The Scientific World Journal

Volume 2014 (2014), Article ID 780429, 1 page

http://dx.doi.org/10.1155/2014/780429

Erratum

Erratum to “Characterization of Human Colorectal Cancer MDR1/P-gp Fab Antibody”

Xuemei Zhang,1,2 Gary Guishan Xiao,³ and Ying Gao¹

¹Department of Biochemistry and Molecular Biology, Dalian Medical University, 9 Western Section, Lushun South Street, Lvshunkou District, Dalian 116044, China

²The Medical College of Dalian University, Dalian Economic & Technical Development Zone, Dalian 116622, China

³Departments of Medicine and Medical Microbiology, Creighton University, 601 N 30th Street, Omaha, NE 68131, USA

Received 28 November 2013; Accepted 23 December 2013; Published 3 February 2014

Copyright © 2014 Xuemei Zhang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The affiliations of the authors in the original paper are corrected here.