Tuberculosis Research and Treatment
Volume 2021 (2021), Article ID 6622809, 6 pages
https://doi.org/10.1155/2021/6622809

Research Article

Accuracy and Incremental Yield of the Chest X-Ray in Screening for Tuberculosis in Uganda: A Cross-Sectional Study

Joanitah Nalunjogi,1,2 Frank Mugabe,³ Irene Najjingo,1,2 Pastan Lusiba,² Francis Olweny,² Joseph Mubiru,⁴ Edward Kayongo,² Rogers Sekibira,¹ Achilles Katamba,² and Bruce Kirenga1,5

¹Makerere University Lung Institute, College of Health Sciences, Makerere University, Uganda
²Clinical Epidemiology Unit, College of Health Sciences, Makerere University, Uganda
³Uganda National Tuberculosis and Leprosy Program, Ministry of Health, Uganda
⁴Accident and Emergency Unit, Mulago National Referral Hospital, Kampala, Uganda
⁵Division of Pulmonary Medicine, College of Health Sciences, Makerere University, Uganda

Correspondence should be addressed to Joanitah Nalunjogi; jmukwaba@gmail.com

Received 27 November 2020; Revised 2 March 2021; Accepted 8 March 2021; Published 20 March 2021

Academic Editor: Adwoa Asante-Poku

Copyright © 2021 Joanitah Nalunjogi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The WHO END TB strategy requires ≥90% case detection to combat tuberculosis (TB). Increased TB case detection requires a more sensitive and specific screening tool. Currently, the symptoms recommended for screening TB have been found to be suboptimal since up to 44% of individuals with TB are asymptomatic. The chest X-ray (CXR) as a screening tool for pulmonary TB was evaluated in this study, as well as its incremental yield in TB diagnosis using a cross-sectional study involving secondary analysis of data of 4512 consented/assented participants ≥15 years who participated in the Uganda National TB prevalence survey between 2014 and 2015. Participants with a cough ≥2 weeks, fever, weight loss, and night sweats screened positive for TB using the symptoms screening method, while participants with a TB defining abnormality on CXR screened positive for TB by the CXR screening method. The Löwenstein-Jensen (LJ) culture was used as a gold standard for TB diagnosis. The CXR had 93% sensitivity and 65% specificity compared to LJ culture results, while symptoms had 76% sensitivity and 31% specificity. The screening algorithm involving the CXR in addition to symptoms led to a 38% increment in the yield of diagnosed tuberculosis. The number needed to screen using the CXR and symptoms screening algorithm was 32 compared to 45 when the symptoms are used alone. Therefore, the CXR in combination with symptoms is a good TB screening tool and increases the yield of diagnosed TB.

1. Introduction

The WHO 2020 estimates show that tuberculosis (TB) was responsible for 1.4 million deaths [1]. In order to combat tuberculosis, WHO proposed three strategies including intensified case finding (ICF), isoniazid preventive therapy (IPT), and infection control (IC) [2]. In addition, the WHO END TB strategy indicates a need for ≥90% TB case detection among others to combat TB [3].

Uganda has a high TB incidence of 201 per 100,000 population as well as high TB-related mortality of 26 per 100,000 population with a TB case detection rate of 72% [4].

The strategic plan for the Uganda national TB and leprosy programme (NTLP) sought to achieve 85% case detection by 2019/2020; however, confirming TB was difficult. Currently, TB culture is the gold standard, but financial and logistic challenges make it difficult to scale up. There is a need to explore more widely available, low-cost screening and diagnostic tools and algorithms to aid TB diagnosis such as the chest radiograph (CXR), as improved TB diagnostics (Gene Xpert) have now become available. Currently, the symptoms screening tool is employed for TB screening in Uganda. This symptoms screening tool has been observed to have 40.7% sensitivity and 81.3% specificity according to a survey done in South Africa considering the presence of any cough, fever, weight loss, or night sweats [5]. Systematic reviews done to assess the performance of the symptoms in high HIV prevalence regions such as Uganda have shown 84% sensitivity and 74% specificity [6]. The symptoms screening tool therefore runs a risk of missing patients with TB as the patients do not seek care and do not have symptoms due to early TB disease. These patients if not diagnosed early by a more specific screening test will continue to spread TB in the community and present with complications due to TB hence poor treatment outcomes.

The recognition that bold new strategies are needed to control TB (END TB Strategy) has led to reconsideration of CXR as a potential TB screening tool, as innovative, lower costs strategies for performing CXR (digital radiography) and reading them (computer-aided reading) have become available [7, 8]. The CXR was commonly used in mass screening campaigns in Europe and the USA in the early TB chemotherapy era (1950s) but has not been widely used in screening TB in low-income countries because of high cost and lack of capacity [9, 10]. This CXR has been found to have 98% sensitivity and 75% specificity in a systematic review done among HIV-negative and HIV-positive individuals [6].

The use of more sensitive TB screening tools such as the CXR may increase the pool of presumptive TB cases hence increasing case detection as more individuals are exposed to the confirmatory test (Gene Xpert or Culture) which ultimately leads to a reduction in mortality and morbidity [11]. In order to assess the accuracy of the CXR in screening tuberculosis, there is a need to use a test known to confirm tuberculosis such as Lowenstein Jensen (LJ) culture.

Uganda carried out a national TB prevalence survey (UTPS) from 2014 to 2015 which screened for TB by collecting data on TB symptoms using questionnaires and performed CXR in all consenting participants; in addition, all sputa were cultured on LJ media to confirm tuberculosis [12].

Therefore, using the data from UTPS, we sought to evaluate the accuracy and incremental yield of using the CXR in screening for TB in Uganda.

2. Materials and Methods

2.1. Study Design

We conducted a cross-sectional study by secondary analysis of the data collected during the Uganda National TB prevalence survey (UTPS) [13]. The UTPS was conducted from October 2014 to July 2015 with the primary objective of determining the prevalence of TB in Uganda. Eligible respondents aged ≥15 years were randomly selected in blocks to participate in the study [12, 13].

All eligible consenting/assenting individuals who were ≥15years were screened for TB using a questionnaire which listed the symptoms and a CXR. Parents/guardians of individuals <18 years offered informed consent. Participants with a cough ≥2 weeks, TB defining abnormality on CXR examination/or any abnormality in the lung on CXR examination, and respondents without a CXR were considered presumptive for TB. All presumptive TB respondents were requested to submit two sputum samples (a spot and an early morning sample) for microscopy and culture. All positive samples by microscopy and contaminated culture samples were subjected to Xpert MTB/RIF test to confirm the presence of mycobacterium tuberculosis (MTB). The CXRs were read by 3 independent radiologists. LJ culture was used as a gold standard for the confirmation of tuberculosis among the survey participants. All records in the electronic database that had bacteriological confirmation of TB as per UTPS by culture were analysed for the substudy [12]. Participants with mycobacterium other than tuberculosis (MOTT) were identified using SD Bio line on positive cultures and Xpert MTB/RIF done on positive smears and contaminated cultures. All individuals with MOTT were not reported as MTB cases. In the UTPS, all cases of TB reported as survey TB were confirmed on culture.

The STARD 2015 guidelines [14] were used to report the results of this study. Data was analysed using Stata version 13.0 (College Station, Texas, USA). In our study, records with any of the above symptoms, i.e., cough ≥2 weeks, fever, weight loss, or night sweats were analysed as positive for symptoms. Records indicating CXR abnormalities suggestive of active TB were analysed as positive by the CXR. Records with culture-confirmed TB were considered as the gold standard for determining the performance of the CXR or symptoms in screening tuberculosis.

Variables were summarised using percentages. Performance of the symptoms screening and CXR were reported as sensitivity, specificity, and negative and positive predictive values. The proportion of confirmed TB cases obtained using the CXR screen was reported as the yield due to the CXR in percentages. The proportion of confirmed TB cases obtained using the symptoms screen was reported as yield due to the symptoms screen and reported in percentages. The incremental yield of the CXR was reported as a percentage increase in the total number of TB cases diagnosed through an algorithm involving the CXR versus an algorithm involving the symptoms screen alone.

3. Results

3.1. Study Profile

A total of 41,154 participants were enumerated for screening in the UTPS. We excluded 36,012 records of participants who screened negative on the CXR and symptoms and therefore were not required to submit sputum for TB diagnosis. 630 records that were missing data on culture results were additionally excluded leaving 4512 records for further analysis as shown below (Figure 1).

Figure 1: Study profile.

3.2. Characteristics of the Study Population

The study included individuals aged 15–65 years. The participants between ages 25 and 34 years were 846 (19%) as well as those in the age group 35–44 years 860 (19%). There was an equal number of females 2266 (50%) and males. Cough was present in 63% of the respondents, while 6% of the respondents had CXR abnormalities consistent with active TB disease. MOTT was present in 1% of the cultures (Table 1).

Table 1: Demographic, clinical, and radiographic characteristics of the study population.

Characteristic
 N (%)

Age

15-24 yrs
767 (17)

25-34 yrs
846 (19)

35-44 yrs
860 (19)

45-54 yrs
727 (16)

55-64 yrs
474 (11)

65+ yrs
838 (18)

Female
2266 (50)

Education

None
1283 (28)

Primary
2135 (47)

Secondary
890 (20)

Tertiary
204 (5)

Employed
3603 (80)

Rural residence
2889 (64)

Smoking

Never
3277 (73)

Current
640 (14)

Past
595 (13)

HIV

Positive
392 (10)

Symptom characteristics∞

Cough∞
2827 (63)

Fever∞
668 (14)

Weight loss∞
608 (14)

Night sweats∞
394 (9)

CXR characteristics

Normal
2784 (63)

Abnormal healed TB
232 (5)

Abnormal active TB
275 (6)

Abnormal not TB
1150 (26)

Culture confirmed TB

MTB
160 (3)

MOTT
26 (1)

Contaminated
57 (1)

Negative
4269 (95)

missing 474/4512 (10.1%), missing 71/4512 (1.6%) participants who declined to have a CXR examination, ∞each individual characteristics .

3.3. Performance of the Chest Radiograph or Symptoms in Screening TB in Uganda

Pulmonary TB was confirmed in 160 (3.6%) participants using LJ culture. The CXR had sensitivity 93% (95% CI; 87, 96) and specificity 97% (95% CI; 96, 98) compared to symptoms with sensitivity 76 (95% CI; 69, 83) and specificity 31% (95% CI; 30, 32).

The negative and positive predictive values of the CXR were 99% and 54% versus 97% and 4% of the symptoms. The CXR and symptoms combined had 100% sensitivity and 29% specificity. The positive and negative predictive values of this screening algorithm were 5% and 100%, respectively (Table 2).

Table 2: Performance of the CXR or symptoms in screening culture-confirmed pulmonary tuberculosis.

Strategy
Culture-confirmed TB
Total number
Sensitivity (95% CI)
Specificity (95% CI)
Positive predictive value (95% CI)
Negative predictive value (95% CI)

Prevalence
160
4512

CXR
148
4441
93 (87, 96)
97 (96, 98)
54 (48, 60)
99 (99, 100)

Symptoms
122
4512
76 (69, 83)
31 (30, 32)
4 (3, 5)
97 (96, 98)

CXR+symptoms
160
4512
100 (98, 100)
29 (28, 31)
5 (4, 6)
100 (99, 100)

3.4. Incremental Yield of Using the CXR in Screening TB versus Symptoms Alone

Using the symptoms alone in screening tuberculosis, 122/160 TB patients would have been diagnosed. The addition of the CXR in the TB screening algorithm increased the cases of TB diagnosed by 38 (23.8%). The number needed to screen was 32 individuals. The detailed results are shown in Table 3, below.

Table 3: Incremental yield and number needed to screen of using the CXR in a TB screening algorithm.

Strategy/algorithm
Screened
Tested
NNS
Number of TB cases
% of confirmed TB
Incremental yield (%)

Symptoms only
5142
4512
42
122
76
Ref

X-ray only
5142
4441
35
149
93
17

Symptoms and X-ray
5142
4441
32
160
100
23

NNS: number needed to screen (number of people needed to screen to diagnose a bacteriologically positive case, who has not been previously diagnosed by the health system). TB: tuberculosis.

4. Discussion

This study compared the accuracy of the CXR or symptoms against culture-confirmed pulmonary TB by the Lowenstein Jensen (LJ) method in a community TB screening setting such as the National TB prevalence survey.

Our results show that the CXR performs better than the symptoms in correlating with positive TB sputum culture results in community settings just like other studies [2, 15–19]. The sensitivity of 93% and specificity of 97% obtained when considering TB defining CXR abnormalities are comparable to the results obtained in a study done in London when a digital CXR was employed in active case finding [18]. These results indicate that the CXR performs better in correlating TB sputum culture results; therefore, the use of the CXR in addition to symptoms in TB screening in community settings increases TB case detection rate [20] in high TB prevalence settings which allows for timely initiation of TB treatment [19] as bacteriological confirmation and drug susceptibility tests are processed to further determine appropriate TB treatment [19]. Additionally, our screening algorithm involving both the CXR and symptoms showed 100% sensitivity and 29% specificity which results differ from those of a systematic review of TB screening algorithms where a screening algorithm involving both the CXR and symptoms showed sensitivity 87% and specificity 90% [6]. This difference could be explained by the fact that only individuals with symptoms and abnormal CXR exam were eligible for sputum evaluation in the UTPS hence overestimation of the sensitivity at the cost of specificity. However, the use of the CXR increases the overall sensitivity hence an increased number of individuals being subjected to the confirmatory tests resulting into increased TB yield [21, 22]. This is especially important in the era of the new advanced TB diagnostic tools such as the GeneXpert with high sensitivity and specificity [23].

In our study, the symptoms screen showed a sensitivity of 76% and specificity of 31%. These estimates are similar to those obtained in a systematic review of TB screening algorithms [6]; however, studies done in Asia, Zambia, and South Africa to evaluate the accuracy of symptoms in screening TB showed slightly different estimates of sensitivity and specificity of symptoms compared to those seen in our study [24, 25]. This could have resulted from the difference in the population under study, since our study only had cultures done from patients who screened positive by CXR or symptoms or did not have a CXR done.

Furthermore, a 38% increment in the number of TB cases diagnosed as well as a low number needed to screen 32 patients when using a screening algorithm involving both the CXR and symptoms is a good step towards interventions leading to increased TB case finding hence TB elimination. This increment was however lower than that reported in a study done in India among household contacts of TB patients [21]. The difference may be explained by the special population under which the study in India was done which is a more high-risk population for TB compared to the general population that we studied as well as the higher prevalence of TB in India compared to Uganda. This finding however provides insight into the innovations that may lead to the achievement of the 90% TB detection for the END TB strategy [3]. The results are also in agreement with a study done in South Africa on symptoms and digital CXR screening which recorded improvement in the yield of TB [26] screening among prisoners when both screening strategies were employed. The addition of the CXR to symptoms in screening TB can be employed to identify potential TB cases that would be missed when using only symptoms for screening. From our study, the algorithm involving the symptoms screening alone would have missed 23% of the patients with TB. Our finding is also supported by earlier reports of similar studies from different TB endemic countries [5, 13, 17, 24]. The strengths of our study include community screening for TB as shown by the use of data collected during the UTPS. The study was reported according to the STARD (Standards for reporting of Diagnostics Accuracy Studies) 2015 guidelines [14].

Our study is however subject to limitations. The fact that sputum culture was only done for participants with abnormal CXR or TB symptoms could have led to selection bias hence overestimation of the sensitivity of the CXR; however, the large sample size improves our estimation of the performance of the CXR. In addition, we only looked at culture-confirmed pulmonary TB but not clinically diagnosed and not culture-negative or extrapulmonary TB which could greatly impact the performance of symptoms screening and/or CXR to identify true TB. Additionally, the failure to use more sensitive TB confirmatory tests such as the Gene Xpert and Liquid culture could have led to underestimation of confirmed TB hence lead to underestimation of the performance of the CXR or symptoms. Finally, the study was performed under community screening conditions, and therefore, the results may not be applicable to hospital-based TB screening.

5. Conclusion

This study made use of data obtained during the Uganda National TB prevalence survey to determine the performance of the CXR in correlating TB culture results. The results indicate that the CXR is a good TB screening tool and may improve TB case detection when used in community TB screening in addition to symptoms assessment. Individuals with knowledge to observe TB defining pathology on the CXR are adequate to provide expertise for CXR interpretation.

Abbreviations

CXR: | Chest X-ray
HIV: | Human immune virus
IC: | Infection control
ICF: | Intensified case finding
IPT: | Isoniazid preventive therapy
LJ: | Lowenstein Jensen
MoH: | Ministry of Health
MOOT: | Mycobacterium other than TB
NNS: | Number needed to screen
NTLP: | National TB and leprosy programme
PLHIV: | People living with HIV
PTB: | Pulmonary tuberculosis
SOMREC: | School of Medicine Research and Ethics Committee
TB: | Tuberculosis
UTPS: | Uganda TB prevalence survey
WHO: | World Health Organisation.

Data Availability

All data generated or analysed during this study are accessible on reasonable request from the corresponding author.

Ethical Approval

Ethical approval of the original survey was granted by the institutional review boards of the Higher Degree Research and Ethics Committee at the Makerere University School of Public Health and the Uganda National Council of Science and Technology (reference IRB00011353). The nested study obtained a waiver of Informed consent from the Makerere University School of Medicine Research and Ethics Committee (SOMREC). Participants in the primary study offered written informed consent and or assent. Permission to use the data was obtained from the Uganda NTLP, Ministry of Health.

Consent

Not applicable.

Conflicts of Interest

The authors declare that they have no conflict of interest.

Authors’ Contributions

JN, IN, PL, FO, EK, and JM contributed to conception, design, analysis, methodology, interpretation of data, drafting, and revision. FM contributed to conception, funding acquisition, data acquisition, and writing. RS contributed to the data curation, software acquisition, and revision. AK contributed to conception, funding acquisition, investigation, resources, supervision, validation, drafting, and revision. JBK contributed to conception, funding acquisition, investigation, supervision, validation, drafting, and revision. All authors read and approved the final manuscript.

Acknowledgments

The authors acknowledge the Ministry of Health, Uganda, through the National TB and Leprosy Program for permission to utilise the data from the National TB Survey 2014-2015. The members of the department of clinical epidemiology and biostatistics of Makerere University College of health sciences school of medicine for their assistance in drafting the proposal. The MakCHS–UCBerkeley-Yale Pulmonary Complications of AIDS Research Training (PART) Program, [NIH D43TW009607], from the Fogarty International Center for the PART fellowship awarded to JN under which this work was completed. The funders had no role in study design, data collection and analysis, decision to publish, or preparation of the manuscript.

References

Organization WH, Global tuberculosis report 2020, World Health Organization, Geneva (Switzerland), 2020.

WHO, Systematic screening for active tuberculosis: principles and recommendations, World Health Organization, Geneva (Switzerland), 2013.

WHO, The End TB Strategy: global strategy and targets for tuberculosis prevention, care and control after 2015, WHO, Geneva, Swirzerland, 2015.

WHO, 2018, <WHO_HQ_Reports-G2-PROD-EXT-TBCountryProfile Uganda.pdf>.

M. M. Claassens, C. van Schalkwyk, S. Floyd, H. Ayles, and N. Beyers, “Symptom screening rules to identify active pulmonary tuberculosis: findings from the Zambian South African Tuberculosis and HIV/AIDS Reduction (ZAMSTAR) trial prevalence surveys,” PLoS One, vol. 12, no. 3, article e0172881, 2017.

A. Van’t Hoog, M. Langendam, E. Mitchell et al., “A systematic review of the sensitivity and specificity of symptom-and chest-radiography screening for active pulmonary tuberculosis in HIV-negative persons and persons with unknown HIV status,” REPORT-Version March 2013, World Health Organization, Geneva, Switzerland, 2013.

S. Jaeger, A. Karargyris, S. Candemir et al., “Automatic tuberculosis screening using chest radiographs,” IEEE transactions on medical imaging, vol. 33, no. 2, pp. 233–245, 2014.

S. Den Boon, E. D. Bateman, D. A. Enarson et al., “Development and evaluation of a new chest radiograph reading and recording system for epidemiological surveys of tuberculosis and lung disease,” The International Journal of Tuberculosis and Lung Disease, vol. 9, no. 10, pp. 1088–1096, 2005.

N. S. Shah, M. H. Anh, T. T. Thuy et al., “Population-based chest X-ray screening for pulmonary tuberculosis in people living with HIV/AIDS, An Giang, Vietnam,” The International Journal of Tuberculosis and Lung Disease, vol. 12, no. 4, pp. 404–410, 2008.

J. A. Aluoch, O. B. Swai, E. A. Edwards et al., “Study of case-finding for pulmonary tuberculosis in outpatients complaining of a chronic cough at a district Hospital in Kenya,” American Review of Respiratory Disease, vol. 129, no. 6, pp. 915–920, 1984.

R. K. Gupta, S. D. Lawn, L.-G. Bekker, J. Caldwell, R. Kaplan, and R. Wood, “Impact of human immunodeficiency virus and CD4 count on tuberculosis diagnosis: analysis of city-wide data from Cape Town, South Africa,” The international journal of tuberculosis and lung disease : the official journal of the International Union against Tuberculosis and Lung Disease., vol. 17, no. 8, pp. 1014–1022, 2013.

MoH, Uganda National TB prevalence Survey 2014- 2015 Uganda Ministry of Health Website Ministry of Health 2017, March 2019, http://health.go.ug/content/uganda-national-tuberculosis-prevalence-survey-2014-2015-survey-report.

I. Law, K. Floyd, E. A. B. Abukaraig et al., “National tuberculosis prevalence surveys in Africa, 2008–2016: an overview of results and lessons learned,” Tropical Medicine & International Health, vol. 25, no. 11, pp. 1308–1327, 2020.

J. F. Cohen, D. A. Korevaar, D. G. Altman et al., “STARD 2015 guidelines for reporting diagnostic accuracy studies: explanation and elaboration,” BMJ Open, vol. 6, no. 11, article e012799, 2016.

D. T. M. Nguyen, N. D. Bang, N. Q. Hung, R. P. Beasley, L.-Y. Hwang, and E. A. Graviss, “Yield of chest radiograph in tuberculosis screening for HIV-infected persons at a district-level HIV clinic,” The International Journal of Tuberculosis and Lung Disease, vol. 20, no. 2, pp. 211–217, 2016.

S. Shah, M. Demissie, L. Lambert et al., “Intensified tuberculosis case finding among HIV-infected persons from a voluntary counseling and testing center in Addis Ababa, Ethiopia,” JAIDS Journal of Acquired Immune Deficiency Syndromes, vol. 50, no. 5, pp. 537–545, 2009.

F. A. Khan, S. Verkuijl, A. Parrish et al., “Performance of symptom-based tuberculosis screening among people living with HIV: not as great as hoped,” AIDS, vol. 28, no. 10, pp. 1463–1472, 2014.

A. Story, R. W. Aldridge, I. Abubakar et al., “Active case finding for pulmonary tuberculosis using mobile digital chest radiography: an observational study,” The International Journal of Tuberculosis and Lung Disease, vol. 16, no. 11, pp. 1461–1467, 2012.

Organization WH, “Systematic Screening for Active Tuberculosis,” in Principles and Recommendations, World Health Organization, Geneva (Switzerland), 2013.

M. R. A. van Cleeff, L. E. Kivihya-Ndugga, H. Meme, J. A. Odhiambo, and P. R. Klatser, “The role and performance of chest X-ray for the diagnosis of tuberculosis: a cost-effectiveness analysis in Nairobi, Kenya,” BMC infectious diseases, vol. 5, no. 1, 2005.

R. Ananthakrishnan, R. Thiagesan, S. Auguesteen et al., “The impact of chest radiography and Xpert MTB/RIF testing among household contacts in Chennai, India,” PLoS One, vol. 15, no. 11, article e0241203, 2020.

S. M. Machekera, E. Wilkinson, S. G. Hinderaker et al., “A comparison of the yield and relative cost of active tuberculosis case-finding algorithms in Zimbabwe,” Public health action., vol. 9, no. 2, pp. 63–68, 2019.

C. Miller, K. Lonnroth, G. Sotgiu, and G. B. Migliori, “The long and winding road of chest radiography for tuberculosis detection,” European Respiratory Journal, vol. 49, no. 5, 2017.

J. Cheng, L. Wang, H. Zhang, and Y. Xia, “Diagnostic value of symptom screening for pulmonary tuberculosis in China,” PLoS One, vol. 10, no. 5, article e0127725, 2015.

K. P. Cain, K. D. McCarthy, C. M. Heilig et al., “An algorithm for tuberculosis screening and diagnosis in people with HIV,” New England Journal of Medicine, vol. 362, no. 8, pp. 707–716, 2010.

H.-Y. Kim, V. Zishiri, L. Page-Shipp et al., “Symptom and digital chest X-ray TB screening in South African prisons: yield and cost-effectiveness,” The International Journal of Tuberculosis and Lung Disease, vol. 24, no. 3, pp. 295–302, 2020.