques should be deeply investigated.

3.3. Animal Models for Tendon Repair with Decellularized Matrix

Only 12 studies verified the performances of the decellularized constructs unseeded or cell reseeded in animal models. The defect size and surgical techniques used to allocate the grafts are resumed in Table 2. In particular, most of them (67%) described an orthotopic implantation in rabbits [16, 18, 21, 22, 36, 38] and only two studies described an orthotopic implantation in rat Achilles tendon defects [24, 44]. Furthermore, some authors performed subcutaneous implantations of the constructs in mice and rats to investigate both the host inflammatory and the cell-mediated immune responses to detergent remains of decellularization process [25, 28, 29, 32, 44]. In our analysis, we found a high variability of the time points after implantation that were commonly longer in orthotopic models ranging from 2 to 30 weeks (mean ) than in heterotopic sites, of which the subcutaneous implantation protracted for 1 to 4 weeks (mean ). Although investigations at different time points are detrimental to evaluate the tendon-tendon integration and the host immune response, the comparison of results among various studies becomes difficult for the aforementioned variability.

3.3.1. Observation on Preclinical Animal Models

In the literature, different species are described as suitable models to study tendon ruptures and tears in terms of the physiopathology and tissue regeneration. Among them, nonhuman primates and dogs were frequently used for this purpose in the past, but the ethical issues and the public opinion decreased their employment in preclinical research [71–73]. Differently, horses, goats, and sheep represent the elective models due to proper dimensions, qualities, and biomechanics of the flexor tendon structure [74–77]. Anyway, the special management, handling, and high costs of these models constitute a limitation for their use. Laboratory animals, like mice and rats, have several advantages as preclinical models. They are very prolific obtaining high numbers for experimental studies; they can be easily handled and are with reduced economic impact. Furthermore, their genome has been completely sequenced showing a high genetic homology to humans (80–90%), thus permitting creating transgenic models of tendinopathy to study its pathogenesis [78]. Nevertheless, their small dimensions, in particular that of mice [79], represent the major limitation to testing novel therapeutic approaches for tendon augmentation and/or laceration. The highest balance in terms of tendon structure, physiology, cellular component, and biomechanics compared to humans can be found in rabbits [80–82]. This species merges appropriate tendon size with an easy handling and controlled costs that make rabbits the most proper animal models to investigate biological tendon graft features before the human use [11–22]. More importantly, the animal models are widely employed to verify the integration of the decellularized matrix within the orthotopic site of implantation. Most of the analyzed studies evaluated the integration of the tissue engineered tendon grafts in a rabbit model of anterior cruciate ligament [16] or tendon defect replacement [18, 21, 22, 36, 38] by means of histological, biomechanical, or molecular investigations. Only one study assessed the graft integration in a rat model of Achilles tendon defect [24]. Overall, these studies reported weaker biomechanical properties after 8–10 weeks of implantation compared to the native tissue [16, 18, 38]. Histologically, a mild to severe inflammatory response was detected after the implantation of reseeded tendon matrix [16, 21, 24, 38]. One group evaluated the expression of tenogenic genes after implantation, reporting higher expression in the reseeded tendon matrix when compared to the decellularized matrix [36].

4. Conclusions

The purpose of the present review is to critically analyze the recent literature on tendon-derived biological scaffolds highlighting the principal features to develop a functional tendon device, since the final goal of regenerative medicine and tissue engineering is to translate the tendon restoration to clinics. In particular, we focused on the proper tendon source and dimensions, the safety of the device in terms of host integration, response, and biodegradability related to the common applied protocols for decellularization. Moreover, reseeding and sterilization techniques as well as the adequate mechanical proprieties of the biological product were discussed. More importantly, we evaluated the importance and pertinence of preclinical animal models related to the type and site of tendon injury before evidence based clinical trials.

Biological scaffolds have been increasingly involved in regenerative medicine and tissue engineering because there is no better way to replace a tissue with its homologous structure. Currently, the use of decellularized tendon appears to be an interesting approach for the treatment of tendon ruptures and tears, being the most adequate structure to guide the regeneration of the injured tissue by preserving the complex matrix architecture. The collagenous structure of decellularized tendons is effectively an ideal environment to encourage cell incorporation, metabolism, and matrix synthesis. The purpose of any decellularization protocol is to successfully remove cellular components and nucleic residual, thereby minimizing modifications on the arrangement, biological activity, and mechanical properties of the matrix. Therefore, the ideal tendon graft is a nonimmunogenic, readily acquired ECM with mechanical properties resembling the native tendon features. Up to the present, synthetic biomaterials have not demonstrated appropriate mechanical properties suitable for orthotopic implantation. Conversely, the biological grafts seem to have more appropriate structure and features to be employed for tendon repair. Indeed, xenogeneic tissues, such as dermis, small intestine submucosa, and pericardium, have become popular commercial scaffolds for this purpose as widely demonstrated in the literature [7, 8, 83–86]. Despite the optimal integration, the biocompatibility with the host tissues, and the augmentation function of the commercial biological scaffolds, these products possess low mechanical properties unable to support the physiological loading to be used as tendon substitutes. Moreover, the procedures adopted to decellularize commercial biological scaffolds are commonly protected by an industrial knowhow that impedes the reproducibility and the direct comparison of the protocols.

There are also several limitations in comparing approaches and techniques presented in the literature, even if the aim of their research is the same. In fact, drawing a conclusion is an almost impossible challenge if we consider the use of tendon derived from several species, the different dimensions of the tissue treated with mechanical methods or chemical detergents at different concentrations, and the use of a variety of cell types cultured either in static or in dynamic conditions to recreate implantable constructs tested in different animal models. This potentially raises a concern about the impact of this analysis for further methodology development.

The ultimate animal species—providing tissue for xenotransplantation—should have some characteristics consistent with the clinical use. The limited risks of disease transmission, the appropriate dimensions, and the large availability independent of ethical concern are mandatory. Equine tendon xenografts could meet the requirements thanks to an inferior and geographically limited zoonosis, proper dimension, and biomechanical characteristics similar to human tendons and being the tissue harvest related to slaughter waste products. Moreover, the development of a tissue substitute derived from equine might also be employed in the reconstruction of tendon injuries commonly occurring in athletic horses or pets, thus creating a commercial product that can be also sold in the veterinary market. As emerged from our review, only few studies investigated equine tendon as source and none of them appears to demonstrate an adequate DNA removal. Thus, further evidences are required to support the use of this species.

As emerged from our analysis, efficient decellularization protocols require a combination of physical, enzymatic, and chemical treatments to eliminate as much of cellular residues as possible to make the construct safe for transplantation. From these studies emerges the fact that TBP and SDS are the most efficacious reagents to obtain a performing decellularized tendon matrix, while preserving the mechanical properties of the native tendon. An interesting approach to ameliorate the final product characteristics is the association of these reagents with endonucleases (RNAse or DNAse) in order to avoid immunogenicity caused by cell residues and the use of protease inhibitors (aprotinin and leupeptin) to prevent matrix disruption or weakening by proteases. Also the removal of reagent remaining is mandatory to contain the inflammatory response; hence supplementary investigations could be done to verify the construct biocompatibility such as the evaluation of cytotoxicity or proinflammatory cytokines release.

The ECM structure might become more compact or more inhomogeneous in response to decellularization treatments; thus the use of detergents like PAA could promote cell penetration and migration through the matrix improving scaffold permeability. PAA is also frequently used as a sterilizing detergent even though it is not an approved method for the clinical translatability. From a clinical point of view, it will be important to further investigate a sterilization method able to achieve sterility insurance levels without compromising biomechanical and biocompatible features of the scaffold.

The biological scaffolds derived from decellularized tendon are often reseeded with different cell types to recreate implantable constructs either in static or in dynamic culture conditions. Tenocytes, fibroblasts, bone-marrow- (BMSCs), adipose- (ASCs), and tendon-derived (TSPCs) stromal cells are all possible candidates for tissue engineering approaches. Despite that, the use of BMSCs is encouraged because of their advantageous characteristics, requiring less invasive harvesting procedures and their immunomodulatory features being favorable for transplantation with respect to cells isolated from other tissues. As the goal of decellularizing tendons apparently is to reseed them with host cells before implantation, one of the most challenging aspects is optimizing the cell invasion of such a dense tissue like tendon. Thus, the use of bioreactors supports the cell penetration and distribution within the matrix structure to accelerate the in vitro production of biological constructs able to better support the host integration and functionality after implantation while maintaining viable the reseeded cells.

The obtained implantable tendon devices have been successfully implanted in preclinical animal models to reconstruct experimentally induced tendon damage or tissue loss. In the literature, different species are described as proper models to study the physiopathology and regeneration pathway of this tissue, but the highest balance compared to humans’ features can be found in rabbits, merging appropriate tendon size with contained costs and an easy handling. However, the best choice of animal model depends on the research question and expected results in terms of tendon rupture and repair and scaffold integration.

In conclusion, the detection of a proper extracellular matrix as a tissue substitute able to deliver viable autologous cells and eventually biological agents might be a promising approach in the regeneration of injured tendon. However, it will be critical to standardize decellularization or reseeding protocols to obtain reproducible products able to become a near-term clinical reality.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Authors’ Contribution

Arianna B. Lovati and Marta Bottagisio contributed equally to this work.

Acknowledgment

This study was funded by the Italian Ministry of Health (RF-GR-2011-02348899).

References

J. P. de Jong, J. T. Nguyen, A. J. M. Sonnema, E. C. Nguyen, P. C. Amadio, and S. L. Moran, “The incidence of acute traumatic tendon injuries in the hand and wrist: a 10-year population-based study,” Clinics in Orthopedic Surgery, vol. 6, no. 2, pp. 196–202, 2014.

M. E. O'Sullivan and J. Colville, “The economic impact of hand injuries,” Journal of Hand Surgery, vol. 18, no. 3, pp. 395–398, 1993.

N. Andarawis-Puri, E. T. Ricchetti, and L. J. Soslowsky, “Interaction between the supraspinatus and infraspinatus tendons: effect of anterior supraspinatus tendon full-thickness tears on infraspinatus tendon strain,” American Journal of Sports Medicine, vol. 37, no. 9, pp. 1831–1839, 2009.

C. Holm, M. Kjaer, and P. Eliasson, “Achilles tendon rupture—treatment and complications: a systematic review,” Scandinavian Journal of Medicine and Science in Sports, vol. 25, no. 1, pp. e1–e10, 2015.

E. Shapiro, D. Grande, and M. Drakos, “Biologics in Achilles tendon healing and repair: a review,” Current Reviews in Musculoskeletal Medicine, vol. 8, no. 1, pp. 9–17, 2015.

R. James, G. Kesturu, G. Balian, and A. B. Chhabra, “Tendon: biology, biomechanics, repair, growth factors, and evolving treatment options,” Journal of Hand Surgery, vol. 33, no. 1, pp. 102–112, 2008.

J. Chen, J. Xu, A. Wang, and M. Zheng, “Scaffolds for tendon and ligament repair: review of the efficacy of commercial products,” Expert Review of Medical Devices, vol. 6, no. 1, pp. 61–73, 2009.

U. G. Longo, A. Lamberti, N. Maffulli, and V. Denaro, “Tendon augmentation grafts: a systematic review,” British Medical Bulletin, vol. 94, no. 1, pp. 165–188, 2010.

C. W. Cheng, L. D. Solorio, and E. Alsberg, “Decellularized tissue and cell-derived extracellular matrices as scaffolds for orthopaedic tissue engineering,” Biotechnology Advances, vol. 32, no. 2, pp. 462–484, 2014.

T. W. Gilbert, T. L. Sellaro, and S. F. Badylak, “Decellularization of tissues and organs,” Biomaterials, vol. 27, no. 19, pp. 3675–3683, 2006.

A. Y. Zhang, S. J. Bates, E. Morrow, H. Pham, B. Pham, and J. Chang, “Tissue-engineered intrasynovial tendons: optimization of acellularization and seeding,” Journal of Rehabilitation Research and Development, vol. 46, no. 4, pp. 489–498, 2009.

A. K. S. Chong, J. Riboh, R. L. Smith, D. P. Lindsey, H. M. Pham, and J. Chang, “Flexor tendon tissue engineering: acellularized and reseeded tendon constructs,” Plastic and Reconstructive Surgery, vol. 123, no. 6, pp. 1759–1766, 2009.

S. Xing, C. Liu, B. Xu, J. Chen, D. Yin, and C. Zhang, “Effects of various decellularization methods on histological and biomechanical properties of rabbit tendons,” Experimental and Therapeutic Medicine, vol. 8, no. 2, pp. 628–634, 2014.

S. Saber, A. Y. Zhang, S. H. Ki et al., “Flexor tendon tissue engineering: bioreactor cyclic strain increases construct strength,” Tissue Engineering Part A, vol. 16, no. 6, pp. 2085–2090, 2010.

T. Tischer, S. Vogt, S. Aryee et al., “Tissue engineering of the anterior cruciate ligament: a new method using acellularized tendon allografts and autologous fibroblasts,” Archives of Orthopaedic and Trauma Surgery, vol. 127, no. 9, pp. 735–741, 2007.

T. Tischer, S. Aryee, G. Wexel et al., “Tissue engineering of the anterior cruciate ligament-sodium dodecyl sulfate-acellularized and revitalized tendons are inferior to native tendons,” Tissue Engineering—Part A, vol. 16, no. 3, pp. 1031–1040, 2010.

I. K. Angelidis, J. Thorfinn, I. D. Connolly, D. Lindsey, H. M. Pham, and J. Chang, “Tissue engineering of flexor tendons: the effect of a tissue bioreactor on adipoderived stem cell-seeded and fibroblast-seeded tendon constructs,” The Journal of Hand Surgery, vol. 35, no. 9, pp. 1466–1472, 2010.

A. Y. Zhang, J. Thorfinn, S. Saber et al., “Tissue engineered intrasynovial tendons: in vivo graft survival and tensile strength,” European Journal of Plastic Surgery, vol. 33, no. 5, pp. 283–289, 2010.

J. S. Cartmell and M. G. Dunn, “Development of cell-seeded patellar tendon allografts for anterior cruciate ligament reconstruction,” Tissue Engineering, vol. 10, no. 7-8, pp. 1065–1075, 2004.

C. Azuma, H. Tohyama, H. Nakamura, F. Kanaya, and K. Yasuda, “Antibody neutralization of TGF-beta enhances the deterioration of collagen fascicles in a tissue-cultured tendon matrix with ex vivo fibroblast infiltration,” Journal of Biomechanics, vol. 40, no. 10, pp. 2184–2190, 2007.

G. S. Kryger, A. K. S. Chong, M. Costa, H. Pham, S. J. Bates, and J. Chang, “A comparison of tenocytes and mesenchymal stem cells for use in flexor tendon tissue engineering,” Journal of Hand Surgery, vol. 32, no. 5, pp. 597–605, 2007.

J. Thorfinn, S. Saber, I. K. Angelidis et al., “Flexor tendon tissue engineering: temporal distribution of donor tenocytes versus recipient cells,” Plastic and Reconstructive Surgery, vol. 124, no. 6, pp. 2019–2026, 2009.

J. S. Cartmell and M. G. Dunn, “Effect of chemical treatments on tendon cellularity and mechanical properties,” Journal of Biomedical Materials Research, vol. 49, no. 1, pp. 134–140, 2000.

C. Güngörmüş, D. Kolankaya, and E. Aydin, “Histopathological and biomechanical evaluation of tenocyte seeded allografts on rat Achilles tendon regeneration,” Biomaterials, vol. 51, pp. 108–118, 2015.

P. W. Whitlock, T. L. Smith, G. G. Poehling, J. S. Shilt, and M. Van Dyke, “A naturally derived, cytocompatible, and architecturally optimized scaffold for tendon and ligament regeneration,” Biomaterials, vol. 28, no. 29, pp. 4321–4329, 2007.

T. Martinello, I. Bronzini, A. Volpin et al., “Successful recellularization of human tendon scaffolds using adipose-derived mesenchymal stem cells and collagen gel,” Journal of Tissue Engineering and Regenerative Medicine, vol. 8, no. 8, pp. 612–619, 2014.

C. Y. L. Woon, B. C. Pridgen, A. Kraus, S. Bari, H. Pham, and J. Chang, “Optimization of human tendon tissue engineering: peracetic acid oxidation for enhanced reseeding of acellularized intrasynovial tendon,” Plastic and Reconstructive Surgery, vol. 127, no. 3, pp. 1107–1117, 2011.

C. Y. L. Woon, S. Farnebo, T. Schmitt et al., “Human flexor tendon tissue engineering: revitalization of biostatic allograft scaffolds,” Tissue Engineering—Part A, vol. 18, no. 23-24, pp. 2406–2417, 2012.

S. S. Raghavan, C. Y. L. Woon, A. Kraus, K. Megerle, H. Pham, and J. Chang, “Optimization of human tendon tissue engineering: synergistic effects of growth factors for use in tendon scaffold repopulation,” Plastic and Reconstructive Surgery, vol. 129, no. 2, pp. 479–489, 2012.

S. S. Raghavan, C. Y. L. Woon, A. Kraus et al., “Human flexor tendon tissue engineering: decellularization of human flexor tendons reduces immunogenicity in vivo,” Tissue Engineering Part A, vol. 18, no. 7-8, pp. 796–805, 2012.

B. C. Pridgen, C. Y. L. Woon, M. Y. Kim et al., “Flexor tendon tissue engineering: acellularization of human flexor tendons with preservation of biomechanical properties and biocompatibility,” Tissue Engineering Part C: Methods, vol. 17, no. 8, pp. 819–828, 2011.

T. Schmitt, P. M. Fox, C. Y. Woon et al., “Human flexor tendon tissue engineering: in vivo effects of stem cell reseeding,” Plastic and Reconstructive Surgery, vol. 132, no. 4, pp. 567–576, 2013.

Y. Ozasa, P. C. Amadio, A. R. Thoreson, K.-N. An, and C. Zhao, “The effect of surface modification on gliding ability of decellularized flexor tendon in a canine model in vitro,” The Journal of Hand Surgery, vol. 38, no. 9, pp. 1698–1704, 2013.

Y. Ozasa, P. C. Amadio, A. R. Thoreson, K.-N. An, and C. Zhao, “Repopulation of intrasynovial flexor tendon allograft with bone marrow stromal cells: an ex vivo model,” Tissue Engineering Part A, vol. 20, no. 3-4, pp. 566–574, 2014.

H. Omae, C. Zhao, Y. L. Sun, K.-N. An, and P. C. Amadio, “Multilayer tendon slices seeded with bone marrow stromal cells: a novel composite for tendon engineering,” Journal of Orthopaedic Research, vol. 27, no. 7, pp. 937–942, 2009.

H. Omae, Y. L. Sun, K.-N. An, P. C. Amadio, and C. Zhao, “Engineered tendon with decellularized xenotendon slices and bone marrow stromal cells: an in vivo animal study,” Journal of Tissue Engineering and Regenerative Medicine, vol. 6, no. 3, pp. 238–244, 2012.

L.-J. Ning, Y. Zhang, X.-H. Chen et al., “Preparation and characterization of decellularized tendon slices for tendon tissue engineering,” Journal of Biomedical Materials Research—Part A, vol. 100, no. 6, pp. 1448–1456, 2012.

J. Pan, G. M. Liu, L. J. Ning et al., “Rotator cuff repair using a decellularized tendon slices graft: an in vivo study in a rabbit model,” Knee Surgery, Sports Traumatology, Arthroscopy, vol. 23, no. 5, pp. 1524–1535, 2015.

T. W. Qin, Y. L. Sun, A. R. Thoreson et al., “Effect of mechanical stimulation on bone marrow stromal cell-seeded tendon slice constructs: a potential engineered tendon patch for rotator cuff repair,” Biomaterials, vol. 51, pp. 43–50, 2015.

A. Lohan, C. Stoll, M. Albrecht et al., “Human hamstring tenocytes survive when seeded into a decellularized porcine Achilles tendon extracellular matrix,” Connective Tissue Research, vol. 54, no. 4-5, pp. 305–312, 2013.

K.-I. Lee, J.-S. Lee, J.-G. Kim et al., “Mechanical properties of decellularized tendon cultured by cyclic straining bioreactor,” Journal of Biomedical Materials Research Part A, vol. 101, no. 11, pp. 3152–3158, 2013.

C. R. Deeken, A. K. White, S. L. Bachman et al., “Method of preparing a decellularized porcine tendon using tributyl phosphate,” Journal of Biomedical Materials Research—Part B: Applied Biomaterials, vol. 96, no. 2, pp. 199–206, 2011.

J. H. Ingram, S. Korossis, G. Howling, J. Fisher, and E. Ingham, “The use of ultrasonication to aid recellularization of acellular natural tissue scaffolds for use in anterior cruciate ligament reconstruction,” Tissue Engineering, vol. 13, no. 7, pp. 1561–1572, 2007.

Z. Yin, X. Chen, T. Zhu et al., “The effect of decellularized matrices on human tendon stem/progenitor cell differentiation and tendon repair,” Acta Biomaterialia, vol. 9, no. 12, pp. 9317–9329, 2013.

J. Burk, I. Erbe, D. Berner et al., “Freeze-thaw cycles enhance decellularization of large tendons,” Tissue Engineering—Part C: Methods, vol. 20, no. 4, pp. 276–284, 2014.

D. W. Youngstrom, J. G. Barrett, R. R. Jose, and D. L. Kaplan, “Functional characterization of detergent-decellularized equine tendon extracellular matrix for tissue engineering applications,” PLoS ONE, vol. 8, no. 5, Article ID e64151, 2013.

S. S. Durgam, A. A. Stewart, H. C. Pondenis, S. M. Gutierrez-Nibeyro, R. B. Evans, and M. C. Stewart, “Comparison of equine tendon-and bone marrow-derived cells cultured on tendon matrix with or without insulin-like growth factor-I supplementation,” American Journal of Veterinary Research, vol. 73, no. 1, pp. 153–161, 2012.

D. W. Youngstrom, I. Rajpar, D. L. Kaplan, and J. G. Barrett, “A bioreactor system for in vitro tendon differentiation and tendon tissue engineering,” Journal of Orthopaedic Research, vol. 33, no. 6, pp. 911–918, 2015.

K. A. Alberti, J.-Y. Sun, W. R. Illeperuma, Z. Suo, and Q. Xu, “Laminar tendon composites with enhanced mechanical properties,” Journal of Materials Science, vol. 50, no. 6, pp. 2616–2625, 2015.

K. Legerlotz, J. Dorn, J. Richter, M. Rausch, and O. Leupin, “Age-dependent regulation of tendon crimp structure, cell length and gap width with strain,” Acta Biomaterialia, vol. 10, no. 10, pp. 4447–4455, 2014.

D. C. Borie, D. V. Cramer, L. Phan-Thanh et al., “Microbiological hazards related to xenotransplantation of porcine organs into man,” Infection Control and Hospital Epidemiology, vol. 19, no. 5, pp. 355–365, 1998.

J. Weese, “A review of equine zoonotic diseases: risks in veterinary medicine,” Proceedings of the Annual Convention of the AAEP, vol. 48, pp. 362–369, 2002.

P. V. Komi, S. Fukashiro, and M. Jarvinen, “Biomechanical loading of Achilles tendon during normal locomotion,” Clinics in Sports Medicine, vol. 11, no. 3, pp. 521–531, 1992.

B. S. F. Pang and M. Ying, “Sonographic measurement of Achilles tendons in asymptomatic subjects: variation with age, body height, and dominance of ankle,” Journal of Ultrasound in Medicine, vol. 25, no. 10, pp. 1291–1296, 2006.

S. J. Obst, J.-B. Renault, R. Newsham-West, and R. S. Barrett, “Three-dimensional deformation and transverse rotation of the human free Achilles tendon in vivo during isometric plantarflexion contraction,” Journal of Applied Physiology, vol. 116, no. 4, pp. 376–384, 2014.

S. J. Obst, R. Newsham-West, and R. S. Barrett, “In vivo measurement of human achilles tendon morphology using freehand 3-D ultrasound,” Ultrasound in Medicine and Biology, vol. 40, no. 1, pp. 62–70, 2014.

L. J. Ning, Y. J. Zhang, Y. Zhang et al., “The utilization of decellularized tendon slices to provide an inductive microenvironment for the proliferation and tenogenic differentiation of stem cells,” Biomaterials, vol. 52, pp. 539–550, 2015.

K. Le Blanc, F. Frassoni, L. Ball et al., “Mesenchymal stem cells for treatment of steroid-resistant, severe, acute graft-versus-host disease: a Phase II Study,” The Lancet, vol. 371, no. 9624, pp. 1579–1586, 2008.

A. Matson, N. Konow, S. Miller, P. P. Konow, and T. J. Roberts, “Tendon material properties vary and are interdependent among turkey hindlimb muscles,” Journal of Experimental Biology, vol. 215, no. 20, pp. 3552–3558, 2012.

T. A. L. Wren, S. A. Yerby, G. S. Beaupré, and D. R. Carter, “Mechanical properties of the human achilles tendon,” Clinical Biomechanics, vol. 16, no. 3, pp. 245–251, 2001.

G. D. Carlson, M. J. Botte, M. S. Josephs, P. O. Newton, J. L. W. Davis, and S. L.-Y. Woo, “Morphologic and biomechanical comparison of tendons used as free grafts,” Journal of Hand Surgery, vol. 18, no. 1, pp. 76–82, 1993.

R. F. Ker, X. T. Wang, and A. V. L. Pike, “Fatigue quality of mammalian tendons,” Journal of Experimental Biology, vol. 203, no. 8, pp. 1317–1327, 2000.

J. Louis-Ugbo, B. Leeson, and W. C. Hutton, “Tensile properties of fresh human calcaneal (Achilles) tendons,” Clinical Anatomy, vol. 17, no. 1, pp. 30–35, 2004.

A. Robertson, R. W. Nutton, and J. F. Keating, “Current trends in the use of tendon allografts in orthopaedic surgery,” The Journal of Bone & Joint Surgery—British Volume, vol. 88, no. 8, pp. 988–992, 2006.

A.-M. Kajbafzadeh, N. Javan-Farazmand, M. Monajemzadeh, and A. Baghayee, “Determining the optimal decellularization and sterilization protocol for preparing a tissue scaffold of a human-sized liver tissue,” Tissue Engineering—Part C: Methods, vol. 19, no. 8, pp. 642–651, 2013.

A. Nichols, D. C. Burns, and R. Christopher, “Studies on the sterilization of human bone and tendon musculoskeletal allograft tissue using supercritical carbon dioxide,” Journal of Orthopaedics, vol. 6, no. 2, p. e9, 2009.

D. W. Jackson, G. E. Windler, and T. M. Simon, “Intraarticular reaction associated with the use of freeze-dried, ethylene oxide-sterilized bone-patella tendon-bone allografts in the reconstruction of the anterior cruciate ligament,” The American Journal of Sports Medicine, vol. 18, no. 1, pp. 1–11, 1990.

M. F. Moreau, Y. Gallois, M.-F. Baslé, and D. Chappard, “Gamma irradiation of human bone allografts alters medullary lipids and releases toxic compounds for osteoblast-like cells,” Biomaterials, vol. 21, no. 4, pp. 369–376, 2000.

S.-S. Gouk, T.-M. Lim, S.-H. Teoh, and W. Q. Sun, “Alterations of human acellular tissue matrix by gamma irradiation: histology, biomechanical property, stability, in vitro cell repopulation, and remodeling,” Journal of Biomedical Materials Research—Part B: Applied Biomaterials, vol. 84, no. 1, pp. 205–217, 2008.

Q.-Q. Qiu, P. Leamy, J. Brittingham, J. Pomerleau, N. Kabaria, and J. Connor, “Inactivation of bacterial spores and viruses in biological material using supercritical carbon dioxide with sterilant,” Journal of Biomedical Materials Research Part B: Applied Biomaterials, vol. 91, no. 2, pp. 572–578, 2009.

K. A. Derwin, M. J. Codsi, R. A. Milks, A. R. Baker, J. A. McCarron, and J. P. Iannotti, “Rotator cuff repair augmentation in a canine model with use of a woven poly-L-lactide device,” The Journal of Bone & Joint Surgery—American Volume, vol. 91, no. 5, pp. 1159–1171, 2009.

M. J. Smith, J. L. Cook, K. Kuroki et al., “Comparison of a novel bone-tendon allograft with a human dermis-derived patch for repair of chronic large rotator cuff tears using a canine model,” Arthroscopy, vol. 28, no. 2, pp. 169–177, 2012.

D. H. Sonnabend, C. R. Howlett, and A. A. Young, “Histological evaluation of repair of the rotator cuff in a primate model,” The Journal of Bone & Joint Surgery—British Volume, vol. 92, no. 4, pp. 586–594, 2010.

T. F. Schlegel, R. J. Hawkins, C. W. Lewis, T. Motta, and A. S. Turner, “The effects of augmentation with swine small intestine submucosa on tendon healing under tension: histologic and mechanical evaluations in sheep,” American Journal of Sports Medicine, vol. 34, no. 2, pp. 275–280, 2006.

T. L. Sarrafian, H. Wang, E. S. Hackett et al., “Comparison of Achilles tendon repair techniques in a sheep model using a cross-linked acellular porcine dermal patch and platelet-rich plasma fibrin matrix for augmentation,” The Journal of Foot & Ankle Surgery, vol. 49, no. 2, pp. 128–134, 2010.

E. Everett, J. G. Barrett, J. Morelli, and R. Devita, “Biomechanical testing of a novel suture pattern for repair of equine tendon lacerations,” Veterinary Surgery, vol. 41, no. 2, pp. 278–285, 2012.

S. H. Franklin, S. Z. Barakzai, A. Couroucé-Malblanc et al., “Investigation of the incidence and type of injuries associated with high-speed treadmill exercise testing,” Equine Veterinary Journal, vol. 42, no. 38, pp. 70–75, 2010.

W. Xia, Y. Wang, R. C. Appleyard, G. A. Smythe, and G. A. C. Murrell, “Spontaneous recovery of injured Achilles tendon in inducible nitric oxide synthase gene knockout mice,” Inflammation Research, vol. 55, no. 1, pp. 40–45, 2006.

L. A. Solchaga, A. Bendele, V. Shah et al., “Comparison of the effect of intra-tendon applications of recombinant human platelet-derived growth factor-BB, platelet-rich plasma, steroids in a rat achilles tendon collagenase model,” Journal of Orthopaedic Research, vol. 32, no. 1, pp. 145–150, 2014.

R. R. Fox, “The rabbit as a research subject,” Physiologist, vol. 27, no. 6, pp. 393–402, 1984.

L. H. Nakama, K. B. King, S. Abrahamsson, and D. M. Rempel, “Evidence of tendon microtears due to cyclical loading in an in vivo tendinopathy model,” Journal of Orthopaedic Research, vol. 23, no. 5, pp. 1199–1205, 2005.

K. Rowshan, S. Hadley, K. Pham, V. Caiozzo, T. Q. Lee, and R. Gupta, “Development of fatty atrophy after neurologic and rotator cuff injuries in an animal model of rotator cuff pathology,” The Journal of Bone & Joint Surgery—American Volume, vol. 92, no. 13, pp. 2270–2278, 2010.

U. G. Longo, A. Lamberti, S. Petrillo, N. Maffulli, and V. Denaro, “Scaffolds in tendon tissue engineering,” Stem Cells International, vol. 2012, Article ID 517165, 8 pages, 2012.

M. Broese, I. Toma, C. Haasper et al., “Seeding a human tendon matrix with bone marrow aspirates compared to previously isolated hBMSCs—an in vitro study,” Technology and Health Care, vol. 19, no. 6, pp. 469–479, 2011.

M. Petri, C. Kruppa, C. Haasper et al., “Effects of continuous perfusion on human bone marrow stromal cells seeded on a decellularized bovine Achilles tendon matrix,” Technology and Health Care, vol. 19, no. 4, pp. 223–231, 2011.

J. Nyland, N. Larsen, R. Burden, H. Chang, and D. N. M. Caborn, “Biomechanical and tissue handling property comparison of decellularized and cryopreserved tibialis anterior tendons following extreme incubation and rehydration,” Knee Surgery, Sports Traumatology, Arthroscopy, vol. 17, no. 1, pp. 83–91, 2009.