The Scientific World Journal

Volume 2014 (2014), Article ID 528696, 15 pages

http://dx.doi.org/10.1155/2014/528696

Research Article

A Three-Step Approach with Adaptive Additive Magnitude Selection for the Sharpening of Images

Lih-Jen Kau and Tien-Lin Lee

Department of Electronic Engineering, National Taipei University of Technology, No. 1, Section 3, Chung-Hsiao E. Road, Taipei 10608, Taiwan

Received 2 June 2014; Revised 10 August 2014; Accepted 12 August 2014; Published 16 September 2014

Academic Editor: Rene de J. Romero-Troncoso

Copyright © 2014 Lih-Jen Kau and Tien-Lin Lee. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Aimed to find the additive magnitude automatically and adaptively, we propose a three-step and model-based approach for the sharpening of images in this paper. In the first pass, a Grey prediction model is applied to find a global maximal additive magnitude so that the condition of oversharpening in images to be sharpened can be avoided. During the second pass, edge pixels are picked out with our previously proposed edge detection mechanism. In this pass, a low-pass filter is also applied so that isolated pixels will not be regarded as around an edge. In the final pass, those pixels detected as around an edge are adjusted adaptively based on the local statistics, and those nonedge pixels are kept unaltered. Extensive experiments on natural images as well as medical images with subjective and objective evaluations will be given to demonstrate the usefulness of the proposed approach.

1. Introduction

The purpose of image sharpening is to highlight transitions or discontinuities in intensity. As it is widely applied in medical image processing, electronic printing, as well as industrial applications such as defect inspections, many research results regarding the image sharpening approaches have been proposed [1–19]. A commonly used technology for the sharpening of images includes first finding the second derivative, for example, using Laplacian filter, of the original image and then adding the differentiated image to the original one to get a sharpened image [1]. In addition to the method mentioned above, the use of an unsharp mask in conjunction with a highboost filter for the sharpening of images is also widely used in printing and publishing industry [1]. In [2], a content-adaptive algorithm is proposed for the sharpening of images. By extracting the length of lines in the image to be sharpened, the content characteristic as well as the increment or decrement magnitude to be added to the original image can be determined automatically. Besides, regions with artifacts will be sharpened more, while that of natural objects will be less sharpened [2]. In [3], a so-called intuitionistic fuzzy approach is applied for the edge enhancement, and the resulted image can have a very distinct transition on boundaries for different types of medical images [3]. In [4], color image to be sharpened is first converted to YIQ or CIELAB color space, and then the method of unsharp masking and fuzzy morphological sharpening will be used to adjust the intensity of pixels around boundaries [4].

Since most of the approaches apply the use of differentiation operators to highlight the discontinuities, that is, an edge or a boundary, within an image, the noise suppression can be an annoying problem during the process of edge enhancement. To conquer this problem an unsupervised edge enhancement algorithm based on a combination of wavelet coefficients at different scales is proposed in [5]. The multiscale algorithm can be successfully applied for automatic edge enhancement and detection in speckled synthetic aperture radar (SAR) images [5]. In [6], a technique combining kernel regression and local homogeneity is proposed. The image to be sharpened is first filtered with kernel regression, and then the local homogeneity computation is introduced for further smoothing so that the algorithm is effective about noise reduction and edge enhancement [6]. In [7], a fuzzy logic approach is applied for the sharpening as well as the enhancement of local contrast so that the problem of noise-sensitive in conventional linear unsharp masking technique can be avoided. In [8], an edge enhancement approach is proposed by using image fusion technique. The image to be processed is first convolved with low-pass and high-pass filters, where the filter parameters are determined based on the histogram of the image to be processed. After that, the filtered images are adjusted based on the statistics of the filtered images and then fused together to get an edge enhanced image [8]. A Sobel operator-based approach for the sharpening of edges in a grey scale image is proposed in [9]. The image to be sharpened is first processed by a Gaussian low-pass filter to get a blurred image, and then the Sobel operator is applied to find the edges in the image as well as the gradient of the pixel to be processed. In [9], the gradient around a pixel is quantized to one of a set of four predefined angles. After that, a non maximum suppression and the so-called Hysteresis thresholding approach will be applied for nonedge pixel and salt-and-pepper noises removal respectively. Finally, the thin and smooth edges in the image can be obtained after these processes. In [10], an approach of our previous work which is based on the concept of “Just Noticeable Distortion (JND)” is proposed for the sharpening of color images. The image to be sharpened is first transformed to the HSV color model, and then the edge pixels in the channel of Value will be picked out and used for the process of sharpening. During the process of sharpening, the channel of Hue and Saturation are kept unaltered [10]. Besides, a low-pass filter is applied to the edge pixels in the channel of Value before the sharpening process so that salt-and-pepper noises can be suppressed. Finally, the adjusted channel of Value is integrated with that of Hue and Saturation to get the sharpened color image in [10].

In certain cases, the sharpening of an image is carried out in conjunction with image contrast enhancement [11–19]. In such kind of approaches, the statistics of the image to be sharpened is first obtained, and then the equalization of histogram will be performed. In [11], the Laplace filter is first applied so that the strength of the discontinuity in the image to be processed can be evaluated. After that, a Laplace filter is used again to highlight discontinuity with smaller strength while a Gaussian filter is applied to suppress discontinuity with larger strength. Finally, the contrast will be enhanced by using an adaptive histogram equalization approach to get a better visual perceptual quality [11]. In [12], an edge-weighted contrast enhancement algorithm is proposed. The image to be enhanced is first convolved with a median filter to get a low-pass filtered image. Meanwhile, the original image is also processed by a weighted threshold histogram equalization (WTHE) approach to get an rudimentary enhanced image. Finally, the Sobel operator is applied to the original image to be enhanced to get a couple of weights for the low-passed filtered image as well as the rudimentary enhanced image so that the two images can be merged together to get the final enhanced image.

Though histogram equalization (HE) has been proved to be simple and effective in contrast enhancement, however, it tends to change the mean brightness of the image to the middle level of the permitted range and hence is not very suitable for consumer electronic products, where preserving the original brightness is essential to avoid unnatural look and visual artifacts [13]. To conquer this problem, a brightness preserving histogram equalization with maximum entropy (BPHEME) approach is proposed in [13]. The BPHEME tries to find the target histogram that maximizes the entropy under the constraints that the mean brightness is fixed so that not only the image can be enhanced, but also the original brightness can be preserved as well [13].

Based on the analysis of many of the researches for contrast enhancement, the use of an intensity distribution of the whole image is the major cause of visual artifacts in conventional histogram equalization. Therefore, some of the researches propose the use of a so-called subregion or subimage histogram equalization [14–19]. Instead of using the conventional histogram equalization, a method called subregions histogram equalization is proposed for contrast enhancement in [14]. The image to be enhanced is first convolved with a Gaussian filter to get smoothed intensity values, and then the transformation function is applied for histogram equalization [14]. With the process of convolving with the Gaussian filter, the transformation function used is not based on the intensity of the pixels only, but the values of the neighboring pixels are also considered [14]. In [15], a recursive subimage histogram equalization is developed by iteratively dividing the histogram based on median rather than mean values so that the brightness can be preserved to extend better than previous histogram partitioning methods. A contrast enhancement method using dynamic range separate histogram equalization (DRSHE) is proposed in [16]. The DRSHE first separates the dynamic range of histograms into several parts and resizes the grey scale range of each part based on individual area ratio, and then intensities of histogram in each part are uniformly redistributed in resized grey scale range so that unintended changes in brightness can be suppressed [16]. In [17], an edge-preserving contrast enhancement as well as a multihistogram equalization method is proposed. By utilizing the human visual system, the image to be enhanced is decomposed into segments, resulting in an efficient correction of nonuniform illumination. Additionally, a quantitative measure of image enhancement is also proposed [17]. In [18], an adaptive image equalization algorithm is proposed. The histogram distribution is first synthesized by Gaussian mixture model, and the intersection points of the Gaussian components are used to partition the dynamic range of the image into subintervals. The contrast equalized image is generated by transforming the gray levels in each subinterval according to the dominant Gaussian component and the cumulative distribution function of the subinterval with a weight proportional to the variance of the corresponding Gaussian component. The algorithm is free of parameter setting for a given dynamic range of the enhanced image [18]. Recently, a fuzzy logic-based histogram equalization (FHE) is proposed for intensity transformation and spatial filtering in [19]. The fuzzy histogram is first computed based on fuzzy set theory, and then the fuzzy histogram is divided into two subhistograms based on the median value of the original image. Finally, the two subhistograms are equalized independently to get a brightness preserved and contrast enhanced image. In these histogram-equalized approaches, all the pixels are adjusted, and the intensity as well as the characteristics of the original image changes [11–19].

Instead of using the concept of JND in our previous work [10], we try to determine the maximal additive magnitude with a quite different approach in this paper. To do this, we propose a model-based and three-pass algorithm for the sharpening of grey-scale images. The first pass of the proposed approach is to determine an appropriate maximal additive intensity magnitude based on the global statistics of the image to be sharpened. To highlight the transitions or discontinuities in intensity, pixels around edges or boundaries should be adjusted; that is, an additive magnitude should be imposed on those edge pixels. In general, a larger additive in magnitude can have a better sharpening result; however a larger additive in magnitude can also lead to the saturation of intensity around edge pixels. Aiming to find the maximal additive magnitude automatically for the images to be sharpened, we proposed in this paper the use of a Grey prediction model GM so that the condition of over-sharpening or intensity saturation can be avoided. The Grey prediction model is applied in a variety of fields for its ability of generating predicted value of a sequence under limited information or sampled values [20, 21]. With this characteristic, some of the researches apply the Grey prediction model for the edge detection of an image so that the discontinuity or change in intensity can be highlighted [22–24]. Instead of using the Grey prediction model for finding discontinuities in an image directly, in this paper we apply the use of a GM model for the determination of the maximal additive value . In this paper, the smallest intensity (), middle intensity (), and largest intensity (), as well as the average intensity () of the image to be sharpened are used as the four sample sequence values of the Grey prediction model so that a predicted value that describes the trend of intensity distribution can be obtained. The maximal additive value is then calculated by subtracting the average intensity value from the Grey predicted value.

During the second pass, pixels around edges or boundaries are picked out with an edge detection mechanism, for example, the well known Canny [25] and Sobel edge detector [1], can be used for this purpose. In this paper, the Canny operator as well as our previously proposed horizontal and vertical differentiator (called HVD for short), which performs difference operation between consecutive pixels in [10], will be used for the detection of an edge. In the third pass, the intensity of those pixels detected as around an edge or boundary are adjusted with an increment or decrement based on our previously proposed local-adapted strategy [10] for the purpose of image sharpening, and that of those nonedge pixels are kept unaltered. With the proposed approach, most of the original information contained in the image can be retained. Actually, the increment or decrement magnitude to be added to an edge pixel is a portion of the largest additive magnitude depending upon the local statistics of the pixel to be adjusted. For this, we first calculate the average intensity of a small local area around the pixel and then check to see if the intensity of the edge pixel is greater than the average intensity value. If so, an increment is added, otherwise a decrement should be added. Finally, a scaling factor can also be used for the adjustment of the additive magnitude in the proposed approach. As we will see in the experiments, the proposed approach can have a very distinct intensity transition for pixels around edges in the sharpened images, which demonstrates the usefulness of the proposed approach.

The rest of the paper is organized as follows. Section 2 gives an overview of the Grey prediction algorithm. The proposed algorithm is introduced in Section 3. Extensive experiments on the proposed method are given in Section 4. A conclusion is given in Section 5.

2. The Grey Prediction

Due to its successful applications in a variety of fields, for example, image processing, statistics, medical, military, and business management, the Grey theory, especially the Grey prediction method, has attained more and more attention recently [20, 21]. Unlike most of the conventional prediction mechanisms, the data samples that are to be used as the inputs of a prediction do not have to be equally spaced or sampled in Grey prediction model. Moreover, a very good prediction result can be obtained under limited data samples or information with the use of a Grey prediction mechanism [20, 21]. For this reason, the commonly used GM model, that is, a first-order differential equation with single variable, is applied in this paper to predict the trend of intensity distribution in the image to be sharpened, and then the predicted value is used for the determination of a maximal additive value .

By performing a so-called accumulated generating process, an irregular data sequence can be made regular with the use of a GM prediction model. The accumulated data sequence with regular property is usually referred to as the Grey generated sequence. After this process, the Grey generated sequence can be used for the modeling or prediction of future data samples. To utilize the GM Grey prediction mechanism based on previously sampled data, we define the observation, that is, the previously sampled data sequence, as

With the sampled data sequence , the Grey prediction modeling can be carried out through the following steps [20, 21].

Step 1 (perform the accumulated generating operation). The first step is to perform the so-called accumulated generating operation (AGO) of the original sequence to get the accumulated generating sequence as below:

Step 2 (calculation of the mean sequence). The second step is to calculate the mean sequence from

Step 3 (calculation of the semiparameters). This step, four intermediate parameters , , , and are calculated as below [20, 21]:

Step 4 (calculation of the coefficients , ). In step four, the so-called developing coefficient and Grey input are calculated as below [20, 21]:

Step 5 (construct the White response equation). With the above parameters, the GM prediction can then be modeled by the following:

Differentiating with the time index, we have the Grey differential equation below

The solution of the above equation is called the White response, and is given by

Step 6 (perform inverse accumulated generating operation). After the th sample of the accumulated generating sequence, that is, , has been calculated in (8), the th sample of the original data sequence can be obtained by using a back-stepping or inverse accumulated generating operation (IAGO) as below

3. Proposed Image Sharpening Algorithm

In this section, the proposed three-pass image sharpening algorithm is to be introduced. The determination of the maximal additive magnitude will be first introduced, and then the edge detection mechanism in [10] will be given after that. Finally, the edge sharpening algorithm will be explained [10].

3.1. Maximal Additive Determination-Step I

The first pass of the proposed approach is to determine an appropriate maximal additive intensity magnitude based on the global statistics of the image to be sharpened. For this, a commonly used Grey prediction model GM will be applied for this purpose [20, 21]. To find the , we use the smallest intensity (), middle intensity (), and largest intensity (), as well as the average intensity value () of the image to be sharpened as the four sample sequence values, that is, , of the Grey prediction model [20, 21]. The four sample data values of the original sequence are then used to predict the fifth sample in the sequence, which describes the trend of intensity distribution of the image to be sharpened (as illustrated in Figure 1). The maximal additive value is then determined by

Recall that the purpose of image sharpening is to highlight the discontinuities. For this, an increment or decrement should be added with the original intensity for pixels around boundaries. A larger additive value usually can have a better sharpening result. However it can also lead to the intensity saturation or the effect of over-sharpening of edge pixels. Therefore, the determination of an appropriate or maximal additive value has become an important step during the sharpening procedure. The given above turns out to be a very good choice in which the intensity saturation phenomenon can be avoided as we will see in the experiment.

Figure 1: The calculation of based on GM prediction model.

3.2. Edge Detection and Low Pass Filtering-Step II

In the second pass, pixels around edges are to be picked out. The commonly used Canny and Sobel operator can be applied for this purpose. Nevertheless, in this paper we apply a very simple algorithm of our previous work in [10] for discontinuity detection by calculating the horizontal and vertical intensity difference of the pixel to be sharpened, that is, the horizontal and vertical differentiator (HVD) [10].

By using the HVD, the discontinuity around a pixel can be easily detected by examining the intensity difference between () and () (in Figure 2). We then determine if the pixel is around an edge by checking if the first condition of the following equation holds [10]:

where is a bi-level output image with represented for edge pixels, and is a predefined threshold which controls the degree of discontinuity that a pixel may be regarded as around an edge [10]. Empirically, a value between to would be a suitable choice for .

Figure 2: Texture context of the pixel to be sharpened.

In this pass, however, some of the isolated pixels can also be detected as around an edge with the proposed HVD edge detector [10]. Therefore, not only the edge information, but also salt-and-pepper noise can be incurred in the bilevel image as well. To avoid this problem, a low-pass filter is applied so that those isolated pixels can be excluded from being regarded as around an edge [10]. To determine if a pixel is really an edge pixel or not, we apply the low-pass filter in [10] and check if the following inequality holds

where means the eight-connected neighbors of pixel . That is, we check the number of of the eight neighbors of in the bi-level image . If it is smaller than a predefined threshold , is regarded as an isolated point, and will be discarded from the list of edge pixels [10]. In this paper, is set to be . This is due to the fact that the detected edge width would be two-pixel wide if the HVD approach is used, and thus a value of is much suitable for .

3.3. Edge Sharpening Process-Step III

During the final pass, the intensity of those pixels detected as around an edge are adjusted with an increment or decrement based on our previously proposed local-adapted strategy [10] for the purpose of image sharpening, and that of those nonedge pixels are kept unaltered. To highlight smaller discontinuity but keep the image not to be over-sharpened, the additive magnitude has to be adapted to the local statistics of the image. Thus, we first compute the average intensity of a small local area including the edge pixel to be adjusted and the eight-connected neighbors of , that is, . We then compare if the intensity of is greater or smaller than the value of . If the intensity value of is greater than , an increment will be added to ; otherwise the will be subtracted from [10]. The additive value is determined adaptively by

where is a scaling factor between and that controls the degree of sharpness, and is obtained in (10) [10]. Actually, the term inside the bracket of (13) is for local adaptation which makes the additive magnitude larger for a smaller discontinuity, and vice versa [10]. The sharpened intensity value of is then given by [10]

As we are dealing with 8-bit grey scale images, the intensity value of each pixel should fall in the range between and . Therefore, the sharpened intensity value has to be checked if its value is outside the upper and lower bound. If so, the should be set to or depending on the value smaller than or greater than . To summarize, the detailed procedure of the proposed grey-scale image sharpening algorithm is shown in Figure 3.

Figure 3: Procedure of the proposed image sharpening algorithm.

4. Experiments

In this section, we evaluate the performance of the proposed image sharpening algorithm. The nine images in Figures 4(a)–4(i) will be used as the test images. Among all the test images, three of which, that is, the image “Aerial,” “Chemicalplant,” and “Pentagon,” are remotely sensed synthetic aperture radar (SAR) images, while the image “Neck” is a medical image, and the others are natural images. Recall that the proposed algorithm is composed of three phases. During the second pass, the Canny operator as well as the HVD edge detection approach [10], that is, the horizontal and vertical differentiator, will be used to examine if a pixel is around edges or boundaries.

(a) Image “Neck”

(b) Image “Moonsurface”

(c) Image “Goodwill”

(d) Image “Aerial”

(e) Image “Chemicalplant”

(f) Image “Grass”

(g) Image “Finger”

(h) Image “Pentagon”

(i) Image “Lena”

Figure 4: Test images in experiment.

First of all, a subjective evaluation on the sharpening result will be performed, and then an objective evaluation on the quality will be given. During the objective evaluation process, we compare the sharpened result with the original image and check to see if most of the image content can be preserved after the edge sharpening process. Finally, a complexity analysis on the proposed approach will be given by using the operation count to highlight the efficiency of the proposed algorithm.

4.1. Subjective Performance Evaluation

In this subsection, the sharpened result by using the proposed approach for a set of nine test images in Figure 4, including three SAR images, one medical image and five natural images, will be given and evaluated in a subjective manner. We show in Figures 5 to 13 the results of the proposed approach. Among which, Figures 5(a) to 13(a) are those edge pixels picked out by using the HVD edge detector, while Figures 5(c) to 13(c) are obtained by that of Canny operator. Besides, Figures 5(b) to 13(b) are the sharpened image obtained by using the proposed approach with HVD edge detector, and Figures 5(d) to 13(d) are that of Canny operator. All the sharpened images in Figures 5 to 13 are obtained by setting the scaling factor equal to .

(a)

(b)

(c)

(d)

Figure 5: (a) Edges detected by HVD with in the image “Neck.” (b) Result by HVD with scaling factor . (c) Edges detected by Canny operator in the image “Neck.” (d) Result by Canny operator with scaling factor .

As can be seen in Figures 5(b) and 5(d), the skeleton of the medical image “Neck” has become more conspicuous when compared with the original medical image in Figure 4(a). The same effect can be obtained by observing the contour of those cavities in Figures 6(b) and 6(d) for the test image “Moonsurface” in Figure 4(b). For the natural image “Goldhill,” we can observe the portion of the windows in Figures 7(b) and 7(d). The outline of the windows is more distinct than that of the original unsharpened image in Figure 4(c). In addition, we also show in Figures 8 and 9 the sharpened results obtained by using the proposed approach for the two remote sensed SAR test images “Aerial” and “Chemicalplant.” As can be seen in Figures 8(b) and 8(d), the contour of the house becomes more conspicuous after the sharpening process when compared with the original image in Figure 4(d). For the test image “Chemicalplant,” we see from Figures 9(b) and 9(d) that the contour of the factory and the tanks, as well as the road on the left side of the picture can all have a very good visual quality when compared with the original image in Figure 4(e). For the test image “Grass” in Figure 4(f), we can see in Figures 10(b) and 10(d) that a very distinct contour around the grass can be obtained after the sharpening process when compared with the original image. The results of the test image “Finger” are shown in Figures 11(b) and 11(d). As can be seen in Figures 11(b) and 11(d), the texture of the finger print has become quite obvious when compared with the original image in Figure 4(g). Figure 12 shows the sharpened results of the test image “Pentagon,” an aerial image. A remarkable contour around the center of the buildings and the bridges, as well as the roads can be obtained after the proposed sharpening process (Figures 12(b) and 12(d)) when compared with that of the original image (Figure 4(h)). Finally, for the well known test image “Lena” (Figure 4(i)), we show in Figures 13(b) and 13(d) the sharpened results by using the proposed approach. As can be seen in Figures 13(b) and 13(d), the contour around her eyes and the contour of the hair have become very conspicuous after the sharpening process.

(a)

(b)

(c)

(d)

Figure 6: (a) Edges detected by HVD with in the image “Moonsurface.” (b) Result by HVD with scaling factor . (c) Edges detected by Canny operator in the image “Moonsurface.” (d) Result by Canny operator with scaling factor .

(a)

(b)

(c)

(d)

Figure 7: (a) Edges detected by HVD with in the image “Goldhill.” (b) Result by HVD with scaling factor . (c) Edges detected by Canny operator in the image “Goldhill.” (d) Result by Canny operator with scaling factor .

(a)

(b)

(c)

(d)

Figure 8: (a) Edges detected by HVD with in the image “Aerial.” (b) Result by HVD with scaling factor . (c) Edges detected by Canny operator in the image “Aerial.” (d) Result by Canny operator with scaling factor .

(a)

(b)

(c)

(d)

Figure 9: (a) Edges detected by HVD with in the image “Chemicalplant.” (b) Result by HVD with scaling factor . (c) Edges detected by Canny operator in the image “Chemicalplant.” (d) Result by Canny operator with scaling factor .

(a)

(b)

(c)

(d)

Figure 10: (a) Edges detected by HVD with in the image “Grass.” (b) Result by HVD with scaling factor . (c) Edges detected by Canny operator in the image “Grass.” (d) Result by Canny operator with scaling factor .

(a)

(b)

(c)

(d)

Figure 11: (a) Edges detected by HVD with in the image “Finger.” (b) Result by HVD with scaling factor . (c) Edges detected by Canny operator in the image “Finger.” (d) Result by Canny operator with scaling factor .

(a)

(b)

(c)

(d)

Figure 12: (a) Edges detected by HVD with in the image “Pentagon.” (b) Result by HVD with scaling factor . (c) Edges detected by Canny operator in the image “Pentagon.” (d) Result by Canny operator with scaling factor .

(a)

(b)

(c)

(d)

Figure 13: (a) Edges detected by HVD with in the image “Lena.” (b) Result by HVD with scaling factor . (c) Edges detected by Canny operator in the image “Lena.” (d) Result by Canny operator with scaling factor .

As can be seen in Figures 5 to 13, the contours of the sharpened images have become quite conspicuous when compared with that of the original image (Figure 4). Moreover, the result obtained by using the HVD edge detector (Figures 5(b) to 13(b)) also exhibits a better visual quality than that of using the Canny operator (Figures 5(d) to 13(d)). Obviously, a better visual perception on the texture or contour can be obtained during the image sharpening process if pixels on both sides of an edge can be adjusted simultaneously, that is, to increase the sharpness on both sides of an edge simultaneously. However, when we look into the edges detected by using the HVD edge detector (Figures 5(a) to 13(a)) and that of Canny operator (Figures 5(c) to 13(c)), we find that the width of an edge detected by using the Canny operator is subtle and would be only one-pixel in most of the cases, meaning that only pixels in one side of an edge will be adjusted. Therefore, the discontinuity can not be as distinct as that of using the HVD edge detector under the same scaling factor .

4.2. Objective Performance Evaluation with PSNR

In addition to the subjective evaluation on the test images, most of the researches apply the peak signal to noise ratio (PSNR), an objective metric, as well to evaluate the objective quality of the proposed image sharpening algorithm. That is, we want to make the contour or outline of an image visually conspicuous, but with most of the content information kept unaltered. Therefore, we use the PSNR as a metric to check the difference of an image before and after the sharpening process. Moreover, we also investigate in experiments the PSNR of the proposed approach by using different scaling factors with , , and , respectively. The results of the objective performance evaluation obtained by using the proposed approach are listed in Table 1. The maximal additive value for individual test image is also listed in the last column of Table 1. As can be seen in Table 1, the sharpened images can still have a very good PSNR (all above 43.881 dB), which indicates that most of the information in the original image can be retained after the sharpening process. Therefore, a very good trade-off between the edge enhancement and the conservation of the original content can be reached by using the proposed approach.

Table 1: Comparisons of the sharpened images with respect to original images in terms of PSNR.

Image
Dimension
Edge sharpening images

(a) HVD
(a) HVD with
(b) Canny
(b) Canny with
Δ

Neck
504 × 700
77.938
68.218
63.720
83.028
73.281
68.796
81.480
71.643
67.189
83.704
73.878
69.420
38

Moon surface
256 × 256
70.265
60.698
56.194
75.289
65.728
61.234
75.706
66.163
61.674
79.315
69.764
65.280
41

Gold hill
720 × 576
73.264
63.575
59.054
76.332
66.632
62.104
77.978
68.261
63.742
88.846
79.145
74.616
34

Aerial
256 × 256
57.342
47.837
47.837
57.781
48.276
43.881
62.617
53.076
48.629
63.789
54.240
49.781
43

Chemical plant
256 × 256
67.366
57.742
53.247
69.263
59.638
55.147
68.819
59.155
54.653
70.337
60.679
56.174
38

Grass
512 × 512
67.633
57.979
53.434
69.682
60.028
55.482
69.336
59.706
55.168
70.562
60.930
56.392
31

Finger
512 × 512
60.275
50.685
46.162
61.302
51.712
47.189
63.510
53.933
49.414
64.274
54.697
50.177
39

Pentagon
512 × 512
66.284
56.653
52.128
67.386
57.755
53.231
71.255
61.647
57.142
72.705
63.093
58.586
33

Lena
512 × 512
76.111
66.575
62.161
78.282
68.720
64.268
78.625
69.088
64.676
79.357
69.812
65.393
39

“” is a scaling factor between 0 and 1.

4.3. Complexity of the Proposed Algorithm

The operation counts of the proposed approach are listed in Table 2. The first row of Table 2 indicates different kinds of operations used during the sharpening process in the proposed approach. For edge pixels detection process, the operation counts needed to perform the proposed horizontal and vertical difference (HVD) edge detection are listed in the second row of Table 2 [10]. It is noted that the operations in the second row are performed for each pixel in the image to be sharpened if the HVD is chosen for the edge detection. The operation counts of the low-pass filtering and edge sharpening process are given in the third row and the fourth row, respectively [10]. As the process of low-pass filtering and sharpening is applied only for pixels around edges or boundaries, it should be noted that these operation counts are required only for those edge pixels.

Table 2: Operation counts of the proposed approach.

Operations
APU
MPU/DIV
ABS
COMP

HVD
≤2
0
≤2
≤2

Low pass filtering
7
0
0
1

Edge sharpening
9
4
0
1

HVD is required for each pixel.

LPF and Edge sharpening is for edge pixel only.

5. Conclusion

Aimed to find the additive magnitude automatically and adaptively, we propose a very simple yet effective three-step approach based on the Grey prediction theory for the sharpening of images in this paper. The proposed approach can adapt itself to the global and local statistics of the image to be sharpened. Extensive experiments on subjective and objective evaluations on PSNR show that the discontinuity can be made conspicuous with the proposed approach without losing much original information of the image to be sharpened, which demonstrates the superiority of the proposed approach.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgment

This work was supported by the ministry of science and technology, Taiwan, under Grant MOST-103-2221-E-027-037.

References

R. C. Gonzalez and R. E. Woods, Digital Image Processing, Pearson, 3rd edition, 2008.

T. Kobayashi and J. Tajima, “Content-adaptive automatic image sharpening,” in Proceedings of the 20th International Conference on Pattern Recognition (ICPR '10), pp. 2214–2217, Istanbul, Turkey, August 2010.

T. Chaira, “A novel rank ordered filter based edge enhancement of medical images using intuitionistic fuzzy set theory,” in Proceedings of the 2nd International Conference on Methods and Models in Computer Science (ICM2CS '10), pp. 18–21, New Delhi, India, December 2010.

M. Wirth and D. Nikitenko, “The effect of colour space on image sharpening algorithms,” in Proceedings of the 7th Canadian Conference on Computer and Robot Vision (CRV '10), pp. 79–85, June 2010.

M. T. Alonso, C. Lopez-Martinez, J. J. Mallorqui, and P. Salembier, “Edge enhancement algorithm based on the wavelet transform for automatic edge detection in SAR images,” IEEE Transactions on Geoscience and Remote Sensing, vol. 49, no. 1, pp. 222–235, 2011.

Y. Yang, J. Zhang, and X. Huang, “Adaptive image enhancement algorithm combining kernel regression and local homogeneity,” Mathematical Problems in Engineering, vol. 2010, Article ID 693532, 14 pages, 2010.

Z. Gui and Y. Liu, “An image sharpening algorithm based on fuzzy logic,” Optik, vol. 122, no. 8, pp. 697–702, 2011.

S. A. Perumal, T. C. Rajakumar, and N. Krishnan, “Edge enhancement using pixel based image fusion,” in Proceeding of the IEEE International Conference on Computational Intelligence and Computing Research (ICCIC '10), pp. 1–3, Coimbatore, India, December 2010.

T. Naqash and I. Shafi, “Edge sharpening in grayscale images using modified Sobel technique,” in Proceedings of the 14th IEEE International Multitopic Conference (INMIC '11), pp. 132–136, December 2011.

L.-J. Kau and T.-L. Lee, “An efficient and self-adapted approach to the sharpening of color images,” The Scientific World Journal, vol. 2013, Article ID 105945, 18 pages, 2013.

X. Xiaodong, S. Zaifeng, G. Wei, and Y. Suying, “An adaptive image enhancement technique based on image characteristic,” in Proceedings of the 2nd International Congress on Image and Signal Processing (CISP '09), October 2009.

S.-C. Tail, Z.-S. Chen, Y.-Y. Chang, and T.-W. Liao, “Sharpness enhancement algorithm through edge information,” in Proceedings of the 5th International Conference Intelligent Computation Technology and Automation, pp. 459–462, January 2012.

C. Wang and Z. Ye, “Brightness preserving histogram equalization with maximum entropy: a variational perspective,” IEEE Transactions on Consumer Electronics, vol. 51, no. 4, pp. 1326–1334, 2005.

H. Ibrahim and N. S. P. Kong, “Image sharpening using sub-regions histogram equalization,” IEEE Transactions on Consumer Electronics, vol. 55, no. 2, pp. 891–895, 2009.

K. S. Sim, C. P. Tso, and Y. Y. Tan, “Recursive sub-image histogram equalization applied to gray scale images,” Pattern Recognition Letters, vol. 28, no. 10, pp. 1209–1221, 2007.

G.-H. Park, H.-H. Cho, and M.-R. Choi, “A contrast enhancement method using dynamic range separate histogram equalization,” IEEE Transactions on Consumer Electronics, vol. 54, no. 4, pp. 1981–1987, 2008.

K. A. Panetta, E. J. Wharton, and S. S. Agaian, “Human visual system-based image enhancement and logarithmic contrast measure,” IEEE Transactions on Systems, Man, and Cybernetics B: Cybernetics, vol. 38, no. 1, pp. 174–188, 2008.

T. Celik and T. Tjahjadi, “Automatic image equalization and contrast enhancement using Gaussian mixture modeling,” IEEE Transactions on Image Processing, vol. 21, no. 1, pp. 145–156, 2012.

V. Magudeeswaran and C. G. Ravichandran, “Fuzzy logic-based histogram equalization for image contrast enhancement,” Mathematical Problems in Engineering, vol. 2013, Article ID 891864, 10 pages, 2013.

S. Liu and Y. Lin, Grey Information: Theory and Practical Applications, Springer, London, UK, 2006.

S. Liu and Y. Lin, Grey Systems: Theory and Applications, Springer, Berlin, Germany, 2010.

Q.-P. Wang, T.-P. Wang, and Z. Ke, “Image edge detection based on the grey prediction model and discrete wavelet transform,” in Proceedings of the IEEE International Conference on Grey Systems and Intelligent Services (GSIS '11), pp. 617–621, 2011.

S. Xie, Y. Xie, W. Yang, and G. Wang, “Edge detection using advanced grey prediction model,” in (Proceeding of the International Conference on Networking, Sensing and Control (ICNSC 20'10, pp. 486–490, Chicago, Ill, USA, April 2010.

J. Zhang and L. Wu, “An improved method for image edge detection based on GM(1,1) model,” in Proceedings of the International Conference on Artificial Intelligence and Computational Intelligence (AICI '09), vol. 3, pp. 133–136, Shanghai, China, November 2009.

J. Canny, “A computational approach to edge detection,” IEEE Transactions on Pattern Analysis and Machine Intelligence, vol. 8, no. 6, pp. 679–698, 1986.