The Scientific World Journal

Volume 2013 (2013), Article ID 834825, 7 pages

http://dx.doi.org/10.1155/2013/834825

Clinical Study

Internal Fixation of Intertrochanteric Hip Fractures: A Clinical Comparison of Two Implant Designs

Ran Tao, Yue Lu, Hua Xu, Zhen-Yu Zhou, You-Hua Wang, and Fan Liu

Department of Orthopaedics, Affiliated Hospital of Nantong University, 20 Xisi Road, Nantong, Jiangsu Province 226001, China

Received 25 December 2012; Accepted 14 January 2013

Academic Editors: M. Hedström and C. W. Oh

Copyright © 2013 Ran Tao et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objective. To compare two internal fixation devices clinically in stabilisation of intertrochanteric femur fractures. Methods. Eighty-seven patients were randomised upon their admission to the hospital using a sealed envelope method. Forty-five were treated with proximal femur nail antirotation (PFNA) and 42 with reverse less invasive stabilisation system (LISS). The perioperative data were recorded and compared in relation to fracture type. Results. In each type of fractures, no significant differences were found with respect to the blood loss, the quality of reduction, the time to bony healing, and the Harris hip score between the 2 groups. The mean duration of surgery was significantly longer in reverse LISS group than in PFNA group. Conclusion. Both the PFNA and the reversed LISS are effective in the treatment of different types of intertrochanteric femur fractures. PFNA is superior to reverse LISS in terms of surgical time, weight-bearing, and perhaps fluoroscopy time.

1. Introduction

Numerous internal fixation devices have been used to stabilise intertrochanteric femur fractures, and they can be divided into 2 categories: extramedullary fixation devices and intramedullary fixation devices. It is generally accepted that dynamic hip screw (DHS) is the implant of choice in the treatment of stable intertrochanteric femur fractures (AO/OTA 31-A1) [1]. For unstable intertrochanteric femur fractures (AO/OTA 31-A2 and 31-A3), the commonly used extramedullary fixation devices, such as DHS, dynamic condylar screw (DCS), and angular blade plates are sometimes problematic [1–3]. The less invasive stabilisation system-distal femur (LISS-DF) was designed for stabilisation of distal femur fracture. Recently, quite a few reports have addressed its use in the treatment of proximal femur fracture, [2, 4, 5] and the clinical results are encouraging. As to intramedullary fixation devices, so far, proximal femur nail antirotation (PFNA) is one of the most effective methods in the treatment of intertrochanteric femur fractures [6–10]. The purpose of the present study was to compare reverse LISS with PFNA clinically and to determine the preferred method in stabilisation of intertrochanteric femur fractures.

2. Patients and Methods

Between September 2010 and August 2011, 100 patients with 100 intertrochanteric femoral fractures were randomised upon their admission to the hospital using a sealed envelope method. The inclusion criteria were ages above 65. Those with pathological fractures, osteoarthritis of the hips, and ASA [11] (American Society of Anesthesiologists scale) 4 or 5 were excluded from the study. Of the 100 patients, 7 died of different causes unrelated to implants within 1 year and six was lost to followup. The remaining 87 patients were available for analysis. There were 33 men and 54 women. Forty-five of them were treated with PFNA (group I) and 42 with reverse LISS (group II). The fractures were classified according to AO/OTA classification. GroupI consisted of 10 cases of type 31A1, 21 cases of 31A2 and 14 cases of 31A3 fractures and group II, 9 cases of type 31A1, 21 cases of 31A2, and 12 cases of 31A3 fractures. The perioperative data, such as operative time, the overall fluoroscopy time, and the blood loss were noted and compared among the groups (Table 1). Ethical approval was obtained from the hospital.

Table 1: Main demographic and clinical data of the fractures by treatment group.

PFNA
Reverse LISS
value

()
()

Type 31-A1 fractures ()

Mean age (yr.)

0.945

Sex

    Male
6
2
0.096

    Female
4
7

Preoperative walking ability

    Independent walking
10
9

    Assisted walking
0
0

    Bedridden
0
0

Mean duration from injury to surgery (day)

0.666

Mean duration of surgery (min.)

0.000

Mean fluoroscopy time (sec.)

0.024

Mean blood loss (mL)

0.560

Open reduction cases
0
0

Quality of reduction

    Good
10
8
0.279

    Acceptable
0
1

    Poor
0
0

Mean time of hospital stay (day)

0.438

Mean time to bone healing (wk.)

0.054

Postoperative walking ability

    Independent walking
8
8

    Assisted walking
2
1

    Bedridden
0
0

Harris hip score (pt.)

0.568

PFNA
Reverse LISS
value

()
()

Type 31-A2 fractures ()

Mean age (yr.)

0.469

Sex

    Male
5
11
0.057

    Female
16
10

Preoperative walking ability

    Independent walking
17
19

    Assisted walking
3
2

    Bedridden
1
0

Mean duration from injury to surgery (day)

0.912

Mean duration of surgery (min.)

0.000

Mean fluoroscopy time (sec.)

0.050

Mean blood loss (mL)

0.679

Open reduction cases
2
3

Quality of reduction

    Good
19
20
0.549

    Acceptable
2
1

    Poor
0
0

Mean time of hospital stay (day)

0.847

Mean time to bone healing (wk.)

0.440

Postoperative walking ability

    Independent walking
17
14

    Assisted walking
3
6

    Bedridden
1
1

Harris hip score (pt.)

0.353

PFNA
Reverse LISS
value

()
()

Type 31-A3 fractures ()

Mean age (yr.)

0.917

Sex

    Male
5
4
0.899

    Female
9
8

Preoperative walking ability

    Independent walking
14
12

    Assisted walking
0
0

    Bedridden
0
0

Mean duration from injury to surgery (day)

0.430

Mean duration of surgery (min.)

0.001

Mean fluoroscopy time (sec.)

0.084

Mean blood loss (mL)

0.966

Open reduction cases
1
1

Quality of reduction

    Good
12
11
0.636

    Acceptable
2
1

    Poor
0
0

Mean time of hospital stay (day)

0.005

Mean time to bone healing (wk.)

0.070

Postoperative walking ability

    Independent walking
12
12

    Assisted walking
1
0

    Bedridden
1
0

Harris hip score (pt.)

0.563

PFNA
Reverse LISS
value

()
()

All the fractures ()

Mean age (yr.)

0.627

Sex

    Male
16
17
0.636

    Female
29
25

Preoperative walking ability

    Independent walking
41
40

    Assisted walking
3
2

    Bedridden
1
0

Mean duration from injury to surgery (day)

0.828

Mean duration of surgery (min.)

0.000

Mean fluoroscopy time (sec.)

0.001

Mean blood loss (mL)

0.565

Open reduction cases
3
4

Quality of reduction

    Good
41
40
0.765

    Acceptable
4
2

    Poor
0
0

Mean time of hospital stay (day)

0.101

Mean time to bone healing (wk.)

0.025

Postoperative walking ability

    Independent walking
37
34

    Assisted walking
6
7

    Bedridden
2
1

Harris hip score (pt.)

0.717

Postoperative complications (cases)
4 (9%)
5 (12%)

    Pressure sore
1
2

    Urinary infection
1
2

    Pulmonary infection
1
1

    Deep venous thrombosis
1
0

Death (cases)
4 (9%)
3 (7%)

All patients were evaluated preoperatively with use of two standard plain radiographs, an anterior-posterior radiograph, and a medial-lateral radiograph. Surgical treatment was performed as soon as the patient’s general medical condition allowed. Prophylactic intravenous first generation cephalosporin was administered half an hour before operation and discontinued 48–72 hours postoperatively. Internal fixation was performed by 3 orthopaedic consultants (Figures 1, 2, and 3). Close reduction was carried out first in all the cases with patient supine on a traction table. If failed, then semiopen or open reduction was performed. Reverse LISS was used in a similar way described by Ma H et al. [2]. The quality of reduction was graded as good, acceptable (5–10° varus/valgus and/or anteversion/retroversion), or poor (>10° varus/valgus and/or anteversion/retroversion) [12]. Fractures were judged to be healed radiographically if bridging callus was evident on three of four cortices as seen on two views [13]. Intraoperative time was recorded from the time that the close reduction was started to the time that the wound was sutured closed.

(a)

(b)

Figure 1: Patients with 31 A1 fractures. (a) PFNA: preoperative AP view and immediate postoperative AP view. (b) Reverse LISS: preoperative AP view and immediate postoperative AP view.

Figure 2: Patients with 31 A2 fractures. (A) PFNA (A(a)) Preoperative AP view and lateral view. (A(b)) Immediate postoperative AP view and oblique view. (A(c)) Three months postoperatively. Callus formation can be seen in both AP view and oblique view. (B) Reverse LISS (B(a)) Preoperative AP view. (B(b)) Immediate postoperative AP view and lateral view.

Figure 3: Patients with 31 A3 fractures. (A) PFNA (A(a)) Preoperative AP view and lateral view. (A(b)) Immediate postoperative AP view and lateral view. (A(c)) Six weeks postoperatively. Callus formation can be seen in both AP view and oblique view. (B) Reverse LISS (B(a)) Preoperative AP view and lateral view. (B(b)) Immediate postoperative AP view and lateral view. (B(c)) Six months postoperatively. Reverse LISS successfully maintained the reduction till bony healing.

In group I, partial and full weight-bearing were allowed on third and sixth postoperative week, respectively. In group II, these were postponed to 6th and 12th postoperative week, respectively. A follow-up evaluation, which included a clinical and radiographic assessment, was performed at 6, 13, 26, and 52 weeks. Functional outcomes were assessed according to the Harris hip scoring system [14].

Statistical analysis was performed with SPSS Statistics 11.5, with use of the Student’s t-test, the chi square test. Statististical significance was defined as .

3. Results

The results in relation to treatment group are shown in Table 1.

In each type of fractures, no significant differences were found with respect to the age, the sex, the time from injury to surgery, the quality of reduction, the blood loss, the time to bony healing, and the Harris hip score between the 2 groups. The mean duration of surgery was significantly longer in group II than in groupI.

In type 31 A1 fractures, both the time to begin with partial weight-bearing () and full weight-bearing () were significant earlier in group I than in group II. The fluoroscopy time was significantly longer in group II than in group I. No significant difference was found with respect to the time of hospital stay.

In type 31 A2 fractures, no significant differences were found with respect to the fluoroscopy time and the time of hospital stay.

In type 31 A3 fractures, the patients in group I had significantly shorter time of hospital stay than in group II. No significant differences were found with respect to the fluoroscopy time.

In both 31 A2 and 31 A3 fractures, no significant differences were found regarding to the time to bony healing between the 2 groups. For most cases in group I, partial weight-bearing and full weight-bearing were began at 3 weeks and 6 weeks postoperatively, while in group II, most patients were allowed to start partial and full weight-bearing on 6th and 12th postoperative week, respectively.

Regardless of fracture types, no significant differences were found with respect to the age, the sex, the time from injury to surgery, the quality of reduction, the blood loss, the time of hospital stay, and the Harris hip score between the 2 groups. The patients in group I had significantly shorter duration of surgery, less fluoroscopy time as well as less time to obtain bone healing compared with that of in group II.

There were altogether 9 postoperative complications, including 3 cases of pressure sore, 3 cases of urinary infection, 2 cases of pulmonary infection, and 1 case of deep venous thrombosis. Loss of reduction, implant failure, and nonunion were not found in any case.

4. Discussion

Controversy persists concerning the optimal internal fixation devices for stabilisation of intertrochanteric femur fractures. Recently, there is a tendency of increased use of intramedullary nails [15, 16]. Theoretically, intramedullary fixation offers advantages over plates, especially in its ability to ensure stability even in unstable fractures. This was confirmed by the meta-analysis by Zeng et al. [17], who compared PFNA with DHS. However, the meta-analysis by Parker and Handoll of all prospective randomised trials comparing intramedullary to extramedullary devices does not support the perceived superiority of nails [1]. The purpose of the present study was to compare reverse LISS with PFNA in stabilisation of intertrochanteric femur fractures. To our knowledge, few authors [18, 19] compared these 2 devices clinically, and no published literatures made the comparison in relation to the fracture type.

The study population and the baseline data (age, sex, preoperative walking ability, and the duration from injury to surgery) were similar in each fracture type between the 2 groups. The most important finding of this study was that PFNA could significantly shorten surgical time compared with reverse LISS (31A1, ; 31A2, ; 31A3, ; overall, ). PFNA also shortened fluoroscopy time, but not statistically significant in unstable fractures (31A2 and 31A3). This can be explained that we are very familiar with PFNA [10] and lack of experience in reverse LISS. Before this study, only 4 intertrochanteric femur fractures (1 adolescent fracture, 3 pathological fractures) were treated by the contralateral reverse LISS-DF in our department. We found the correct positioning of reverse LISS to proximal femur was sometimes time consuming. There is no a so-called standard position concerning how proximal of the proximal end of LISS should be placed; however, two issues should be guaranteed. Firstly, at least 4 locking screws should be inserted in the proximal end of the LISS to effectively stabilise proximal fragment. Secondly, the LISS should be placed on the exact lateral aspect of the femur. PFNA shortened surgical time but did not reduce blood loss.

Good results were achieved with both the reverse LISS and PFNA in each fracture type, which was in accordance with the findings by Zhou et al. [19] and Han et al. [18]. Harris hip scores were comparable in both groups in relation to each fracture type. Another important finding of this study was that not a single mechanical failure was found in all the 87 fractures. This probably contributed to good quality of reduction, properly positioning of the internal fixation devices, as well as more conservative rehabilitation program. Every effort was made to obtain best reduction and ideal implants positioning. On rare occasions, close reduction was not satisfactory and open reduction was performed (3 cases in PFNA group, 4 cases in LISS group). As to postoperative treatment, joint movement was encouraged on second postoperative day for every patient in both groups. The time to start weight-bearing differed widely. In our opinion, the appropriate time to begin with weight-bearing depends not only on the implant used, but also on the fracture type, postoperative stability, osteoporosis, and body weight as well. Haidukewych [20] highlighted 4 classic intertrochanteric fracture patterns that signify instability. The unstable patterns include reverse obliquity fractures, transtrochanteric fractures, fractures with a large posteromedial fragment implying loss of the calcar buttress, and fractures with subtrochanteric extension. He suggested nailing for these fractures. In this study, weight-bearing was delayed in patients with these classic fracture patterns, regardless of treatment groups.

A weakness of this study is that we are familiar with PFNA but not with reverse LISS, for it is originally designed for distal femur. Another weakness is the relatively small patient group. Further studies are required concerning LISS application to proximal femur.

In conclusion, the results of the present study show that both the PFNA and the reverse LISS provide effective methods of treatment for intertrochanteric hip fractures. PFNA is superior to reverse LISS in terms of surgical time, weight-bearing, and perhaps fluoroscopy time. Mechanical failure can be minimized when the rehabilitation program is made based on individual characteristics.

References

C. Kokoroghiannis, I. Aktselis, A. Deligeorgis, E. Fragkomichalos, D. Papadimas, and I. Pappadas, “Evolving concepts of stability and intramedullary fixation of intertrochanteric fractures-A review,” Injury, vol. 43, pp. 686–693, 2012.

C. H. Ma, Y. K. Tu, S. W. Yu, et al., “Reverse LISS plates for unstable proximal femoral fractures,” Injury, vol. 41, pp. 827–833, 2010.

G. C. Zha, Z. L. Chen, X. B. Qi, and J. Y. Sun, “Treatment of pertrochanteric fractures with a proximal femur locking compression plate,” Injury, vol. 42, pp. 1294–1299, 2011.

C. W. Oh, J. J. Kim, Y. S. Byun et al., “Minimally invasive plate osteosynthesis of subtrochanteric femur fractures with a locking plate: a prospective series of 20 fractures,” Archives of Orthopaedic and Trauma Surgery, vol. 129, no. 12, pp. 1659–1665, 2009.

J. R. Pryce Lewis and G. P. Ashcroft, “Reverse LISS plating for proximal segmental femoral fractures in the polytrauma patient: a case report,” Injury, vol. 38, no. 2, pp. 235–239, 2007.

T. J. Gardenbroek, M. J. M. Segers, R. K. J. Simmermacher, and E. R. Hammacher, “The Proximal Femur Nail Antirotation: an identifiable improvement in the treatment of unstable pertrochanteric fractures?” Journal of Trauma, vol. 71, no. 1, pp. 169–174, 2011.

A. S. Gavaskar, M. Subramanian, and N. C. Tummala, “Results of proximal femur nail antirotation for low velocity trochanteric fractures in elderly,” Indian Journal of Orthopaedics, vol. 46, no. 5, pp. 556–560, 2012.

M. Kraus, G. Krischak, K. Wiedmann, et al., “Clinical evaluation of PFNA and relationship between the tip-apex distance and mechanical failure,” Unfallchirurg, vol. 114, no. 6, pp. 470–478, 2011.

D. Kristek, I. Lovrić, J. Kristek, M. Biljan, G. Kristek, and K. Šakić, “The proximal femoral nail antirotation (PFNA) in the treatment of proximal femoral fractures,” Collegium Antropologicum, vol. 34, no. 3, pp. 937–940, 2010.

Y. Liu, R. Tao, F. Liu et al., “Mid-term outcomes after intramedullary fixation of peritrochanteric femoral fractures using the new proximal femoral nail antirotation (PFNA),” Injury, vol. 41, no. 8, pp. 810–817, 2010.

American Society of Anesthesiologists, “New classification of physical status,” Anesthesiology, vol. 24, pp. 111–114, 1963.

S. Vidyadhara and S. K. Rao, “One and two femoral neck screws with intramedullary nails for unstable trochanteric fractures of femur in the elderly-Randomised clinical trial,” Injury, vol. 38, no. 7, pp. 806–814, 2007.

G. J. Haidukewych, T. A. Israel, and D. J. Berry, “Reverse obliquity fractures of the intertrochanteric region of the femur,” Journal of Bone and Joint Surgery, vol. 83, no. 5, pp. 643–650, 2001.

W. H. Harris, “Traumatic arthritis of the hip after dislocation and acetabular fractures: treatment by mold arthroplasty. An end-result study using a new method of result evaluation,” Journal of Bone and Joint Surgery, vol. 51, no. 4, pp. 737–755, 1969.

M. L. Forte, B. A. Virnig, R. L. Kane et al., “Geographic variation in device use for intertrochanteric hip fractures,” Journal of Bone and Joint Surgery, vol. 90, no. 4, pp. 691–699, 2008.

T. A. Radcliff, E. Regan, D. C. Cowper Ripley, et al., “Increased use of intramedullary nails for intertrochanteric proximal femoral fractures in veterans affairs hospitals,” Acta Orthopaedica Belgica, vol. 78, pp. 192–198, 2012.

C. Zeng, Y. R. Wang, J. Wei, et al., “Treatment of trochanteric fractures with proximal femoral nail antirotation or dynamic hip screw systems: a meta-analysis,” The Journal of International Medical Research, vol. 40, no. 3, pp. 839–851, 2012.

N. Han, G. X. Sun, Z. C. Li, et al., “Comparison of proximal femoral nail antirotation blade and reverse less invasive stabilization system-distal femur systems in the treatment of proximal femoral fractures,” Orthopaedic Surgery, vol. 3, no. 1, pp. 7–13, 2011.

F. Zhou, Z. S. Zhang, H. Yang, et al., “Less invasive stabilization system (LISS) versus proximal femoral nail anti-rotation (PFNA) in treating proximal femoral fractures: a prospective randomized study,” Journal of Orthopaedic Trauma, vol. 26, no. 3, pp. 155–162, 2012.

G. J. Haidukewych, “Intertrochanteric fractures: ten tips to improve results,” Journal of Bone and Joint Surgery, vol. 91, no. 3, pp. 712–719, 2009.