Stem Cells International
Volume 2021 (2021), Article ID 9897280, 2 pages
https://doi.org/10.1155/2021/9897280

Erratum

Erratum to “Gli1+ Cells Residing in Bone Sutures Respond to Mechanical Force via IP3R to Mediate Osteogenesis”

Xiaoyao Huang,1,2 Zihan Li,1,2 Peisheng Liu,1,2,3 Meiling Wu,1,2 An-qi Liu,1,2 Chenghu Hu,² Xuemei Liu,1,2 Hao Guo,1,2 Xiaoxue Yang,¹ Xiaohe Guo,¹ Bei Li,² Xiaoning He,² Kun Xuan,¹ and Yan Jin²

¹State Key Laboratory of Military Stomatology & National Clinical Research Center for Oral Diseases & Shaanxi Clinical Research Center for Oral Diseases, Department of Preventive Dentistry, School of Stomatology, The Fourth Military Medical University, Xi’an 710032, China
²State Key Laboratory of Military Stomatology & National Clinical Research Center for Oral Diseases & Shaanxi International Joint Research Center for Oral Diseases, Center for Tissue Engineering, School of Stomatology, The Fourth Military Medical University, Xi’an 710032, China
³College of Life Science, Northwest University, Xi’an, China

Correspondence should be addressed to Xiaoning He; hxn_800222@163.com, Kun Xuan; xuankun@fmmu.edu.cn, and Yan Jin; yanjin@fmmu.edu.cn

Received 31 October 2021; Accepted 31 October 2021; Published 20 November 2021

Copyright © 2021 Xiaoyao Huang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled, “Gli1+ Cells Residing in Bone Sutures Respond to Mechanical Force via IP3R to Mediate Osteogenesis” [1], there is an error in Figures 3(d) and 5(d) which was introduced during production process. The corrected Figures 3(d) and 5(d) is shown below.

Figure 3

Figure 5

References

X. Huang, Z. Li, P. Liu et al., “Gli1+ cells residing in bone sutures respond to mechanical force via IP3R to mediate osteogenesis,” Stem Cells International, vol. 2021, Article ID 8138374, 15 pages, 2021.