The Scientific World Journal
Volume 2016 (2016), Article ID 8469373, 1 page
http://dx.doi.org/10.1155/2016/8469373

Retraction

Retracted: Electroadsorption Desalination with Carbon Nanotube/PAN-Based Carbon Fiber Felt Composites as Electrodes

The Scientific World Journal

Received 13 July 2016; Accepted 13 July 2016

Copyright © 2016 The Scientific World Journal. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The Scientific World Journal has retracted the article titled “Electroadsorption Desalination with Carbon Nanotube/PAN-Based Carbon Fiber Felt Composites as Electrodes” [1]. The article was found to contain figures repurposed, without citation, from previously published articles.

References

Y. Liu and J. Zhou, “Electroadsorption desalination with carbon nanotube/PAN-based carbon fiber felt composites as electrodes,” The Scientific World Journal, vol. 2014, Article ID 253713, 7 pages, 2014.