The Scientific World Journal
Volume 2015 (2015), Article ID 487439, 1 page
http://dx.doi.org/10.1155/2015/487439

Corrigendum

Corrigendum to “Experimental Study of Direct Laser Deposition of Ti-6Al-4V and Inconel 718 by Using Pulsed Parameters”

Kamran Shah,¹ Izhar Ul Haq,¹ Shaukat Ali Shah,² Farid Ullah Khan,¹ Muhammad Tahir Khan,¹ and Sikandar Khan¹

¹Institute of Mechatronics Engineering, University of Engineering & Technology, Peshawar 25100, Pakistan
²Mechanical Engineering Department, University of Engineering & Technology, Peshawar 25000, Pakistan

Received 29 March 2015; Accepted 29 March 2015

Copyright © 2015 Kamran Shah et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Experimental Study of Direct Laser Deposition of Ti-6Al-4V and Inconel 718 by Using Pulsed Parameters” one name of the authors was incorrectly written as “Sikander Khan” and is corrected as above.