The Scientific World Journal

Volume 2013 (2013), Article ID 385182, 8 pages

http://dx.doi.org/10.1155/2013/385182

Research Article

Detecting and Mitigating Wind Turbine Clutter for Airspace Radar Systems

Wen-Qin Wang

School of Communication & Information Engineering, University of Electronic Science and Technology of China, Chengdu 611731, China

Received 11 October 2013; Accepted 5 November 2013

Academic Editors: M. Balasubramaniam and P.-C. Chen

Copyright © 2013 Wen-Qin Wang. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

It is well recognized that a wind turbine has a large radar cross-section (RCS) and, due to the movement of the blades, the wind turbine will generate a Doppler frequency shift. This scattering behavior may cause severe interferences on existing radar systems including static ground-based radars and spaceborne or airborne radars. To resolve this problem, efficient techniques or algorithms should be developed to mitigate the effects of wind farms on radars. Herein, one transponder-based mitigation technique is presented. The transponder is not a new concept, which has been proposed for calibrating high-resolution imaging radars. It modulates the radar signal in a manner that the retransmitted signals can be separated from the scene echoes. As wind farms often occupy only a small area, mitigation processing in the whole radar operation will be redundant and cost inefficient. Hence, this paper uses a transponder to determine whether the radar is impacted by the wind farms. If so, the effects of wind farms are then mitigated with subsequent Kalman filtering or plot target extraction algorithms. Taking airborne synthetic aperture radar (SAR) and pulse Doppler radar as the examples, this paper provides the corresponding system configuration and processing algorithms. The effectiveness of the mitigation technique is validated by numerical simulation results.

1. Introduction

Due to the threat of climate change, countries around the world are working for the production of renewable energy. One such renewable energy source is the power available from the wind [1–4]. However, erecting a wind farm involves many considerations including consultation with various civil or military aviation interests. They may raise objections to a proposed wind farm for various reasons. One common objection is that wind turbine may be a threat to the safety of low-flying military aircrafts. Another objection is that wind turbine may appear as a strong radar echo [5–8]. This echo may distract the radar from the target echoes which are its main interest and can reduce the effectiveness of the radar by masking genuine target echoes [9–11]. Hence, wind farm may be a threat to existing radar systems [12–18]. Consequently, there is a conflict of interest between the desire to encourage wind farm development as a renewable energy source and the desire to maintain the performance of existing radar systems.

As the velocity of the blade tips can reach up to 75 m/s, the rotating wind turbine blade will impart a Doppler frequency shift to any radar signal reflecting off the blade. In this case, the radar’s moving target indication (MTI) depending on the designed thresholds in the processor may detect it as a nonstatic target. In wind farms, variation in the wind direction at the turbine, the precise position of the blade in its rotation as the radar beam illuminates it, the pitch of the blade, and other factors may cause the amplitude and size of the radar echoes to fluctuate from one antenna rotation to another. At sites with a single turbine, any radar echo from the rotating turbine blades may stay in the same location on the radar screen. However, at sites with more than one turbine, the radar may illuminate two and more turbines during one antenna sweeping time. This will result in the images on the radar screen moving about within the area of the wind farm over time. The extent to which this will happen depends on, amongst other factors, the minimum distance between objects that the radar can detect. Moreover, wind farms will have a much more severe effect on the radar systems when the wind farms are located within uncontrolled airspace than when they are situated within controlled airspace. In uncontrolled airspace, aircrafts may fly without contacting any air traffic control agency. In this case, aircrafts can only use a radar to provide the navigation information.

Additionally, wind farms can cause degradation to other existing electronic systems besides radar systems, especially for television terrestrial broadcasting services [19]. Some studies have investigated this degradation in several countries, mainly in USA, United Kingdom, Denmark, Spain, and The Netherlands. The main effect of the interference from wind turbines on television services is a static ghost in the picture or a cyclic variation of the brightness in the picture [20, 21]. This is unsatisfactory to wind energy industry because it is hard for the aviation safety authorities to give a clear and well-founded decision on whether a particular proposed wind farm presents a safety issue or not; hence, it restricts the areas available for wind farm development.

Although specified wind farm configurations can be employed for the wind energy systems [22], it is necessary to mitigate the effects of wind farms on radar systems to maintain and improve the radar surveillance [13]. Several groups have suggested some mitigation measures [23–27]. A typical proposal is to modify the inside of the blades with layers of circuits and reflectors that can reduce the strength of the radar return from the blades. However, this technique is a highly frequency-specific method. It is necessary to distinguish and mitigate the impacts of wind farms on radar systems that were not anticipated in the original design specifications for either radar or wind farm engineers.

To mitigate the effects of wind farms on radar systems, this paper presents a transponder-based technique. The novel transponder was proposed by Weiß [28] for calibrating high-resolution imaging radars. This transponder using a wideband voltage-controlled attenuator (VCA) modulates the radar signal in a manner that the retransmitted signals can be separated from the scene echoes. This information can then be used to determine whether the radar is impacted by the wind farms. Thereafter, the effects of wind farms can be mitigated by subsequent signal processing algorithms.

The remaining sections are organized as follows. In Section 2, related work on the mitigation techniques of wind farms is introduced and motivation of this paper is outlined. In Section 3, the transponder-based wind turbine clutter detection is described. Next, the mitigation processing algorithms are presented in Section 4. Finally, Section 5 concludes the whole paper.

2. Background and Motivation

When a radar is operating, all the illuminated objects reflect some of the energy back to the radar receiver. The reflected signals are modified in various ways depending on the reflection process. Radar just exploits these modifications to differentiate between certain types of objects. By designing specific processing algorithms, the radar can differentiate between stationary targets and moving targets. This enhances the detection of desired targets and suppresses the detection of the terrain surface, buildings, and so forth. If the motions of the illuminated turbine blades lie in similar velocity bands to the desired moving targets, they cannot be distinguished from the moving targets. In this case, Doppler filtering is not an effective method. It should be accepted that these signals will pass into the radar receiver and other methods should be applied in subsequent signal processing steps.

Although the effects caused by the wind turbines are difficult to quantify, it is well recognised that wind farms can degrade the performance of radar systems significantly. In summary, there are two significant features. The first is the relative strong turbine echoes and the second is the Doppler frequency shifts caused by the movement of the wind turbine. Consequently, several potential effects are [29–33] as follows: (1) suppression of the radar sensitivity: high signal levels may bury some small signals reflected by the desired targets; (2) reduction in the ability to track target close to the wind farms: large signal levels reduce the capability of the radar to resolve closely spaced objects, and the desired targets may be “lost” in the vicinity of the wind farm; (3) increased false detection: if the radar cross-section (RCS) of a wind turbine is large [34], “ghost” may be generated in the subsequent radar signal processing [35]. Certainly, the effects of wind farms on radars depend on the internal radar design and the particular wind turbine characteristics, but they are often not anticipated in the original design specifications. Therefore, efficient mitigation methods are required.

Most published mitigation techniques are usually based on improving the radar’s ability to discriminate between wanted and unwanted targets [36, 37]. Several typical examples are as follow. (1) Amplitude thresholds: if the unwanted targets are expected to have a lower RCS than the wanted targets, the amplitude of the unwanted returns can be expected to be lower than that of the genuine targets. In this case, an amplitude threshold can be set in the radar causing the echoes below a given amplitude to be ignored. However, wind turbines usually have a RCS larger than some wanted targets, so this method has a very limited utility. (2) Doppler discrimination: it is used to discriminate between wanted moving targets and unwanted static or slow-moving targets that do not exceed a given radial velocity. However, wind turbines are problematic since the blade tip may have a high speed, similar to the speed of a light aircraft or helicopter. (3) Constant false alarm rate (CFAR) [38]: CFAR is designed to maintain radar performance in areas where there are clutter. However, if a desired target within the area has a weaker return than the clutter, or if it stays within the area for several antenna sweeps, the clutter threshold will eliminate the genuine target as well as the clutter. Thus, this technique is not suitable for mitigating the effects of wind farms on radar systems.

Although it may be possible to modify wind farm to reduce their radar signature, it would be much easier to do so if efficient mitigation algorithms can be applied. However, literature search reveals that little work has been published. Even less work effort has been placed on the mitigation techniques without modifications of the wind farm and radar hardware. As such, we present a transponder-based mitigation technique. Note that transponders are widely used for calibrating high-resolution imaging radars. Weiß [39] proposed a novel transponder, which yields a retransmission signal with two additional Doppler frequency shifts. The retransmitted signal can decouple the transponder from the background scatterers, so that it can be used to calibrate synthetic aperture radar (SAR) images at a low cost. In fact, this transponder has extensive applications [40] not just for radiometric calibration. This paper extends it to mitigate the effects of wind farms on radar systems.

3. Detecting Wind Turbine Clutter

Figure 1 shows the transponder-based mitigation scheme. The signals received by the transponder are modulated before being retransmitted. As shown in Figure 2, the transponder consists of a low-noise amplifier followed by a controller. The VCA is used to modulate the radar signal in a manner that the retransmitted signal shows two artificial Doppler frequency shifts, one positive shifted and one negative shifted, and the original radar signal. Thereafter, the signal will be amplified to an appropriate level and retransmitted towards the radar receiver. Additionally, to minimise cross-coupling interferences, two omnidirectional antennas are used, one for receive and one for transmit. In this way, if the artificial Doppler frequency shifts are chosen to be larger than the desired Doppler bandwidth of the radar raw data, the transponder signal can be separated during subsequent radar signal processing, allowing for detecting or locating the wind turbines and mitigating its effects on the radar. Note that the transponder is inactive except that it receives some signals being stronger than a given threshold, so that there is no interference to other radar and communication systems.

Figure 1: Transponder-based wind turbine clutter mitigation scheme.

Figure 2: Block diagram of the transponder, DSP: digital signal processor, DDS: direct digital synthesizer.

As the transponder can be seen as an amplitude modulator, the retransmitted radar signal modulated by the transponder can be represented by [39]

where and are the attenuation tuning parameters, is the modulation frequency, and and denote the starting phase and the transmitted radar signal, respectively. The signal can be thought as the echo of the transponder without the amplitude modulation. Applying Fourier transform to (1), we have

Taking a linear frequency modulated (LFM) signal which is widely used in various radar systems as an example, Figure 3 shows the corresponding retransmission signal in frequency domain. We can see that the retransmitted radar signal shows the original radar signal and two additional frequency shifted signals, one positive and one negative.

Figure 3: Spectrum retransmitted radar signal modulated by the transponder.

The signals coming to the radar receiver can be represented by

where denotes the normal radar echoes unmodulated by the transponder. Applying Fourier transform to (3), we have

After range compression with the reference function

where is the conjugate operator, we can get the results like Figure 4.

Figure 4: The received transponder signal after range compression.

The upper and lower side bands of this signal can then be acquired using the appropriate filters [39]:

where denotes a gate function and is the filter bandwidth which has to be chosen according to the signal bandwidth of the and the modulation frequency . Then, the upper and lower side bands are represented, respectively, by

The starting phase can then be calculated from

modulo . Using this starting phase, we can get [39]

Additionally, the unmodulated signal can then be obtained by

Thereafter, and can be obtained by inverse Fourier transforms. Note that the signals reflected from the wind turbines are also included in the . Evaluating and leads to an effective solution to mitigate the effects of the wind farms on radar systems.

4. Mitigation Processing Algorithm

As wind farms often occupy only a small area, the radar may be impacted only by the wind farms in a very short time; hence, mitigation processing in the whole radar operation will be redundant and cost inefficient (but most current mitigation techniques just do so). Thus, it is desirable for the mitigation processor to operate only when the radar enters into the wind farms. To reach this aim, we deal with two typical radars in separate ways.

4.1. SAR Imaging

The first typical example is SAR system, which has been playing a more and more important role in microwave remote sensing. Figure 5 shows the proposed mitigation processing structure. The received radar signals are range compressed first. We then detect both and (see Figure 4). If both and are not detected, the subsequent processing steps are the same as the normal SAR azimuth processing steps, without any modification. Otherwise, the mitigation processing method is applied. Firstly, and are extracted using (9) and (10) separately. Next, the imaging results can be obtained by processing with the normal azimuth processor. Finally, the “ghost” generated by the wind turbines can be identified and classified by using the transponder as a target of reference.

Figure 5: Structure of the mitigation processing for SAR systems.

As experimental data is unavailable for us, airborne stripmap SAR data is simulated using the parameters listed in Table 1. Figure 6 shows the processed results with the range-Doppler (RD) imaging algorithm [41]. The transponder can be easily identified because it has high signal-to-noise (SNR) due to the amplitude modulation. As the transponder is placed on the top of the wind mast alike Figure 1, the “ghost” generated by the wind turbines should be symmetrically distributed around the transponder image. Thus, the “ghost” can be identified. Also, in this way, the “true” targets can be identified easily, because the “ghost” should be symmetrically distributed around the transponder image. If the features of the target can be used, the identification and classification performance can be further improved [42]. Once an object has been characterized in this way, this information can be used to select which detections are to be passed to the displayer. The mitigation processor operates only when both and have been detected; hence, this mitigation technique is cost efficient, without significantly increasing the burden of the radar processor.

Table 1: Simulation parameters.

Parameters
Values
Units

Carrier frequency
1.25
GHz

Pulse repetition frequency
1000
Hz

SAR flying velocity
180
m/s

SAR flying altitude
6000
m

Chirp period

s

Azimuth resolution
1
m

Range resolution
1
m

Figure 6: Simulation results for high-resolution SAR system.

4.2. Civil Radar Target Detection

Another typical example is civil radar. Most civil radars will detect any targets which meet the threshold or criteria set in the radar’s processor. Its performance is determined by the balance between the probability of detecting wanted targets and the probability of detecting unwanted or false targets. Measures to increase the probability of detecting wanted targets may also increase the probability of detecting false or unwanted targets. Most published work just aims to improve radar’s ability to discriminate between wanted and unwanted targets. But, they are not efficient because the mitigation processing is usually applied in the whole radar operation.

Similarly, only when both and have been detected, the mitigation processing is necessary. The moving wind turbines, although exhibiting similar characteristics to aircraft, do not of course move their location. Hence, plot filtering (also called plot target extraction) can be used to identify the targets. This is based on analysis of successive returns from a target to determine the direction and speed of its movement. The echoes that do not match the speed characteristics of an aircraft will not be passed to the displayer. The screen displayer has no “raw” radar returns but shows confirmed tracks as a line indicating the direction of the movement and the length of the line indicating the speed of the aircraft.

To further extend plot target extraction so that the track of an aircraft can be projected through a wind farm, here a Kalman filter is applied to obtain an optimal track estimate. A set of parameters describes the target state while the radar passes the wind farm, which can be represented by

where the state vector contains the actual target position, velocity, and acceleration at time instance . is the observation vector at time instance . and are the process noise at time instance . and are the system matrixes which describe the deterministic state processes. We assume that both and are Gaussian distributed noises with expectation and covariance matrix and , respectively. The subsequent -step smoothing result is

with

where and are the Kalman smoothing gain and new information, respectively.

We consider an example ground-based pulse Doppler radar system. The simulation parameters are listed in Table 2. Taking velocity estimation as an example, Figure 7 shows the comparative performances between different steps. As the transponder does not move from its location, once the transponder is identified, we can obtain successful plot filtering results, as shown in Figure 8. In this way, the effects of wind farms on civil radars can be mitigated successfully. This method is particularly effective at differentiating wind turbines from aircraft. In this way, intermittent detection, if associated with stationary objects, can be removed from the information passed to the displayer.

Table 2: Simulation parameters.

Parameters
Values
Units

Carrier frequency
10
GHz

Pulse repetition frequency
12000
Hz

Pulse duration

s

Pulse width
50
MHz

Antenna beam width
3°
s

Doppler processor
Fast Fourier transform (FFT)
m

(a) and

(b) and

Figure 7: Velocity estimate using Kalman smoothing filter.

Figure 8: Plot filtering method tracking an aircraft close to a wind farm.

5. Conclusion

It is well recognized that wind farms may cause degradation to many radar applications. Mitigation processing is thus necessary, but little work has been published. As such, this paper proposes a transponder-based mitigation technique. Note that the transponder is not a new concept, which has been proposed for calibrating high-resolution imaging radars. This paper uses the transponder to determine whether the radar is impacted by the wind farms. If so, the effects of wind farms on radar systems can then be mitigated by the presented processing algorithms. Note that Kalman smoothing filtering and plot target extraction are used in this paper; practically, other advanced filtering techniques or target detection algorithms may be also feasible. Because experimental data is not available for us, simulation data is used to validate this transponder and signal processing algorithm combined mitigation technique. An advantage is that, as the mitigation processor can operate only when the radar enters into the wind farms, this technique can be implemented at a low cost, without significantly increasing the burden of the radar processor. The originality of this paper lies in the transponder and mitigation algorithm combined wind farm mitigation technique. Future wind farms may be constructed with new materials that are less reflective in radar frequency bands. But this trend will not change the nature of the problems that turbines potentially cause to radars. In a world where renewable energy sources will become increasingly necessary, the transponder-based mitigation technique can provide a potential solution.

Acknowledgment

This work was supported in part by the Program for New Century Excellent Talents in University under Grant no. NCET-12-0095.

References

S. Brusch, S. Lehner, and J. Schulz-Stellenfleth, “Synergetic use of radar and optical satellite images to support severe storm prediction for offshore wind farming,” IEEE Journal of Selected Topics in Applied Earth Observations Remote Sensing, vol. 1, no. 1, pp. 1–10, 2008.

X. Y. Wang, D. M. Vilathgamuwa, and S. S. Choi, “Determination of battery storage capacity in energy buffer for wind farm,” IEEE Transactions on Energy Conversion, vol. 23, no. 3, pp. 868–878, 2008.

A. Garcés and M. Molinas, “A study of efficiency in a reduced matrix converter for offshore wind farms,” IEEE Transactions on Industrial Electronics, vol. 59, no. 1, pp. 184–193, 2012.

R. Cardenas, M. Molinas, and J. T. Bialasiewicz, “Introduction to the special section on control and grid integration of wind energy systems,” IEEE Transactions on Insdustrial Electronics, vol. 60, no. 7, pp. 2774–2775, 2013.

Y. F. Lok, A. Palevsky, and J. Wang, “Simulation of radar signal on wind turbine,” IEEE Aerospace and Electronic Systems Magazine, vol. 26, no. 8, pp. 39–42, 2011.

G. Greving, W.-D. Biermann, and R. Mundt, “Radar and wind turbines—RCS theory and results for objects on the ground and in finite distances,” in Proceedings of the 3rd Microwaves, Radar and Remote Sensing Symposium (MRRS '11), pp. 321–326, August 2011.

H. Griffiths, Y. Ohya, A. Balleri et al., “Measurement and analysis of the radar signature of a new type of wind turbine,” in Proceedings of the 6th International Conference on Radar (RADAR '11), pp. 837–840, October 2011.

S. Zhang, K.-J. Tseng, D. M. Vilathgamuwa, T. D. Nguyen, and X.-Y. Wang, “Design of a robust grid interface system for pmsg-based wind turbine generators,” IEEE Transactions on Industrial Electronics, vol. 58, no. 1, pp. 316–328, 2011.

C. Lute and W. Wieserman, “ASR-11 radar performance assessment over a wind turbine farm,” in Proceedings of the IEEE Radar Conference: In the Eye of the Storm (RadarCon '11), pp. 226–230, May 2011.

A. Theil, M. W. Schouten, and A. de Jong, “Radar and wind turbines: a guide to acceptance criteria,” in Proceedings of the IEEE International Radar Conference (RADAR '10), pp. 1355–1361, May 2010.

R. R. Ohs, G. J. Skidmore, and G. Bedrosian, “Modeling the effects of wind turbines on radar returns,” in Proceedings of the IEEE Military Communications Conference (MILCOM '10), pp. 272–276, November 2010.

H. K. Karegar and A. Shataee, “Islanding detection of wind farms by THD,” in Proceedings of the 3rd International Conference on Deregulation and Restructuring and Power Technologies (DRPT '08), pp. 2793–2797, April 2008.

J. Perry and A. Biss, “Wind farm clutter mitigation in air surveillance radar,” IEEE Aerospace and Electronic Systems Magazine, vol. 22, no. 7, pp. 35–40, 2007.

B. G. Hernando, F. P. Martinez, and F. A. Encabo, “Characterization approach of wind turbine clutter in the Spanish weather radar network,” in Proceedings of the 5th European Confence on Radar in Meteorology and Hydrology, pp. 1–5, 2008.

B. Gallardo-Hernando, F. Pérez-Martínez, and F. Aguado-Encabo, “Statistical characterization of wind turbine clutter in C-band radars,” in Proceedings of the International Conference on Radar (Radar '08), pp. 360–364, September 2008.

G. Greving, W.-D. Biermann, and R. Mundt, “Wind turbines as distorting scattering objects for radar—visibility, desensitization and shadowing,” in Proceedings of the 13th International Radar Symposium, pp. 275–277, June 2012.

D. Sozen and M. Kartal, “Scatter and Doppler effect of wind power plants to land radars,” in Proceedings of the 14th International Conference on Computer Modelling and Simulation, pp. 453–458, 2012.

K. V. Mishra and V. Chandrasekar, “Signal analysis and modeling of wind turbine clutter in weather radars,” in Proceedings of the 30th IEEE International Geoscience and Remote Sensing Symposium (IGARSS '10), pp. 3561–3564, July 2010.

M. Levert and I. Munro, “Effects of windmills on television reception,” CBC Technology Review, vol. 1, pp. 1–8, 2006.

D. de la Vega, I. Orcajo, I. Armentia et al., “Use of the channel impulse response of the DVB-T service for the evaluation of the reflected signals of wind farms,” in Proceedings of the IEEE International Instrumentation and Measurement Technology Conference, pp. 1992–1996, May 2008.

G. Greving and M. Malkomes, “Weather radar and wind turbines—theoretical and mumerical analysis of the shadowing effects and mitigation concepts,” Proceedings of the 5th Europen Radar in Meteorology and Hydrology Conference, pp. 1–5, 2008.

T. Kawaguchi, T. Sakazaki, T. Isobe, and R. Shimada, “Offshore-wind-farm configuration using diode rectifier with MERS in current link topology,” IEEE Transactions on Industrial Electronics, vol. 60, no. 7, pp. 2930–2937, 2013.

F. X. Kong, Y. Zhang, and R. Palmer, “Wind turbine clutter mitigation for weather radar by adaptive spectrum processing,” in Proceedings of the IEEE Radar Conference, pp. 471–474, 2012.

L. S. Rashid and A. K. Brown, “Radar cross-section analysis of wind turbine blades with radar absorbing materials,” in Proceedings of the 8th European Radar Conference, pp. 97–100, October 2011.

B. Gallardo-Hernando, J. M. Munoz-Ferreras, and F. Perez-Martnez, “Superresolution techniques for wind turbine clutter spectrum enhancement in meterorological radars,” IET Radar, Sonar and Navigation, vol. 5, no. 9, pp. 924–933, 2011.

M. A. Alves, L. C. Folgueras, and M. C. Rezende, “Reduction of the radar cross section of a wind turbine using a microwave absorbing material,” in Proceedings of the SBMO/IEEE MTT-S International Microwave and Optoelectronics Conference, pp. 551–555, November 2011.

B. Gallardo-Hernando, F. Pérez-Martínez, and F. Aguado-Encabo, “Detection and mitigation of wind turbine clutter in C-band meteorological radar,” IET Radar, Sonar and Navigation, vol. 4, no. 4, pp. 520–527, 2010.

M. Weiß, “Transponder for calibrating bistatic SAR systems,” in Proceedings of the European Conference on Synthetic Aperture Radar, pp. 925–928, 2004.

B. D. Rigling, “Urban RF multipath mitigation,” IET Radar, Sonar and Navigation, vol. 2, no. 6, pp. 419–425, 2008.

C. A. Jackson, “Windfarm characteristics and their effect on radar systems,” in Proceedings of the Institution of Engineering and Technology International Conference on Radar Systems, pp. 1–6, October 2007.

T. Thayaparan, S. Abrol, E. Riseborough, L. Stankovic, D. Lamothe, and G. Duff, “Analysis of radar micro-Doppler signatures from experimental helicopter and human data,” IET Radar, Sonar and Navigation, vol. 1, no. 4, pp. 289–299, 2007.

B. Gallardo-Hernando, J. M. Muñoz-Ferreras, F. Pérez-Martínez, and F. Aguado-Encabo, “Wind turbine clutter observations and theoretical validation for meteorological radar applications,” IET Radar, Sonar and Navigation, vol. 5, no. 2, pp. 111–117, 2011.

G. Greving, W.-D. Biermann, and R. Mundt, “The Radar Cross Section and wind turbines—definition and effects of the ground and finite distances,” in Proceedings of the International Radar Symposium (IRS '11), pp. 803–808, September 2011.

G. Greving and W. Biermann, “Application of the radar cross section RCS for objects on the ground—example of wind turbines,” in Proceedings of the International Radar Symposium, pp. 1–4, May 2008.

F. Kong, Y. Zhang, R. Palmer, and Y. Bai, “Wind turbine radar signature characterization by laboratory measurements,” in Proceedings of the IEEE Radar Conference: In the Eye of the Storm (RadarCon '11), pp. 162–166, May 2011.

B. M. Isom, R. D. Palmer, G. S. Secrest et al., “Characterization and mitigation of wind turbine clutter on the WSR-88D network,” in Proceedings of the 33rd Conference on Radar Meteorology, 2007.

J. C. G. Matthews, J. Pinto, and C. Sarno, “Stealth solutions to solve the radar-wind farm interaction problem,” in Proceedings of the 3rd Loughborough Antennas and Propagation Conference, pp. 101–104, April 2007.

T.-T. V. Cao, “Constant false-alarm rate algorithm based on test cell information,” IET Radar, Sonar and Navigation, vol. 2, no. 3, pp. 200–213, 2008.

M. Weiß, “A new transponder technique for calibrating wideband imaging radars,” in Proceedings of the European Conference on Synthetic Aperture Radar, pp. 493–495, 2002.

W. Q. Wang and J. Y. Cai, “A technique for jamming Bi- and multistatic SAR systems,” IEEE Geoscience and Remote Sensing Letters, vol. 4, no. 1, pp. 80–82, 2007.

R. Bamler, “A comparison of range-Doppler and wavenumber domain SAR focusing algorithms,” IEEE Transactions on Geoscience and Remote Sensing, vol. 30, no. 4, pp. 706–713, 1992.

Y. Ruan, L. Hong, and D. Wicker, “Analytic performance prediction of feature-aided global nearest neighbour algorithm in dense target scenarios,” IET Radar, Sonar and Navigation, vol. 1, no. 5, pp. 369–376, 2007.