The Scientific World Journal
Volume 2020 (2020), Article ID 6482307, 1 page
https://doi.org/10.1155/2020/6482307

Retraction

Retracted: VEGF Genetic Polymorphisms May Contribute to the Risk of Diabetic Nephropathy in Patients with Diabetes Mellitus: A Meta-Analysis

The Scientific World Journal

Received 19 May 2020; Accepted 26 June 2020; Published 1 August 2020

Copyright © 2020 The Scientific World Journal. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The Scientific World Journal has retracted the article titled “VEGF Genetic Polymorphisms May Contribute to the Risk of Diabetic Nephropathy in Patients with Diabetes Mellitus: A Meta-Analysis” [1]. This article is one of a series of very similar meta-analyses written by different authors that were published in 2014 and 2015, characterized by searching the complementary and alternative medicine database CISCOM despite the topic not being about CAM [2], as is also the case with this article. The overlaps of wording with these articles are concentrated in the Materials and Methods and Results sections, and a paragraph in the Discussion. The article also mentions “Begger’s test,” which is a mistaken combination of “Begg’s test” and “Egger’s test” and is also characteristic of this series of articles. The article inappropriately mentions other cancers and genes, including gastric cancer in the abstract and “breast cancer” and “IFN-γ gene” in Figure 1 in the eligibility exclusion box, whereas the article is about diabetic nephropathy (DN) and VEGF.

Additionally, the assessment of publication bias may be incorrect. The statement that “Egger’s test also did not display strong statistical evidence for publication bias (allele mode: t = 2.92, and dominant model: t = 2.53, , resp.)” is made despite the test result being statistically significant and the funnel plots are said to be symmetrical, though the smaller studies (with greater standard error) show greater associations with DN, which is an indication of publication bias.

The authors said they attended a course on writing meta-analyses that lead to incorrect data analysis and they apologised for the mistakes. However, they asked to retract the article (though they did not approve the content of this notice) and this was approved by the editorial board.

References

L. Sun, Q. Yuan, N. Cao et al., “VEGF Genetic Polymorphisms May Contribute to the Risk of Diabetic Nephropathy in Patients with Diabetes Mellitus: A Meta-Analysis,” The Scientific World Journal, vol. 2014, Article ID 624573, 11 pages, 2014.

G. Filion, “A Flurry of Copycats on PubMed,” The Grand Locus, 2014, http://blog.thegrandlocus.com/2014/10/a-flurry-of-copycats-on-pubmed.